2001 No. 2975
HEALTH AND SAFETY
The Radiation (Emergency Preparedness and Public Information) Regulations 2001
Made 27th August 2001
Laid before Parliament 29th August 2001
Coming into force 20th September 2001

The Secretary of State, in exercise of the powers (as respects regulations 1 to 16 and 18 to 22) conferred on him by sections 15(1), (2), (3)(a), (4)(b), (5)(a) and (b), 43(2) and 82(3)(a) of, and paragraphs 3(1), 6, 8(1), 11, 14, 15(1) and 16 of Schedule 3 to, the Health and Safety at Work etc. Act 1974 (“the 1974 Act”) and for the purpose of giving effect without modifications to proposals submitted to him by the Health and Safety Commission under section 11(2)(d) of the 1974 Act after the carrying out by the said Commission of consultations in accordance with section 50(3) of that Act, and (as respects regulations 17 and 21) under section 2(2) of the European Communities Act 1972 being the Minister designated for the purposes of the said section 2(2) both in relation to measures relating to informing the public about health protection measures to be taken in the event of a radiological emergency and in relation to measures relating to the basic safety standards for the protection of the general public and workers against the dangers of ionising radiation, and of all other powers enabling him in that behalf, hereby makes the following Regulations:
1974 c. 37; sections 15(1), 43 and 52 were amended by the Employment Protection Act 1975 (c. 71), Schedule 15, paragraphs 6, 12 and 17 respectively; section 51A was added and section 52 was amended by the Police (Health and Safety) Act 1997 (c. 42), sections 1 and 2 respectively.
1972 c. 68.
S.I. 1991/2289.

1 Citation and commencement
These Regulations may be cited as the Radiation (Emergency Preparedness and Public Information) Regulations 2001 and shall come into force on 20th September 2001.
Reg. 1 in force at 20.9.2001, see reg. 1

2 Interpretation
1 In these Regulations, unless the context otherwise requires—
“the 1996 Regulations” means the Packaging, Labelling and Carriage of Radioactive Material by Rail Regulations 1996;
“the 1999 Regulations” means the Ionising Radiations Regulations 1999;
“the Agency” in relation to premises or transport or a plan relating to premises or transport—
(a) in England and Wales, means the Environment Agency,
(b) in Scotland, means the Scottish Environment Protection Agency;
“approved dosimetry service” means an approved dosimetry service within the meaning of the 1999 Regulations and which is approved for the purpose of regulation 14 of these Regulations;
“carrier” shall be construed in accordance with paragraph (2);
“carrier’s emergency plan” shall be construed in accordance with regulation 8;
“consignor” means an employer carrying out work with ionising radiation who presents to a carrier for transport by rail a consignment of any radioactive substance;
“dose assessment” means the dose assessment made and recorded by an approved dosimetry service in accordance with regulation 21 of the 1999 Regulations;
“dose record” means the record made and maintained in respect of an employee by the approved dosimetry service in accordance with regulation 21 of the 1999 Regulations;
“emergency exposure” means an exposure of an employee engaged in an activity of or associated with the response to a radiation emergency or potential radiation emergency in order to bring help to endangered persons, prevent exposure of a large number of persons or save a valuable installation or goods, whereby one of the individual dose limits referred to in paragraphs 1 or 2 of Part I of Schedule 4 to the 1999 Regulations could be exceeded;
“emergency services” means—
(a) those police, fire and ambulance services who are likely to be required to respond to a radiation emergency which has occurred at the premises of an operator or at the location of a radiation emergency during the course of the transport of a radioactive substance, and
(b) where appropriate, Her Majesty’s Coastguard;
“the Executive” means the Health and Safety Executive;
“health authority” means, in relation to England and Wales, a health authority established under section 8 of the National Health Service Act 1977 and, in relation to Scotland, a health board established under section 2 of the National Health Service (Scotland) Act 1978;
“installation” means a unit in which the radioactive substances present are, or are intended to be, produced, used, handled or stored, and it includes—
(a) equipment, structures, pipework, machinery and tools,
(b) railway sidings, docks and unloading quays serving the unit, and
(c) jetties, warehouses or similar structures, whether floating or not,
which are necessary for the operation of the unit;
“intervention” means a human activity that prevents or decreases the exposure of persons to radiation from a radiation emergency or from an event which could lead to a radiation emergency, by acting on the sources of radiation, the paths by which such radiation may be transmitted to persons and on persons themselves;
“ionising radiation” means the transfer of energy in the form of particles or electromagnetic waves of a wavelength of 100 nanometres or less or a frequency of 3 x 1015 hertz or more capable of producing ions directly or indirectly;
“licensed site” means a site in respect of which a nuclear site licence has been granted and is in force;
“licensee” means the person to whom a nuclear site licence has been granted;
“local authority” means—
(a) subject to sub-paragraphs (b) and (c) below, in relation to—
(i) London, the London Fire and Emergency Planning Authority,
(ii) an area where there is a fire and civil defence authority, that authority,
(iii) the Isles of Scilly, the Council of the Isles of Scilly,
(iv) an area in the rest of England, the county council for that area or, where there is no county council for that area, the district council for that area,
(v) an area in Scotland, the council for the local government area, and
(vi) an area in Wales, the county council or the county borough council for that area;
(b) for the purposes of regulation 16(2), in relation to—
(i) London, the London Fire and Emergency Planning Authority, and, in the City of London, the Common Council for the City of London, or, in an area in the rest of London, the London Borough Council for that area,
(ii) any other area where there is a fire and civil defence authority, that authority and the district council for that area,
(iii) the Isles of Scilly, the Council of the Isles of Scilly,
(iv) an area in the rest of England, the county council, if any, for that area and the district council, if any, for that area,
(v) an area in Scotland, the council for the local government area, and
(vi) an area in Wales, the county council or the county borough council for that area;
(c) for the purposes of regulation 16(3), in relation to—
(i) the City of London, the Common Council for the City of London,
(ii) an area in the rest of London, the London Borough Council for that area,
(iii) the Isles of Scilly, the Council of the Isle of Scilly,
(iv) an area in the rest of England, the district council for that area or, where there is no district council for that area, the county council for that area,
(v) an area in Scotland, the council for the local government area, and
(vi) an area in Wales, the county council or the county borough council for that area;
“medical surveillance” means medical surveillance carried out in accordance with regulation 24 of the 1999 Regulations;
“member of the public” means any person not being—
(a) a person for the time being present upon premises where a radiation emergency is reasonably foreseeable or where a radiation emergency has actually occurred, or
(b) a person engaged in an activity of or associated with the response to a radiation emergency;
“non-dispersible source” means a sealed source or a radioactive substance which in either case by virtue of its physical and chemical form cannot cause a radiation emergency in any reasonably foreseeable event but it does not include any radioactive substance inside a nuclear reactor or any nuclear fuel element;
“nuclear site licence” has the meaning assigned to it by section 1(1) of the Nuclear Installations Act 1965;
“off-site emergency plan” shall be construed in accordance with regulation 9;
“operator” shall be construed in accordance with paragraph (3);
“operator’s emergency plan” shall be construed in accordance with regulation 7;
“premises” means—
(a) the whole area under the control of the same person where radioactive substances are present in one or more installations, and for this purpose two or more areas under the control of the same person and separated only by a road, railway or inland waterway shall be treated as one whole area, or
(b) where radioactive substances are present on a licensed site, that licensed site,
and, where a radioactive substance forms an integral part of a vessel and is used in connection with the operation of that vessel, it includes that vessel when it is at fixed point moorings or alongside berths, save that such vessel shall be deemed to be separate premises only where such moorings or berths do not form part of a licensed site or part of premises under the control of the Secretary of State for Defence;
“radiation accident” means an accident where immediate action would be required to prevent or reduce the exposure to ionising radiation of employees or any other persons and includes a radiation emergency;
“radiation emergency” means any event (other than a pre-existing situation) which is likely to result in any member of the public being exposed to ionising radiation arising from that event in excess of any of the doses set out in Schedule 1 and for this purpose any health protection measure to be taken during the 24 hours immediately following the event shall be disregarded;
“radioactive substance” means any substance which contains one or more radionuclides whose activity cannot be disregarded for the purposes of radiation protection;
“sealed source” means a source containing any radioactive substance whose structure is such as to prevent, under normal conditions of use, any dispersion of radioactive substances into the environment;
“transport” means—
(a) carriage of a radioactive substance by rail in or on a vehicle and a radioactive substance shall be deemed as being transported from the time that it is loaded onto the vehicle for the purpose of transporting it until it is unloaded from that vehicle;
(b) transferring or conveying a radioactive substance through any public place otherwise than—
(i) by rail, road, inland waterway, sea or air; or
(ii) by means of a pipeline or similar means;
“vehicle” means a railroad car or railway wagon, and for the purposes of these Regulations each car or wagon forming part of a larger vehicle shall be treated as a separate vehicle;
“work with ionising radiation” means work involving the production, processing, handling, use, holding, storage, transport by rail or disposal of radioactive substances which can increase the exposure of persons to radiation from an artificial source, or from a radioactive substance containing naturally occurring radionuclides which are processed for their radioactive, fissile or fertile properties.
S.I. 1996/2090, amended by S.I. 1999/303.
S.I. 1999/3232.
1977 c. 49; section 8 was substituted by the Health Authorities Act 1995 (c. 17), section 1(1).
1978 c. 29; section 2 was amended by the Health and Social Services and Social Security Adjustments Act 1983 (c. 41), Schedule 7.
1965 c. 57; section 1 was amended by S.I. 1974/2056 and S.I. 1990/1918.
2 In these Regulations, any reference to a carrier is a reference to—
(a) an employer undertaking the transport by rail of any radioactive substance, and includes both a carrier for hire or reward and a carrier on own account, and
(b) an employer transferring or conveying a radioactive substance through any public place otherwise than by rail, road, inland waterway, sea or air or by means of a pipeline or similar means.
3 In these Regulations, any reference to an operator is a reference to—
(a) in relation to any premises other than a licensed site, the person who is, in the course of a trade, business or other undertaking carried on by him, in control of the operation of premises, and
(b) in relation to a licensed site, the licensee,
and any duty imposed by these Regulations on the operator shall extend only in relation to those premises.
4 In these Regulations, unless the context otherwise requires, any reference to—
(a) an employer includes a reference to a self-employed person and any duty imposed by these Regulations on an employer in respect of his employee shall extend to a self-employed person in respect of himself;
(b) exposure to ionising radiation is a reference to exposure to ionising radiation arising from work with ionising radiation.
5 Any reference in these Regulations to—
(a) a numbered regulation or Schedule is a reference to the regulation in or Schedule to these Regulations so numbered; and
(b) a numbered paragraph is a reference to the paragraph so numbered in the regulation or Schedule in which the reference appears.
Reg. 2 in force at 20.9.2001, see reg. 1

3 Application
1 Subject to paragraph (4) and regulation 17, these Regulations apply to any work with ionising radiation which involves—
(a) having on any premises or providing facilities for there to be on any premises a radioactive substance containing more than the quantity of any radionuclide specified in Schedule 2 or, in the case of fissile material, more than the mass of that material specified in Schedule 3;
(b) transporting by rail a radioactive substance containing more than the quantity of radionuclides specified in Schedule 4 or, in the case of fissile material, more than the mass of that material specified in Schedule 3; or
(c) transferring or conveying a radioactive substance of a quantity or mass referred to in sub-paragraph (b) above through any public place otherwise than by rail, road, inland waterway, sea or air or by means of a pipeline or similar means.
2 For the purposes of paragraph (1)(a), a quantity specified in Schedule 2 shall be treated as being exceeded if—
(a) where only one radionuclide is involved, the quantity of that radionuclide exceeds the quantity specified in the appropriate entry in Part I of Schedule 2; or
(b) where more than one radionuclide is involved, the quantity ratio calculated in accordance with Part II of Schedule 2 exceeds one.
3 For the purposes of paragraph (1)(b), a quantity specified in Schedule 4 shall be treated as being exceeded if—
(a) where only one radionclide is involved, the quantity of that radionuclide exceeds the quantity specified in the appropriate entry in Part I of Schedule 4; or
(b) where more than one radionuclide is involved, the quantity ratio calculated in accordance with Part II of Schedule 4 exceeds one.
4 These Regulations shall not apply in respect of—
(a) except for the transport of such source, any non-dispersible source;
(b) except for the transport of such substance, any radioactive substance which has an activity concentration of not more than 100Bqg-1;
(c) any radioactive substance conforming to the specifications for special form radioactive material set out in the 1996 Regulations and which is certified pursuant to those Regulations as complying with them or where the transport forms part of an international transport operation as is referred to in regulation 2(3)(a), (b) or (c) of the 1996 Regulations;
(d) any radioactive substance which is in a package which complies in every respect with either the requirements for—
(i) a Type B package design within the meaning of the 1996 Regulations; or
(ii) a consignment shipped under Special Arrangement Transport Operations for the equivalent of a Type B package within the meaning of the 1996 Regulations,
and which is, in either case, certified pursuant to those Regulations as complying with them or where the transport forms part of an international transport operation as is referred to in regulation 2(3)(a), (b) or (c) of the 1996 Regulations;
(e) the transport of any radioactive substance in the form of a low specific activity material conforming to the specifications for LSA-I, LSA-II or LSA-III within the meaning of the 1996 Regulations including cases where the transport forms part of an international transport operation as is referred to in regulation 2(3)(a), (b) or (c) of the 1996 Regulations;
(f) the transport of any radioactive substance in the form of a surface contaminated object conforming to the specifications for SCO-I or SCO-II within the meaning of the 1996 Regulations including cases where the transport forms part of an international transport operation as is referred to in regulation 2(3)(a), (b) or (c) of the 1996 Regulations;
(g) the presence of a radioactive substance while it is in or on the live body or corpse of a human being or animal where that presence occurs otherwise than in consequence of a radiation emergency.
5 These Regulations shall not apply in Northern Ireland.
Reg. 3 in force at 20.9.2001, see reg. 1

4 Hazard identification and risk evaluation
1 In relation to work with ionising radiation to which these Regulations apply—
(a) every operator shall, before such work is for the first time carried out at the premises, make an assessment; and
(b) every carrier shall before he for the first time undertakes the transport of any radioactive substance make or ensure that there has been made an assessment,
which, in either case, is sufficient to demonstrate that—
(c) all hazards arising from that work with the potential to cause a radiation accident have been identified; and
(d) the nature and magnitude of the risks to employees and other persons arising from those hazards have been evaluated.
2 Where the assessment made for the purposes of paragraph (1) or of regulation 5 shows that a radiation risk to employees or other persons exists from an identifiable radiation accident, the operator or carrier, as the case may be, shall take all reasonably practicable steps to—
(a) prevent any such accident; and
(b) limit the consequences of any such accident which does occur.
3 The requirements of this regulation are without prejudice to the requirements of regulation 3 (Risk assessment) of the Management of Health and Safety at Work Regulations 1999 and to regulation 7 (Prior risk assessment etc.) of the 1999 Regulations.
S.I. 1999/3242.
Reg. 4 in force at 20.9.2001, see reg. 1

5 Review of hazard identification and risk evaluation
1 Where a material change occurs in the work with ionising radiation to which an assessment made pursuant to regulation 4(1) relates—
(a) the operator shall make a further assessment to take account of that change; and
(b) the carrier shall make or ensure that there has been made a further assessment to take account of that change.
2 For such time as the work with ionising radiation in respect of which an assessment made pursuant to regulation 4(1) continues, the operator and carrier shall, within 3 years of the date of the last assessment (whether made in accordance with regulation 4(1), paragraph (1) or this paragraph) either—
(a) make (or, in relation to a carrier, ensure that there has been made) a further assessment; or
(b) if there is no change of circumstances which would affect the last report of the assessment required by regulation 6, sign a declaration to that effect.
Reg. 5 in force at 20.9.2001, see reg. 1

6 Reports of assessment
1 Where an assessment has been made pursuant to regulation 4(1) by an operator or carrier—
(a) the operator in question shall send to the Executive a report of that assessment at least twelve months before the commencement of the work with ionising radiation to which the assessment relates or within such shorter time in advance as the Executive may agree; and
(b) the carrier in question shall send to the Executive a report of that assessment at least 28 days before the commencement of the work with ionising radiation to which the assessment relates or within such shorter time in advance as the Executive may agree.
2 Where an assessment has been made pursuant to regulation 5(1), the operator or carrier in question shall send to the Executive a report of that assessment within 28 days of the making of the material change or such longer time as the Executive may agree.
3 Where an assessment or declaration has been made pursuant to regulation 5(2), the operator or carrier in question shall send to the Executive a report of that assessment or the declaration, as the case may be, within 28 days of the assessment or declaration being made.
4 A report of an assessment made for the purposes of this regulation shall include the particulars specified in Schedule 5.
5 Where, for the purpose of assessing the risk to health or safety of persons who could be affected by work with ionising radiation to which regulation 4 applies, the Executive may reasonably require a detailed assessment of any of the further particulars set out in Schedule 6, it may, by notice in writing served on the operator or carrier, require him to carry out (or, in relation to a carrier, require him to ensure that there has been carried out) such detailed assessment of such matters as are specified in the notice and the operator or carrier, as the case may be, shall send a report of that assessment to the Executive within such time as is specified in the notice or within such longer time as the Executive may subsequently allow.
Reg. 6 in force at 20.9.2001, see reg. 1

7 Operator’s emergency plan
1 Where the assessment made by an operator in accordance with regulation 4(1) or regulation 5 shows that it is reasonably foreseeable that a radiation emergency might arise (having regard to the steps taken by the operator under regulation 4(2)), the operator shall prepare an adequate emergency plan (in these Regulations referred to as an “operator’s emergency plan”) designed to secure, so far as is reasonably practicable, the restriction of exposure to ionising radiation and the health and safety of persons who may be affected by such reasonably foreseeable emergencies as are identified by the said assessment.
2 Without prejudice to paragraph (1), the operator’s emergency plan shall contain the information specified in Part I of Schedule 7.
3 No person shall carry out work with ionising radiation to which the assessment made in accordance with regulation 4(1) applies unless—
(a) the operator has complied with the requirements of paragraphs (1) and (2); and
(b) the local authority has complied with the requirements of regulation 9(1), (2), (8) and (9) and has provided confirmation of this to the operator in accordance with regulation 9(13).
4 The operator’s emergency plan shall be drawn up having regard to the principles set out in Part I of Schedule 8.
5 Without prejudice to the generality of paragraph (1), the operator’s emergency plan shall secure, where appropriate, intervention for the purposes set out in Part II of Schedule 8.
6 For the purpose of preparing the operator’s emergency plan pursuant to paragraph (1) or of reviewing the plan pursuant to regulation 10(1), the operator shall consult—
(a) his employees, any person carrying out work on behalf of the operator, the Executive, the local authority in whose area the premises of the operator are situated, the emergency services, the health authority for the area in which the premises of the operator are situated and the Agency; and
(b) such other persons, bodies and authorities as the operator considers appropriate,
and, in a case where the emergency services form part of the plan, shall give such information to those services as will enable them to perform their functions in accordance with the plan.
7 The operator shall ensure that any employee who may be involved with or may be affected by arrangements in the operator’s emergency plan is or has been provided with—
(a) suitable and sufficient information, instruction and training; and
(b) the equipment necessary to restrict that employee’s exposure to ionising radiation including, where appropriate, the issue of suitable dosemeters or other devices obtained in either case from the approved dosimetry service with which the operator has entered into an arrangement under regulation 21 of the 1999 Regulations.
8 The operator shall provide to the Executive upon request and within such reasonable time as the Executive may specify a copy of the operator’s emergency plan or such parts of that plan as the Executive may require.
Reg. 7 in force at 20.9.2001, see reg. 1

8 Carrier’s emergency plan
1 Where the assessment made in accordance with regulation 4(1) or regulation 5 shows that it is reasonably foreseeable that a radiation emergency might arise in respect of the transport of a radioactive substance (having regard to the steps taken by the carrier under regulation 4(2)), the carrier shall prepare or ensure that there has been prepared an adequate emergency plan in respect of the transport of such substances (in these Regulations referred to as a “carrier’s emergency plan”) designed to secure, so far as is reasonably practicable, the restriction of exposure to ionising radiation and the health and safety of persons who may be affected by such reasonably foreseeable emergencies as are identified by the said assessment.
2 Without prejudice to paragraph (1), the carrier’s emergency plan shall contain the information specified in Part II of Schedule 7.
3 A carrier shall not undertake the transport of any radioactive substance to which the assessment made in accordance with regulation 4(1) applies unless he has complied with the requirements of paragraph (1) and (2).
4 Where not also the carrier, the consignor shall, before presenting a consignment of any radioactive substance for transport, supply to the carrier such information as is necessary for the purpose of enabling the carrier to prepare or ensure that there is prepared the carrier’s emergency plan required by this regulation.
5 The carrier’s emergency plan shall be drawn up having regard to the principles set out in Part I of Schedule 8.
6 Without prejudice to the generality of paragraph (1), the carrier’s emergency plan shall secure, where appropriate, intervention for the purposes set out in Part II of Schedule 8.
7 For the purpose of preparing a carrier’s emergency plan pursuant to paragraph (1) or of reviewing the plan pursuant to regulation 10(1), the carrier shall ensure that consultation is carried out with—
(a) the Executive, (where not also the carrier) the consignor and the Agency; and
(b) such local authorities, emergency services, health authorities and other persons, bodies or authorities (or in each case representatives thereof) as the carrier considers appropriate.
8 The carrier shall ensure that any employee under his control who may be involved with or may be affected by arrangements in the carrier’s emergency plan is or has been provided with—
(a) suitable and sufficient information, instruction and training; and
(b) the equipment necessary to restrict that employee’s exposure to ionising radiation including, where appropriate, suitable dosemeters or other devices obtained in either case from the approved dosimetry service with which the carrier has entered into an arrangement under regulation 21 of the 1999 Regulations.
9 Where requested by the Executive, the carrier shall provide to the Executive within such reasonable time as may be specified a copy of the carrier’s emergency plan or such parts of the plan as the Executive may require.
Reg. 8 in force at 20.9.2001, see reg. 1

9 Off-site emergency plan
1 The local authority in whose area there is situated premises at which there is carried out work with ionising radiation to which these Regulations apply and in respect of which an assessment made by the operator pursuant to regulation 4(1) or regulation 5 shows that it is reasonably foreseeable that a radiation emergency might arise (having regard to the steps taken by the operator under regulation 4(2)) shall prepare an adequate emergency plan (in these Regulations referred to as an “off-site emergency plan”) designed to secure, so far as is reasonably practicable, the restriction of exposure to ionising radiation and the health and safety of persons who may be affected by such reasonably foreseeable emergencies as are identified in that assessment and the plan shall be prepared in respect of such area as in the opinion of the Executive any member of the public is likely to be affected by such radiation emergencies.
2 Without prejudice to paragraph (1), the off-site emergency plan shall contain the information specified in Part III of Schedule 7.
3 The off-site emergency plan prepared pursuant to paragraph (1) shall address each reasonably foreseeable radiation emergency that has been identified by the operator for the purposes of regulation 7(1).
4 Where an assessment has been made pursuant to regulation 4(1), within 28 days of sending the report of the assessment to the Executive in accordance with regulation 6(1), the operator shall supply to the local authority such information as is necessary for the purpose of enabling the authority to prepare the off-site emergency plan required by paragraph (1).
5 Without prejudice to paragraph (4), the operator shall further supply to the local authority—
(a) any additional information the local authority may reasonably request to enable the off-site emergency plan to be prepared; and
(b) details of any material change to the information provided under paragraph (4) resulting from—
(i) a further assessment made pursuant to regulation 5(1) or (2); or
(ii) a revision of the operator’s emergency plan pursuant to regulation 10(1).
6 The information provided to a local authority pursuant to paragraphs (4) or (5)(a) shall be reviewed and where necessary revised by the operator at suitable intervals not exceeding 3 years from the date at which information was last supplied to the local authority under those paragraphs and the operator shall within 28 days inform the local authority of the outcome of that review.
7 The operator shall, within 28 days of any further assessment or revision referred to in paragraph (5)(b) inform the local authority of any material change to the information supplied arising from that assessment or review.
8 Subject to paragraph (9), the off-site emergency plan shall be prepared no later than 6 months (or such longer period as the Executive may agree in writing) after whichever is the later of—
(a) the receipt by the local authority of a notice from the Executive informing the local authority of the need to prepare an off-site emergency plan in respect of the area; or
(b) the receipt by the local authority of the information referred to in paragraph (4).
9 The off-site emergency plan shall be prepared before the operator carries out work with ionising radiation to which the assessment made in accordance with regulation 4(1) applies.
10 The off-site emergency plan shall be drawn up having regard to the principles set out in Part I of Schedule 8.
11 Without prejudice to the generality of paragraph (1), the off-site emergency plan shall secure, where appropriate, intervention for the purposes set out in Part II of Schedule 8.
12 For the purpose of preparing an off-site emergency plan pursuant to paragraph (1) or of reviewing the plan pursuant to regulation 10(1), the local authority shall consult—
(a) the operator carrying out the work with ionising radiation to which the plan relates, the Executive, the emergency services, each health authority in the vicinity of the premises of the operator and the Agency; and
(b) such other persons, bodies and authorities and members of the public as the local authority considers appropriate.
13 Once it has prepared the off-site emergency plan the local authority shall confirm in writing to the operator that it has done so.
14 The employer of any employee who may be required to participate in the implementation of an off-site emergency plan shall ensure that such employees of his are or have been provided with—
(a) suitable and sufficient information, instruction and training; and
(b) the equipment necessary to restrict that employee’s exposure to ionising radiation including, where appropriate, the issue of suitable dosemeters or other devices.
15 The local authority shall provide to the Executive upon request and within such reasonable time as may be specified a copy of the off-site emergency plan or such parts of that plan as the Executive may require.
Reg. 9 in force at 20.9.2001, see reg. 1

10 Review and testing of emergency plans
1 The operator, carrier or local authority who has prepared (or, in relation to a carrier, has ensured that there has been prepared) an emergency plan pursuant to regulation 7, 8 or 9, as the case may be, shall at suitable intervals not exceeding 3 years—
(a) review and where necessary revise the plan; and
(b) test the plan and take reasonable steps to arrange for the emergency services to participate in the test to such extent as is necessary,
and any such review shall take into account changes occurring in the work with ionising radiation to which the plan relates and within the emergency services concerned, new technical knowledge and knowledge concerning the response to radiation emergencies and any material change to the assessment on which the plan was based since it was last reviewed or revised.
2 The local authority shall endeavour to reach agreement with the operator who is subject to a duty to prepare an operator’s emergency plan and the emergency services as to how the off-site emergency plan is to be tested.
3 The carrier shall endeavour to reach agreement with such local authorities and emergency services as are appropriate as to how the carrier’s emergency plan is to be tested.
Reg. 10 in force at 20.9.2001, see reg. 1

11 Consultation and co-operation
1 In performing the duties imposed on him by regulations 4(1)(a), 4(2), 5 and 7, the operator shall consult any other employer who carries out work with ionising radiation on the premises and shall for the purpose of compliance with those duties take into account relevant matters arising from that consultation.
2 Any employer who carries out work with ionising radiation at premises to which these Regulations apply shall co-operate with the operator by providing information or otherwise to the extent necessary to ensure that the operator is enabled to comply with the requirements of these Regulations (including the testing of emergency plans) in so far as his ability depends on such co-operation.
3 Any person who is subject to a duty under these Regulations to prepare an emergency plan and any employer of any other person whose participation is reasonably required by any such plan shall co-operate with each other by the exchange of information or otherwise to the extent necessary to ensure that each person is enabled to comply with the requirements of these Regulations (including the testing of emergency plans) in so far as his ability to comply depends upon such co-operation.
Reg. 11 in force at 20.9.2001, see reg. 1

12 Charge for preparation, review and testing of emergency plans
1 A local authority may charge—
(a) the operator a fee for performing the local authority’s functions in relation to the off-site emergency plan under regulations 9 and 10; and
(b) the carrier a fee for performing the local authority’s functions in relation to the carrier’s emergency plan under regulation 10(1)(b).
2 The fee charged under paragraph (1) shall not exceed the sum of costs reasonably incurred by the local authority in performing the functions referred to in that paragraph, including (but without prejudice to the generality of the foregoing provision of this paragraph) any costs reasonably incurred by the local authority in arranging for the emergency services to participate in the testing of the off-site emergency plan or the carrier’s plan, as the case may be.
3 When requiring payment the local authority shall send or give to the operator or carrier, as the case may be, a detailed statement of the work done and the costs incurred including the dates of any site visits and the period to which the statement relates and the fee, which shall be recoverable only as a civil debt, shall become payable one month after the statement has been sent or given.
Reg. 12 in force at 20.9.2001, see reg. 1

13 Implementation of emergency plans
1 An operator or carrier who has prepared (or, in relation to a carrier, has ensured that there has been prepared) an emergency plan pursuant to regulation 7 or 8, as the case may be, shall take reasonable steps to put it, or such parts of it as are necessary, into effect without delay when—
(a) a radiation emergency occurs, or
(b) an event occurs which could reasonably be expected to lead to a radiation emergency,
and shall notify such occurrence to the Executive without delay.
2 A local authority which has prepared an emergency plan pursuant to regulation 9 shall take reasonable steps to ensure that it, or such parts of it as are necessary, is put into effect without delay when informed by the operator that—
(a) a radiation emergency has occurred; or
(b) an event has occurred which could reasonably be expected to lead to a radiation emergency.
3 In the event of a radiation emergency resulting from his work with ionising radiation, the operator or carrier shall—
(a) as soon as is reasonably practicable, make (or, in relation to a carrier, ensure that there has been made) a provisional assessment of the circumstances and consequences of such an emergency and for this purpose shall consult—
(i) in the case of the operator, the emergency services, the local authority, the health authority, the Agency and such other persons, bodies or authorities as have functions under the operator’s emergency plan or the off-site emergency plan; and
(ii) in the case of the carrier, the consignor, the Agency and any emergency services, local authority and health authority who were involved in the response to the emergency and such other persons, bodies or authorities as have functions under the carrier’s emergency plan;
(b) as soon as is practicable and in any event within 12 months or such longer time as the Executive may agree, make (or in relation to a carrier ensure that there has been made) a full assessment of the consequences of that emergency and the effectiveness of the emergency plans put into effect as a result of that emergency; and
(c) within 28 days of the completion of the assessment under sub-paragraph (b) make a report of the findings of the assessment and retain that report or a copy thereof for at least 50 years from the date upon which the report was completed.
4 The operator or carrier shall provide to the Executive within 28 days of the making of the report under paragraph (3)(c) above a copy of that report.
Reg. 13 in force at 20.9.2001, see reg. 1

14 Emergency exposures
1 Where an emergency plan prepared pursuant to these Regulations provides for the possibility of any employee receiving an emergency exposure, each employer shall in relation to his employees—
(a) identify those employees who may be subject to emergency exposures;
(b) provide such employees with appropriate training in the field of radiation protection and such information and instruction as is suitable and sufficient for them to know the risks to health created by exposure to ionising radiation and the precautions which should be taken;
(c) provide such equipment as is necessary to restrict the exposure of such employees to radiation;
(d) make arrangements for medical surveillance by an appointed doctor or employment medical adviser to be carried out without delay in the event of a radiation emergency in respect of those employees who receive emergency exposures;
(e) make arrangements with an approved dosimetry service for—
(i) dose assessments to be carried out without delay in the event of a radiation emergency in respect of those employees who receive emergency exposures, and a dose assessment made for the purpose of this sub-paragraph shall, where practicable, be made separately from any other dose assessment relating to those employees; and
(ii) the results of the dose assessments carried out under sub-paragraph (i) above to be notified without delay to the employer and to the Executive;
(f) make arrangements, in respect of dose assessments to be carried out and notified pursuant to sub-paragraph (e) above, to notify the results of such assessments without delay to the appointed doctor or employment medical adviser who is carrying out the medical surveillance on the employee to whom the assessment relates;
(g) identify those employees who shall be authorised, in the event of a radiation emergency, to permit any employee referred to in sub-paragraph (a) above to be subject to an emergency exposure and provide employees who are so authorised with appropriate training.
2 An operator shall, at least 28 days before he for the first time commences work with ionising radiation, and a carrier shall at least 28 days before he for the first time undertakes transport of any radioactive substance, or in either case within such shorter time in advance as the Executive may agree, notify to the Executive the dose levels which he has determined are appropriate to be applied in respect of an employee identified for the purposes of paragraph (1)(a) in the event of such emergency.
3 Where an operator or carrier determines that a dose level notified under paragraph (2) above is no longer appropriate to be applied in respect of an employee identified for the purposes of paragraph (1)(a) in the event of such emergency, and that a revised level should be determined, the operator or carrier, as the case may be, shall, at least 28 days before formally determining the revised dose level, or within such shorter time in advance as the Executive may agree, notify to the Executive the revised dose level which he considers is appropriate to be applied.
4 In any case where in the opinion of the Executive the dose levels for emergency exposure notified pursuant to paragraph (2) or (3) are too high, the operator or carrier shall, if so directed by the Executive, substitute such other dose level or levels as the Executive may consider is appropriate.
5 Where an emergency plan is put into effect pursuant to the provisions of regulation 13, each employer shall ensure—
(a) that no employee of his under 18 years of age, no trainee under 18 years of age and no female employee who is pregnant or breastfeeding is subject to an emergency exposure;
(b) that no other employee of his is subject to an emergency exposure unless—
(i) that employee has agreed to undergo such exposure;
(ii) the requirements of paragraph (1)(a) to (f) have been complied with in respect of that employee; and
(iii) that employee has been permitted to be so by an employee authorised for that purpose under paragraph (1)(g); and
(c) that no employee of his involved in implementing an emergency plan is exposed to a dose of radiation in excess of the dose level determined in accordance with paragraphs (2), (3) or (4).
6 The requirement imposed on the employer by paragraph (5)(a) shall not apply in respect of a female employee who is pregnant or breastfeeding until such time as the employee has notified the employer in writing of that fact or the employer should reasonably have been aware of that fact.
7 The requirement imposed by paragraph (5)(c) shall not apply in respect of an exposure of any employee who—
(a) being informed about the risks involved in the intervention, agrees to undergo an exposure greater than any dose level referred to in that sub-paragraph for the purpose of saving human life; and
(b) is permitted to undergo such exposure by an employee authorised by the employer in accordance with paragraph (1)(g) to give such permission.
8 Where an employee has undergone an emergency exposure, the employer shall ensure that the dose of ionising radiation received by that employee is assessed by an approved dosimetry service and that the dose assessed is recorded separately in the dose record of that employee or, where no dose record exists, in a record created for the purpose of this paragraph complying with the requirements to which it would be subject if it were a dose record.
9 An employer shall at the request of an employee of his in respect of whom a record has been created for the purposes of paragraph (8), and on reasonable notice being given, obtain from the approved dosimetry service and make available to the employee a copy of the record of dose relating to that employee.
10 In the event of a report made pursuant to regulation 13(3) relating to the circumstances of an emergency exposure and the action taken as a result of that exposure, an employer shall keep such report (or a copy thereof) until the person to whom the report relates has or would have attained the age of 75 years but in any event for at least 50 years from the termination of the work which involved any emergency exposure.
Reg. 14 in force at 20.9.2001, see reg. 1

15 Disapplication of dose limits
In the event of a radiation emergency, regulation 11 of the 1999 Regulations shall not apply to intervention.
Reg. 15 in force at 20.9.2001, see reg. 1

16 Prior information to the public
1 An operator or carrier who carries out work with ionising radiation from which a radiation emergency is reasonably foreseeable shall—
(a) ensure that members of the public who are in an area in which, in the opinion of the Executive, they are likely to be affected by a radiation emergency arising from the undertaking of that operator or carrier, as the case may be, are supplied, in an appropriate manner, without their having to request it, with at least the information specified in Schedule 9; and
(b) make that information publicly available.
2 In preparing the information to be supplied in accordance with paragraph (1), the operator or carrier shall consult each local authority in the area or areas referred to in that paragraph, any authority likely to fall within paragraph 5 of Schedule 9 and such other persons who seem to him to be appropriate, but the operator or carrier, as the case may be, shall remain responsible for the accuracy, completeness and form of the information so supplied.
3 Without prejudice to his duty under paragraph (1), the operator or carrier shall endeavour to enter into an agreement with the local authority in the area referred to in that paragraph for that authority to disseminate the information required to be supplied in accordance with that paragraph to the members of the public mentioned in it.
4 The operator or carrier shall review and where necessary revise the information referred to in paragraph (1)—
(a) at regular intervals but, in any case, not less than once in three years; and
(b) whenever significant changes to the emergency measures, action and authorities referred to in paragraphs 3, 4 and 5 of Schedule 9 take place.
5 The operator or carrier shall ensure that the information referred to in paragraph (1) is supplied in accordance with that paragraph before carrying out work with ionising radiation to which the assessment made in accordance with regulation 4(1) (a) or (b), as the case may be, applies and that the information is so supplied again and made publicly available—
(a) at intervals not exceeding three years; and
(b) if it is revised pursuant to paragraph (4), as soon as is reasonably practicable after the revision.
6 Where a report made pursuant to regulation 6 relates to an assessment which identifies any reasonably foreseeable radiation emergency, the operator or carrier, as the case may be, shall make such report available to the public as soon as is reasonably practicable after it has been sent to the Executive under that regulation (except that, with the approval of the Executive, the operator or carrier need not make available any parts of such reports for reasons of industrial, commercial or personal confidentiality, public security or national defence).
Reg. 16 in force at 20.9.2001, see reg. 1

17 Duty of local authority to supply information to the public in the event of a radiation emergency
1 Every local authority shall prepare and keep up to date arrangements to supply, in the event of any radiation emergency in that local authority’s area (howsoever that emergency may arise), information of and advice on the facts of the emergency, of the steps to be taken and, as appropriate, of health protection measures applicable.
2 The arrangements prepared and kept up to date under paragraph (1) shall provide for the information to be supplied at regular intervals in an appropriate manner, without delay, and without their having to request it, to members of the public who are in that local authority’s area and who are actually affected by the radiation emergency.
3 In preparing those arrangements and keeping them up to date, the local authority shall consult any authority likely to be responsible for implementing the relevant measures referred to in Schedule 10 and such other persons as appear to it to be appropriate.
4 The information and advice to be supplied in accordance with arrangements prepared and kept up to date under paragraph (1) shall, if relevant to the type of radiation emergency, include that specified in Schedule 10 and shall, in any event, mention the authority or authorities responsible for implementing the relevant measures referred to in that Schedule.
5 For the purposes of paragraph (2), the members of the public referred to in that paragraph as actually affected are those whose co-operation is sought to put into effect any steps or health protection measures referred to in paragraph (1).
Reg. 17 in force at 20.9.2001, see reg. 1

18 Modifications relating to the Ministry of Defence etc.
1 In this regulation, any reference to—
(a) “visiting forces” is a reference to visiting forces within the meaning of any provision of Part 1 of the Visiting Forces Act 1952; and
1952 c. 67.
(b) “headquarters or organisation” is a reference to a headquarters or organisation designated for the purposes of the International Headquarters and Defence Organisations Act 1964.
1964 c. 5.
2 The Secretary of State for Defence may, in the interests of national security, by a certificate in writing exempt—
(a) Her Majesty’s Forces;
(b) visiting forces;
(c) any member of a visiting force working in or attached to any headquarters or organisation; or
(d) any person engaged in work with ionising radiation for, or on behalf of, the Secretary of State for Defence,
from all or any of the requirements or prohibitions imposed by these Regulations and any such exemption may be granted subject to conditions and to a limit of time and may be revoked at any time by a certificate in writing.
3 The requirements of regulation 14 shall not have effect to the extent that this regulation would in the opinion of the Secretary of State for Defence be against the interests of national security.
Reg. 18 in force at 20.9.2001, see reg. 1

19 Enforcement and offences
Insofar as any provision of regulations 17 and 21 is made under section 2(2) of the European Communities Act 1972, sections—
(a) 16 to 21 (approval of codes of practice and enforcement);
(b) 23 (provisions supplementary to sections 21 and 22) and 24 (appeal against improvement or prohibition notice), so far as they relate to an improvement notice;
(c) 26 (power to indemnify inspectors); and
(d) 33 to 42 (provisions as to offences),
of the Health and Safety at Work etc. Act 1974 shall apply to that provision as if that provision had been made under section 15 of that Act.
Reg. 19 in force at 20.9.2001, see reg. 1

20 Transitional provisions
1 Where an operator or carrier has carried out work with ionising radiation before the date of the coming into force of these Regulations, an assessment made pursuant to any enactment for the purposes of identifying those matters referred to in sub-paragraphs (c) and (d) of regulation 4(1) shall be deemed to have been made pursuant to regulation 4.
2 Where work with ionising radiation to which these Regulations apply has commenced before the date of the coming into force of these Regulations—
(a) an operator or carrier who is required to send a report of assessment to the Executive under regulation 6(1) shall be deemed to have complied with the requirements of that paragraph if such report is sent to the Executive within 5 months of that date or within such longer time as the Executive may agree;
(b) an operator who is required to prepare an operator’s emergency plan under regulation 7(1) and a carrier who is required to prepare a carrier’s emergency plan under regulation 8(1) shall be deemed to have complied with the requirements of that paragraph if that plan is prepared within 6 months of that date or within such longer time as the Executive may agree, and in such case paragraph (3) of regulation 7 or 8 respectively and regulation 9(9) shall not apply;
(c) an operator who is required to provide information to the local authority in accordance with the requirements of paragraph (4) of regulation 9 shall be deemed to have complied with that paragraph if he provides the required information to the local authority within 6 months of that date or within such longer time as the Executive may agree;
(d) an operator or carrier who is required to notify the Executive of the determined dose levels under regulation 14(2) shall be deemed to have complied with the requirements of that regulation if such notification is given to the Executive within 5 months of that date or within such longer time as the Executive may agree; and
(e) subject to paragraph (3) below, an operator or carrier who is required to supply information to the public pursuant to paragraph (1) of regulation 16 shall be deemed to have complied with that paragraph if the information specified in Schedule 9 is supplied within a reasonable time after preparation of the off-site emergency plan or the carrier’s emergency plan, as the case may be.
3 Where prior to the coming into force of these Regulations an operator or carrier has supplied information to the public pursuant to regulation 3 of the Public Information for Radiation Emergencies Regulations 1992, the supply of that information, to the extent that it relates to matters to which these Regulations apply, shall for a period of 3 years from the date upon which it was supplied or, where that information has been updated, the date upon which it was last updated, be deemed to comply with the requirements of regulation 16(1) of these Regulations and for the purposes of these Regulations that information shall be treated as if it had been supplied pursuant to regulation 16(1).
S.I. 1992/2997.
Reg. 20 in force at 20.9.2001, see reg. 1

21 Amendment of Regulations
The Regulations referred to in Schedule 11 shall be amended in accordance with the provisions of that Schedule.
Reg. 21 in force at 20.9.2001, see reg. 1

22 Revocation and saving
1 The Public Information for Radiation Emergencies Regulations 1992 are revoked, save that—
(a) to the extent that it applies in relation to the transport of radioactive substances by road, inland waterway, sea or air, regulation 3 (Employer or self-employed person to supply prior information) shall continue in force; and
(b) any other provisions of the said 1992 Regulations in so far as is necessary to give effect to regulation 3 shall also continue in force.
2 Paragraph (3) of regulation 41 of the 1999 Regulations is revoked.
3 To the extent that it applies in relation to the transport of radioactive substances by road, inland waterway, sea or air, regulation 26 (Special hazard assessment) of the Ionising Radiations Regulations 1985 (in this paragraph referred to as “the 1985 Regulations”) shall continue in force and, in respect of any employer subject to the said regulation 26, the following provisions shall also continue in force—
(a) paragraphs (1) to (3), (4)(b) and (c) and (5) of regulation 27 (Contingency plans) with the modification that—
(i) in paragraph (1), the reference to regulation 25(1) of the 1985 Regulations shall be treated as a reference to regulation 7(1) or (2) of the 1999 Regulations;
(ii) in paragraph (1)(b), the reference to regulation 8(1) of and Schedule 6 to the 1985 Regulations shall be treated as a reference to regulation 16 of the 1999 Regulations;
(iii) in paragraph (4)(b), the reference to regulation 13(2) of the 1985 Regulations shall be treated as a reference to regulation 21(2) of the 1999 Regulations;
(b) any other provisions of the 1985 Regulations in so far as is necessary to give effect to the provisions specified in this paragraph.
S.I. 1976/2003; the only relevant amending instrument is S.I. 1985/1333.
Reg. 22 in force at 20.9.2001, see reg. 1
Signed by order of the Secretary of State
Brian Wilson, Minister of State for Industry and Energy, Department of Trade and Industry 27th August 2001.

SCHEDULE 1 DOSES OF IONISING RADIATION WITHIN THE MEANING OF “RADIATION EMERGENCY”
Regulation 2(1)
1 An effective dose of 5 mSv in the period of one year immediately following the radiation emergency.
Sch. 1 para. 1 in force at 20.9.2001, see reg. 1
2 Without prejudice to paragraph 1—
(a) an equivalent dose for the lens of the eye of 15 mSv in the period of one year immediately following the radiation emergency; and
(b) an equivalent dose for the skin of 50 mSv in the period of one year immediately following the radiation emergency over 1cm2 area of skin, regardless of the area exposed.
Sch. 1 para. 2 in force at 20.9.2001, see reg. 1
3 In this Schedule—
(a) any reference to an effective dose means the sum of the effective dose to the whole body from external radiation and the committed effective dose from internal radiation;
(b) any reference to equivalent dose to a human tissue or organ includes the committed equivalent dose to that tissue or organ from internal radiation;
(c) “external radiation” means, in relation to a person, ionising radiation coming from outside the body of that person; and
(d) “internal radiation” means, in relation to a person, ionising radiation coming from inside the body of that person.
Sch. 1 para. 3 in force at 20.9.2001, see reg. 1

SCHEDULE 2 SPECIFIED QUANTITIES OF RADIONUCLIDES ON PREMISES
Regulation 3(1) and (2)
PART I

Table of radionuclides
Radionuclide name, symbol	Radionuclide form	Quantity (Bq)
Actinium		
Ac-224		2 1011
Ac-225		3 109
Ac-226		2 1010
Ac-227		4 107
Ac-228		5 1011
Aluminium		
Al-26		7 1010
Americium		
Am-237		4 1012
Am-238		6 1012
Am-239		2 1012
Am-240		4 1012
Am-241		3 108
Am-242		1 1012
Am-242m		3 108
Am-243		3 108
Am-244		2 1012
Am-244m		2 1014
Am-245		2 1012
Am-246		1 1012
Am-246m		2 1012
Antimony		
Sb-115		2 1012
Sb-116		2 1012
Sb-116m		2 1012
Sb-117		1 1013
Sb-118m		7 1012
Sb-119		1 1013
Sb-120	(long lived isotope)	3 1012
Sb-120	(short lived isotope)	2 1012
Sb-122		2 1012
Sb-124		4 1011
Sb-124m		4 1012
Sb-125		4 1011
Sb-126		1 1012
Sb-126m		2 1012
Sb-127		2 1012
Sb-128	(long lived isotope)	2 1012
Sb-128	(short lived isotope)	1 1012
Sb-129		2 1012
Sb-130		1 1012
Sb-131		2 1012
Argon		
Ar-37	(gas)	4 1017
Ar-39	(gas)	2 1016
Ar-41	(gas)	4 1013
Arsenic		
As-69		7 1011
As-70		1 1012
As-71		3 1012
As-72		9 1011
As-73		8 1012
As-74		2 1012
As-76		9 1011
As-77		2 1012
As-78		7 1011
Astatine		
At-207		4 1012
At-211		2 1011
Barium		
Ba-126		2 1013
Ba-128		1 1013
Ba-131		6 1012
Ba-131m		3 1012
Ba-133		4 1011
Ba-133m		2 1012
Ba-135m		2 1012
Ba-139		11,012
Ba-140		2 1012
Ba-141		1 1012
Ba-142		2 1012
Berkelium
Bk-245		3 1012
Bk-246		6 1012
Bk-247		3 108
Bk-249		2 1011
Bk-250		2 1012
Beryllium
Be-7		2 1013
Be-10		6 1011
Bismuth
Bi-200		2 1012
Bi-201		2 1012
Bi-202		3 1012
Bi-203		4 1012
Bi-205		2 1012
Bi-206		2 1012
Bi-207		1 1011
Bi-210		2 1011
Bi-210m		6 109
Bi-212		7 1011
Bi-213		7 1011
Bi-214		1 1012
Bromine
Br-74		8 1011
Br-74m		6 1011
Br-75		2 1012
Br-76		1 1012
Br-77		4 1013
Br-80		1 1012
Br-80m		5 1012
Br-82		3 1012
Br-83		2 1012
Br-84		7 1011
Cadmium
Cd-104		1 1013
Cd-107		4 1012
Cd-109		2 1012
Cd-113		2 1011
Cd-113m		1 1011
Cd-115		2 1012
Cd-115m		2 1012
Cd-117		2 1012
Cd-117m		2 1012
Caesium
Cs-125		2 1012
Cs-127		1 1013
Cs-129		2 1013
Cs-130		2 1012
Cs-131		6 1013
Cs-132		9 1012
Cs-134		7 1010
Cs-134m		4 1012
Cs-135		9 1011
Cs-135m		8 1012
Cs-136		8 1011
Cs-137		1 1011
Cs-138		8 1011
Calcium
Ca-41		3 1013
Ca-45		3 1012
Ca-47		2 1012
Californium
Cf-244		2 1012
Cf-246		5 1010
Cf-248		2 109
Cf-249		3 108
Cf-250		7 108
Cf-251		3 108
Cf-252		1 109
Cf-253		2 1010
Cf-254		4 108
Carbon
C-11		2 1012
C-11	(vapour)	1 1014
C-11	(dioxide gas)	1 1014
C-11	(monoxide gas)	1 1014
C-14		3 1012
C-14	(vapour)	4 1013
C-14	(dioxide gas)	3 1015
C-14	(monoxide gas)	1 1016
Cerium
Ce-134		1 1013
Ce-135		2 1012
Ce-137		2 1013
Ce-137m		2 1012
Ce-139		2 1012
Ce-141		2 1012
Ce-143		2 1012
Ce-144		3 1011
Chlorine
Cl-36		2 1012
Cl-38		6 1011
Cl-39		1 1012
Chromium
Cr-48		4 1013
Cr-49		2 1012
Cr-51		3 1013
Cobalt
Co-55		2 1012
Co-56		2 1011
Co-57		1 1012
Co-58		6 1011
Co-58m		2 1013
Co-60		6 1010
Co-60m		7 1012
Co-61		2 1012
Co-62m		9 1011
Copper
Cu-60		1 1012
Cu-61		2 1012
Cu-64		4 1012
Cu-67		3 1012
Curium
Cm-238		5 1012
Cm-240		7 109
Cm-241		5 1011
Cm-242		4 109
Cm-243		4 108
Cm-244		4 108
Cm-245		2 108
Cm-246		2 108
Cm-247		3 108
Cm-248		7 107
Cm-249		2 1012
Cm-250		1 107
Dysprosium
Dy-155		1 1013
Dy-157		1 1014
Dy-159		8 1012
Dy-165		2 1012
Dy-166		3 1012
Einsteinium
Es-250		1 1013
Es-251		6 1012
Es-253		8 109
Es-254		2 109
Es-254m		5 1010
Erbium
Er-161		6 1012
Er-165		2 1014
Er-169		3 1012
Er-171		2 1012
Er-172		3 1012
Europium
Eu-145		4 1012
Eu-146		3 1012
Eu-147		4 1012
Eu-148		4 1011
Eu-149		8 1012
Eu-150	(long lived isotope)	1 1011
Eu-150	(short lived isotope)	2 1012
Eu-152		1 1011
Eu-152m		2 1012
Eu-154		1 1011
Eu-155		2 1012
Eu-156		2 1012
Eu-157		2 1012
Eu-158		1 1012
Fermium
Fm-252		7 1010
Fm-253		6 1010
Fm-254		3 1011
Fm-255		9 1010
Fm-257		3 109
Fluorine
F-18		2 1012
Francium
Fr-222		1 1012
Fr-223		2 1012
Gadolinium
Gd-145		2 1012
Gd-146		2 1012
Gd-147		5 1012
Gd-148		9 108
Gd-149		6 1012
Gd-151		5 1012
Gd-152		1 109
Gd-153		2 1012
Gd-159		2 1012
Gallium
Ga-65		1 1012
Ga-66		9 1011
Ga-67		5 1012
Ga-68		2 1012
Ga-70		1 1012
Ga-72		2 1012
Ga-73		2 1012
Germanium
Ge-66		3 1012
Ge-67		7 1011
Ge-68		1 1012
Ge-69		2 1012
Ge-71		7 1014
Ge-75		2 1012
Ge-77		1 1012
Ge-78		2 1012
Gold
Au-193		7 1012
Au-194		1 1013
Au-195		3 1012
Au-198		2 1012
Au-198m		2 1012
Au-199		3 1012
Au-200		1 1012
Au-200m		2 1012
Au-201		2 1012
Hafnium
Hf-170		4 1012
Hf-172		5 1011
Hf-173		6 1012
Hf-175		2 1012
Hf-177m		2 1012
Hf-178m		4 1010
Hf-179m		2 1012
Hf-180m		2 1012
Hf-181		1 1012
Hf-182		7 1010
Hf-182m		2 1012
Hf-183		2 1012
Hf-184		2 1012
Holmium
Ho-155		2 1012
Ho-157		4 1012
Ho-159		6 1012
Ho-161		1 1013
Ho-162		5 1012
Ho-162m		4 1012
Ho-164		2 1012
Ho-164m		4 1012
Ho-166		1 1012
Ho-166m		8 1010
Ho-167		2 1012
Hydrogen
H-3	(tritiated water)	7 1013
H-3	(organically bound tritium)	1 1014
H-3	(tritiated water vapour)	1 1015
H-3	(gas)	1 1018
H-3	(tritiated methane gas)	1 1017
H-3	(organically bound tritium gas/ vapour)	6 1014
Indium
In-109		7 1012
In-110	(long lived isotope)	2 1013
In-110	(short lived isotope)	1 1012
In-111		9 1012
In-112		2 1012
In-113m		5 1012
In-114		1 1012
In-114m		9 1011
In-115		6 1010
In-115m		3 1012
In-116m		2 1012
In-117		2 1012
In-117m		2 1012
In-119m		9 1011
Iodine
I-120		6 1011
I-120	(elemental vapour)	2 1013
I-120	(methyl iodide vapour)	2 1013
I-120m		7 1011
I-120m	(elemental vapour)	2 1013
I-120m	(methyl iodide vapour)	2 1013
I-121		4 1012
I-121	(elemental vapour)	1 1014
I-121	(methyl iodide vapour)	1 1014
I-123		9 1012
I-123	(elemental vapour)	5 1013
I-123	(methyl iodide vapour)	6 1013
I-124		2 1012
I-124	(elemental vapour)	9 1011
I-124	(methyl iodide vapour)	1 1012
I-125		1 1011
I-125	(elemental vapour)	1 1012
I-125	(methyl iodide vapour)	1 1012
I-126		8 1011
I-126	(elemental vapour)	5 1011
I-126	(methyl iodide vapour)	6 1011
I-128		1 1012
I-128	(elemental vapour)	2 1014
I-128	(methyl iodide vapour)	5 1014
I-129		1 1010
I-129	(elemental vapour)	2 1011
I-129	(methyl iodide vapour)	2 1011
I-130		3 1012
I-130	(elemental vapour)	5 1012
I-130	(methyl iodide vapour)	6 1012
I-131		9 1010
I-131	(elemental vapour)	6 1011
I-131	(methyl iodide vapour)	7 1011
I-132		2 1012
I-132	(elemental vapour)	2 1013
I-132	(methyl iodide vapour)	3 1013
I-132m		2 1012
I-132m	(elemental vapour)	4 1013
I-132m	(methyl iodide vapour)	5 1013
I-133		2 1012
I-133	(elemental vapour)	2 1012
I-133	(methyl iodide vapour)	3 1012
I-134		2 1012
I-134	(elemental vapour)	3 1013
I-134	(methyl iodide vapour)	4 1013
I-135		2 1012
I-135	(elemental vapour)	9 1012
I-135	(methyl iodide vapour)	1 1013
Iridium
Ir-182		1 1012
Ir-184		2 1012
Ir-185		3 1012
Ir-186	(long lived isotope)	3 1012
Ir-186	(short lived isotope)	2 1012
Ir-187		6 1012
Ir-188		5 1012
Ir-189		9 1012
Ir-190		2 1012
Ir-190m	(long lived isotope)	3 1012
Ir-190m	(short lived isotope)	1 1013
Ir-192		6 1011
Ir-192m		4 1011
Ir-193m		4 1012
Ir-194		1 1012
Ir-194m		1 1011
Ir-195		2 1012
Ir-195m		2 1012
Iron
Fe-52		2 1012
Fe-55		8 1012
Fe-59		8 1011
Fe-60		4 1010
Krypton
Kr-74	(gas)	5 1013
Kr-76	(gas)	1 1014
Kr-77	(gas)	6 1013
Kr-79	(gas)	2 1014
Kr-81	(gas)	7 1015
Kr-81m	(gas)	5 1014
Kr-83m	(gas	3 1016
Kr-85	(gas)	1 1016
Kr-85m	(gas)	4 1014
Kr-87	(gas)	7 1013
Kr-88	(gas)	3 1013
Lanthanum
La-131		2 1012
La-132		2 1012
La-135		2 1014
La-137		2 1012
La-138		2 1011
La-140		2 1012
La-141		1 1012
La-142		1 1012
La-143		7 1011
Lead
Pb-195m		2 1012
Pb-198		4 1012
Pb-199		6 1012
Pb-200		3 1012
Pb-201		8 1012
Pb-202		6 1011
Pb-202m		4 1012
Pb-203		9 1012
Pb-205		1 1013
Pb-209		2 1012
Pb-210		3 109
Pb-211		2 1012
Pb-212		1 1011
Pb-214		1 1012
Lutetium
Lu-169		6 1012
Lu-170		3 1012
Lu-171		4 1012
Lu-172		3 1012
Lu-173		2 1012
Lu-174		1 1012
Lu-174m		3 1012
Lu-176		3 1011
Lu-176m		2 1012
Lu-177		3 1012
Lu-177m		3 1011
Lu-178		1 1012
Lu-178m		1 1012
Lu-179		2 1012
Magnesium
Mg-28		5 1012
Manganese
Mn-51		1 1012
Mn-52		2 1012
Mn-52m		8 1011
Mn-53		1 1014
Mn-54		3 1011
Mn-56		1 1012
Mendelevium
Md-257		9 1011
Md-258		4 109
Mercury
Hg-193	(organic)	3 1012
Hg-193	(inorganic)	3 1012
Hg-193	(vapour)	2 1013
Hg-193m	(organic)	2 1012
Hg-193m	(inorganic)	2 1012
Hg-193m	(vapour)	6 1012
Hg-194	(organic)	3 1011
Hg-194	(inorganic)	1 1012
Hg-194	(vapour)	6 1011
Hg-195	(organic)	5 1012
Hg-195	(inorganic)	5 1012
Hg-195	(vapour)	1 1013
Hg-195m	(organic)	3 1012
Hg-195m	(inorganic)	3 1012
Hg-195m	(vapour)	3 1012
Hg-197	(organic)	7 1012
Hg-197	(inorganic)	7 1012
Hg-197	(vapour)	5 1012
Hg-197m	(organic)	2 1012
Hg-197m	(inorganic)	2 1012
Hg-197m	(vapour)	4 1012
Hg-199m	(organic)	2 1012
Hg-199m	(inorganic)	2 1012
Hg-199m	(vapour)	1 1014
Hg-203	(organic)	3 1012
Hg-203	(inorganic)	3 1012
Hg-203	(vapour)	3 1012
Molybdenum
Mo-90		2 1012
Mo-93		2 1012
Mo-93m		4 1012
Mo-99		2 1012
Mo-101		2 1012
Neodymium
Nd-136		4 1012
Nd-138		5 1013
Nd-139		2 1012
Nd-139m		3 1012
Nd-141		2 1013
Nd-147		2 1012
Nd-149		2 1012
Nd-151		1 1012
Neon	
Ne-19	(gas)	6 1013
Neptunium
Np-232		3 1012
Np-233		2 1014
Np-234		5 1012
Np-235		2 1013
Np-236	(long lived isotope)	3 109
Np-236	(short lived isotope)	3 1012
Np-237		5 108
Np-238		2 1012
Np-239		1 1012
Np-240		7 1011
Nickel
Ni-56		4 1012
Ni-56	(carbonyl vapour)	1 1013
Ni-57		2 1012
Ni-57	(carbonyl vapour)	2 1013
Ni-59		4 1013
Ni-59	(carbonyl vapour)	2 1013
Ni-63		1 1013
Ni-63	(carbonyl vapour)	1 1013
Ni-65		1 1012
Ni-65	(carbonyl vapour)	4 1013
Ni-66		5 1012
Ni-66	(carbonyl vapour)	1 1013
Niobium		
Nb-88		7 1011
Nb-89	(long lived isotope)	1 1012
Nb-89	(short lived isotope)	8 1011
Nb-90		2 1012
Nb-93m		1 1013
Nb-94		1 1011
Nb-95		2 1012
Nb-95m		2 1012
Nb-96		2 1012
Nb-97		2 1012
Nb-98		1 1012
Nitrogen
N-13	(gas)	6 1013
Osmium
Os-180		1 1013
Os-181		3 1012
Os-182		6 1012
Os-185		7 1011
Os-189m		1 1013
Os-191		4 1012
Os-191m		7 1012
Os-193		2 1012
Os-194		2 1011
Palladium
Pd-100		7 1012
Pd-101		8 1012
Pd-103		4 1013
Pd-107		3 1013
Pd-109		2 1012
Phosphorus
P-32		1 1011
P-33		3 1012
Platinum
Pt-186		9 1013
Pt-188		6 1012
Pt-189		6 1012
Pt-191		7 1012
Pt-193		1 1014
Pt-193m		3 1012
Pt-195m		3 1012
Pt-197		2 1012
Pt-197m		2 1012
Pt-199		2 1012
Pt-200		2 1012
Plutonium
Pu-234		1 1012
Pu-235		2 1013
Pu-236		6 108
Pu-237		1 1013
Pu-238		2 108
Pu-239		2 108
Pu-240		2 108
Pu-241		1 1010
Pu-242		2 108
Pu-243		2 1012
Pu-244		2 108
Pu-245		2 1012
Pu-246		2 1012
Polonium
Po-203		3 1012
Po-205		7 1012
Po-206		1 1011
Po-207		8 1012
Po-208		2 109
Po-209		2 109
Po-210		4 109
Potassium
K-40		2 1012
K-42		7 1011
K-43		2 1012
K-44		6 1011
K-45		9 1011
Praseodymium		
Pr-136		1 1012
Pr-137		2 1012
Pr-138m		2 1012
Pr-139		7 1012
Pr-142		1 1012
Pr-142m		2 1015
Pr-143		2 1012
Pr-144		2 1012
Pr-145		1 1012
Pr-147		1 1012
Promethium
Pm-141		1 1012
Pm-143		9 1011
Pm-144		2 1011
Pm-145		3 1012
Pm-146		2 1011
Pm-147		4 1012
Pm-148		1 1012
Pm-148m		5 1011
Pm-149		2 1012
Pm-150		1 1012
Pm-151		2 1012
Protactinium
Pa-227		3 1011
Pa-228		3 1011
Pa-230		3 1010
Pa-231		2 108
Pa-232		2 1012
Pa-233		2 1012
Pa-234		5 1011
Radium
Ra-223		3 109
Ra-224		7 109
Ra-225		3 109
Ra-226		2 109
Ra-227		2 1012
Ra-228		1 109
Rhenium
Re-177		2 1012
Re-178		2 1012
Re-181		3 1012
Re-182	(long lived isotope)	2 1012
Re-182	(short lived isotope)	4 1012
Re-184		1 1012
Re-184m		7 1011
Re-186		2 1012
Re-186m		1 1012
Re-187		5 1014
Re-188		1 1012
Re-188m		3 1012
Re-189		2 1012
Rhodium
Rh-99		4 1012
Rh-99m		9 1012
Rh-100		4 1012
Rh-101		7 1011
Rh-101m		2 1013
Rh-102		1 1011
Rh-102m		6 1011
Rh-103m		3 1015
Rh-105		2 1012
Rh-106m		2 1012
Rh-107		2 1012
Rubidium
Rb-79		1 1012
Rb-81		2 1012
Rb-81m		4 1012
Rb-82m		3 1012
Rb-83		1 1012
Rb-84		1 1012
Rb-86		2 1011
Rb-87		4 1012
Rb-88		5 1011
Rb-89		9 1011
Ruthenium
Ru-94		1 1014
Ru-94	(tetroxide vapour)	1 1014
Ru-97		3 1013
Ru-97	(tetroxide vapour)	1 1014
Ru-103		2 1012
Ru-103	(tetroxide vapour)	1 1013
Ru-105		2 1012
Ru-105	(tetroxide vapour)	6 1013
Ru-106		3 1011
Ru-106	(tetroxide vapour)	8 1011
Samarium
Sm-141		1 1012
Sm-141m		2 1012
Sm-142		9 1012
Sm-145		3 1012
Sm-146		2 109
Sm-147		3 109
Sm-151		6 1012
Sm-153		2 1012
Sm-155		2 1012
Sm-156		2 1012
Scandium
Sc-43		2 1012
Sc-44		2 1012
Sc-44m		9 1012
Sc-46		3 1011
Sc-47		3 1012
Sc-48		2 1012
Sc-49		1 1012
Selenium
Se-70		2 1012
Se-73		2 1012
Se-73m		2 1012
Se-75		2 1011
Se-79		5 1010
Se-81		2 1012
Se-81m		4 1012
Se-83		2 1012
Silicon
Si-31		2 1012
Si-32		2 1011
Silver		
Ag-102		1 1012
Ag-103		2 1012
Ag-104		3 1012
Ag-104m		2 1012
Ag-105		2 1012
Ag-106		2 1012
Ag-106m		2 1012
Ag-108m		1 1011
Ag-110m		3 1010
Ag-111		2 1012
Ag-112		7 1011
Ag-115		9 1011
Sodium
Na-22		1 1011
Na-24		2 1012
Strontium
Sr-80		1 1014
Sr-81		9 1011
Sr-82		2 1012
Sr-83		3 1012
Sr-85		1 1012
Sr-85m		3 1013
Sr-87m		7 1012
Sr-89		1 1012
Sr-90		8 1010
Sr-91		2 1012
Sr-92		2 1012
Sulphur
S-35	(inorganic)	1 1012
S-35	(organic)	2 1011
S-35	(carbon disulphide vapour)	2 1013
S-35	(vapour)	2 1014
S-35	(dioxide gas)	1 1014
Tantalum
Ta-172		2 1012
Ta-173		2 1012
Ta-174		2 1012
Ta-175		2 1012
Ta-176		3 1012
Ta-177		1 1013
Ta-178	(long lived isotope)	3 1012
Ta-179		6 1012
Ta-180		9 1011
Ta-180m		6 1012
Ta-182		3 1011
Ta-182m		2 1012
Ta-183		2 1012
Ta-184		2 1012
Ta-185		1 1012
Ta-186		9 1011
Technetium
Tc-93		5 1013
Tc-93m		4 1012
Tc-94		6 1012
Tc-94m		1 1012
Tc-95		4 1013
Tc-95m		1 1012
Tc-96		4 1012
Tc-96m		2 1013
Tc-97		9 1012
Tc-97m		5 1012
Tc-98		1 1011
Tc-99		5 1010
Tc-99m		1 1013
Tc-101		2 1012
Tc-104		6 1011
Tellurium
Te-116		6 1012
Te-116	(vapour)	2 1014
Te-121		4 1012
Te-121	(vapour)	3 1013
Te-121m		1 1012
Te-121m	(vapour)	3 1012
Te-123		6 1012
Te-123	(vapour)	2 1012
Te-123m		2 1012
Te-123m	(vapour)	5 1012
Te-125m		2 1012
Te-125m	(vapour)	8 1012
Te-127		2 1012
Te-127	(vapour)	2 1014
Te-127m		1 1012
Te-127m	(vapour)	2 1012
Te-129		2 1012
Te-129	(vapour)	4 1014
Te-129m		1 1012
Te-129m	(vapour)	3 1012
Te-131		1 1012
Te-131	(vapour)	1 1014
Te-131m		2 1012
Te-131m	(vapour)	5 1012
Te-132		3 1012
Te-132	(vapour)	2 1012
Te-133		1 1012
Te-133	(vapour)	7 1013
Te-133m		1 1012
Te-133m	(vapour)	2 1013
Te-134		3 1012
Te-134	(vapour)	7 1013
Terbium
Tb-147		2 1012
Tb-149		2 1012
Tb-150		2 1012
Tb-151		4 1012
Tb-153		7 1012;
Tb-154		4 1012
Tb-155		1 1013
Tb-156		3 1012
Tb-156m	(long lived isotope)	1 1013
Tb-156m	(short lived isotope)	4 1012
Tb-157		1 1013
Tb-158		2 1011
Tb-160		5 1011
Tb-161		2 1012
Thallium
Tl-194		1 1013
Tl-194m		2 1012
Tl-195		4 1012
Tl-197		5 1012
Tl-198		7 1012
Tl-198m		2 1012
Tl-199		6 1012
Tl-200		1 1013
Tl-201		7 1012
Tl-202		7 1012
Tl-204		2 1012
Thorium
Th-226		4 1011
Th-227		2 109
Th-228		6 108
Th-229		1 108
Th-230		2 108
Th-231		2 1012
Th-232		2 108
Th-234		3 1012
Thulium
Tm-162		2 1012
Tm-166		3 1012
Tm-167		4 1012
Tm-170		2 1012
Tm-171		1 1013
Tm-172		2 1012
Tm-173		2 1012
Tm-175		2 1012
Tin
Sn-110		6 1013
Sn-111		2 1012
Sn-113		5 1012
Sn-117m		3 1012
Sn-119m		5 1012
Sn-121		3 1012
Sn-121m		4 1012
Sn-123		2 1012
Sn-123m		2 1012
Sn-125		1 1012
Sn-126		5 1011
Sn-127		2 1012
Sn-128		2 1012
Titanium
Ti-44		2 1011
Ti-45		2 1012
Tungsten
W-176		5 1012
W-177		3 1012
W-178		6 1013
W-179		1 1013
W-181		1 1013
W-185		4 1012
W-187		2 1012
W-188		3 1012
Uranium
U-230		2 109
U-231		7 1012
U-232		6 108
U-233		3 109
U-234		3 109
U-235		3 109
U-236		3 109
U-237		2 1012
U-238		3 109
U-239		2 1012
U-240		2 1012
Vanadium		
V-47		1 1012
V-48		1 1012
V-49		2 1014
Xenon
Xe-120	(gas)	1 1014
Xe-121	(gas)	3 1013
Xe-122	(gas)	1 1015
Xe-123	(gas)	9 1013
Xe-125	(gas)	2 1014
Xe-127	(gas)	2 1014
Xe-129m	(gas)	2 1015
Xe-131m	(gas)	4 1015
Xe-133	(gas)	1 1015
Xe-133m	(gas)	2 1015
Xe-135	(gas)	2 1014
Xe-135m	(gas)	1 1014
Xe-138	(gas)	5 1013
Ytterbium
Yb-162		1 1013
Yb-166		8 1012
Yb-167		4 1012
Yb-169		3 1012
Yb-175		4 1012
Yb-177		2 1012
Yb-178		2 1012
Yttrium
Y-86		2 1012
Y-86m		1 1013
Y-87		2 1013
Y-88		2 1011
Y-90		2 1012
Y-90m		7 1012
Y-91		2 1012
Y-91m		2 1013
Y-92		6 1011
Y-93		8 1011
Y-94		6 1011
Y-95		6 1011
Zinc
Zn-62		1 1013
Zn-63		1 1012
Zn-65		5 1010
Zn-69		2 1012
Zn-69m		2 1013
Zn-71m		2 1012
Zn-72		3 1012
Zirconium
Zr-86		2 1013
Zr-88		1 1012
Zr-89		4 1012
Zr-93		8 1011
Zr-95		8 1011
Zr-97		2 1012
Other radionuclides not listed above (see note)		4 107
Note: In the case of radionuclides not specified elsewhere in this Part, the quantity specified in this entry is to be used unless the Executive has approved some other quantity for that radionuclide.		
Sch. 2 Pt. I in force at 20.9.2001, see reg. 1

PART II Quantity ratios for more than one radionuclide
1 For the purpose of regulation 3(2), the quantity ratio for more than one radionuclide is the sum of the quotients of the quantity of a radionuclide present Qp divided by the quantity of that radionuclide specified in the appropriate column of Part I of this Schedule Qlim, namely—
∑QpQlim
Sch. 2 Pt. II para. 1 in force at 20.9.2001, see reg. 1
2 In any case where the isotopic composition of a radioactive substance is not known or is only partially known, the quantity ratio for that substance shall be calculated by using the values specified in the appropriate column in Part 1 for `other radionuclides not listed above' for any radionuclide that has not been identified or where the quantity of a radionuclide is uncertain, unless the employer can show that the use of some other value is appropriate in the circumstances of a particular case, when he may use that value.
Sch. 2 Pt. II para. 2 in force at 20.9.2001, see reg. 1

SCHEDULE 3 MASSES OF FISSILE MATERIAL
Regulation 3(1)
For the purpose of regulation 3(1), the specified mass of a fissile material shall be—
(a)	plutonium as Pu 239 or Pu 241 or as a mixture of plutonium isotopes containing Pu 239 or Pu 241—	150 grams;
(b)	uranium as U233—	150 grams;
(c)	uranium enriched in U 235 to more than 1% but not more than 5%—	500 grams;(r)
(d)	uranium enriched in U 235 to more than 5%—	250 grams.
Sch. 3 in force at 20.9.2001, see reg. 1

SCHEDULE 4 SPECIFIED QUANTITIES FOR THE TRANSPORT OF RADIONUCLIDES
Regulation 3(1) and (3)
PART I

Table of radionuclides
Radionuclide name, symbol	Radionuclide form	Quantity (Bq)
Actinium
Ac-225	(see note 1)	6 109
Ac-227	(see note 1)	9 107
Ac-228		5 1011
Aluminium
Al-26		1 1011
Americium
Am-241		1 109
Am-242m	(see note 1)	1 109
Am-243	(see note 1)	1 109
Antimony
Sb-122		4 1011
Sb-124		6 1011
Sb-125		1 1012
Sb-126		4 1011
Argon
Ar-37		4 1013
Ar-39		2 1013
Ar-41		3 1011
Arsenic
As-72		3 1011
As-73		4 1013
As-74		9 1011
As-76		3 1011
As-77		7 1011
Astatine
At-211	(see note 1)	5 1011
Barium
Ba-131	(see note 1)	2 1012
Ba-133		3 1012
Ba-133m		6 1011
Ba-140	(see note 1)	3 1011
Berkelium
Bk-247		8 108
Bk-249	(see note 1)	3 1011
Beryllium
Be-7		2 1013
Be-10		6 1011
Bismuth
Bi-205		7 1011
Bi-206		3 1011
Bi-207		7 1011
Bi-210		6 1011
Bi-210m	(see note 1)	2 1010
Bi-212	(see note 1)	6 1011
Bromine
Br-76		4 1011
Br-77		3 1012
Br-82		4 1011
Cadmium
Cd-109		2 1012
Cd-113m		5 1011
Cd-115	(see note 1)	4 1011
Cd-115m		5 1011
Caesium
Cs-129		4 1012
Cs-131		3 1013
Cs-132		1 1012
Cs-134		7 1011
Cs-134m		6 1011
Cs-135		1 1012
Cs-136		5 1011
Cs-137	(see note 1)	6 1011
Calcium
Ca-41		unlimited
Ca-45		1 1012
Ca-47	(see note 1)	3 1011
Californium
Cf-248		6 109
Cf-249		8 108
Cf-250		2 109
Cf-251		7 108
Cf-252		3 109
Cf-253	(see note 1)	4 1010
Cf-254		1 109
Carbon
C-11		6 1011
C-14		3 1012
Cerium
Ce-139		2 1012
Ce-141		6 1011
Ce-143		6 1011
Ce-144	(see note 1)	2 1011
Chlorine
Cl-36		6 1011
Cl-38		2 1011
Chromium
Cr-51		3 1013
Cobalt
Co-55		5 1011
Co-56		3 1011
Co-57		1 1013
Co-58		1 1012
Co-58m		4 1013
Co-60		4 1011
Copper
Cu-64		1 1012
Cu-67		7 1011
Curium
Cm-240		2 1010
Cm-241		1 1012
Cm-242		1 1010
Cm-243		1 109
Cm-244		2 109
Cm-245		9 108
Cm-246		9 108
Cm-247	(see note 1)	1 109
Cm-248		3 108
Dysprosium
Dy-159		2 1013
Dy-165		6 1011
Dy-166	(see note 1)	3 1011
Erbium
Er-169		1 1012
Er-171		5 1011
Europium
Eu-147		2 1012
Eu-148		5 1011
Eu-149		2 1013
Eu-150	(long lived isotope)	7 1011
Eu-150	(short lived isotope)	7 1011
Eu-152		1 1012
Eu-152m		8 1011
Eu-154		6 1011
Eu-155		3 1012
Eu-156		7 1011
Fluorine
F-18		6 1011
Gadolinium
Gd-146	(see note 1)	5 1011
Gd-148		2 109
Gd-153		9 1012
Gd-159		6 1011
Gallium
Ga-67		3 1012
Ga-68		5 1011
Ga-72		4 1011
Germanium
Ge-68	(see note 1)	5 1011
Ge-71		4 1013
Ge-77		3 1011
Gold
Au-193		2 1012
Au-194		1 1012
Au-195		6 1012
Au-198		6 1011
Au-199		6 1011
Hafnium
Hf-172	(see note 1)	6 1011
Hf-175		3 1012
Hf-181		5 1011
Hf-182		unlimited
Holmium
Ho-166		4 1011
Ho-166m		5 1011
Hydrogen
H-3		4 1013
Indium
In-111		3 1012
In-113m		2 1012
In-114m	(see note 1)	5 1011
In-115m		1 1012
Iodine
I-123		3 1012
I-124		1 1012
I-125		3 1012
I-126		1 1012
I-129		unlimited
I-131		7 1011
I-132		4 1011
I-133		6 1011
I-134		3 1011
I-135	(see note 1)	6 1011
Iridium
Ir-189	(see note 1)	1 1013
Ir-190		7 1011
Ir-192		6 1011
Ir-194		3 1011
Iron		
Fe-52	(see note 1)	3 1011
Fe-55		4 1013
Fe-59		9 1011
Fe-60	(see note 1)	2 1011
Krypton
Kr-81		4 1013
Kr-85		1 1013
Kr-85m		3 1012
Kr-87		2 1011
Lanthanum
La-137		6 1012
La-140		4 1011
Lead
Pb-201		1 1012
Pb-202		2 1013
Pb-203		3 1012
Pb-205		unlimited
Pb-210	(see note 1)	5 1010
Pb-212	(see note 1)	2 1011
Lutetium
Lu-172		6 1011
Lu-173		8 1012
Lu-174		9 1012
Lu-174m		1 1013
Lu-177		7 1011
Magnesium
Mg-28	(see note 1)	3 1011
Manganese
Mn-52		3 1011
Mn-53		unlimited
Mn-54		1 1012
Mn-56		3 1011
Mercury
Hg-194	(see note 1)	1 1012
Hg-195m	(see note 1)	7 1011
Hg-197		1 1013
Hg-197m		4 1011
Hg-203		1 1012
Molybdenum
Mo-93		2 1013
Mo-99	(see note 1)	6 1011
Neodymium
Nd-147		6 1011
Nd-149		5 1011
Neptunium
Np-235		4 1013
Np-236	(long lived isotope)	2 1010
Np-236	(short lived isotope)	2 1012
Np-237		2 109
Np-239		4 1011
Nickel
Ni-59		unlimited
Ni-63		3 1013
Ni-65		4 1011
Niobium
Nb-93m		3 1013
Nb-94		7 1011
Nb-95		1 1012
Nb-97		6 1011
Nitrogen
N-13		6 1011
Osmium
Os-185		1 1012
Os-191		2 1012
Os-191m		3 1013
Os-193		6 1011
Os-194	(see note 1)	3 1011
Palladium
Pd-103	(see note 1)	4 1013
Pd-107		unlimited
Pd-109		5 1011
Phosphorus
P-32		5 1011
P-33		1 1012
Platinum
Pt-188	(see note 1)	8 1011
Pt-191		3 1012
Pt-193		4 1013
Pt-193m		5 1011
Pt-195m		5 1011
Pt-197		6 1011
Pt-197m		6 1011
Plutonium
Pu-236		3 109
Pu-237		2 1013
Pu-238		1 109
Pu-239		1 109
Pu-240		1 109
Pu-241	(see note 1)	6 1010
Pu-242		1 109
Pu-244	(see note 1)	1 109
Polonium
Po-210		2 1010
Potassium
K-40		9 1011
K-42		2 1011
K-43		6 1011
Praseodymium
Pr-142		4 1011
Pr-143		6 1011
Promethium
Pm-143		3 1012
Pm-144		7 1011
Pm-145		1 1013
Pm-147		2 1012
Pm-148m	(see note 1)	7 1011
Pm-149		6 1011
Pm-151		6 1011
Protactinium
Pa-230	(see note 1)	7 1010
Pa-231		4 108
Pa-233		7 1011
Radium
Ra-223	(see note 1)	7 109
Ra-224	(see note 1)	2 1010
Ra-225	(see note 1)	4 109
Ra-226	(see note 1)	3 109
Ra-228	(see note 1)	2 1010
Radon
Rn-222	(see note 1)	4 109
Rhenium
Re-184		1 1012
Re-184m		1 1012
Re-186		6 1011
Re-187		unlimited
Re-188		4 1011
Re-189	(see note 1)	6 1011
Re-natural		unlimited
Rhodium
Rh-99		2 1012
Rh-101		3 1012
Rh-102		5 1011
Rh-102m		2 1012
Rh-103m		4 1013
Rh-105		8 1011
Rubidium
Rb-81		8 1011
Rb-83	(see note 1)	2 1012
Rb-84		1 1012
Rb-86		5 1011
Rb-87		unlimited
Rb-natural		unlimited
Ruthenium
Ru-97		5 1012
Ru-103	(see note 1)	2 1012
Ru-105		6 1011
Ru-106	(see note 1)	2 1011
Samarium
Sm-145		1 1013
Sm-147		unlimited
Sm-151		1 1013
Sm-153		6 1011
Scandium
Sc-44		5 1011
Sc-46		5 1011
Sc-47		7 1011
Sc-48		3 1011
Selenium
Se-75		3 1012
Se-79		2 1012
Silicon
Si-31		6 1011
Si-32		5 1011
Silver
Ag-105		2 1012
Ag-108m	(see note 1)	7 1011
Ag-110m	(see note 1)	4 1011
Ag-111		6 1011
Sodium
Na-22		5 1011
Na-24		2 1011
Strontium
Sr-82	(see note 1)	2 1011
Sr-85		2 1012
Sr-85m		5 1012
Sr-87m		3 1012
Sr-89		6 1011
Sr-90	(see note 1)	3 1011
Sr-91	(see note 1)	3 1011
Sr-92	(see note 1)	3 1011
Sulphur
S-35		3 1012
Tantalum
Ta-178	(long lived isotope)	8 1011
Ta-179		3 1013
Ta-182		5 1011
Technetium
Tc-95m	(see note 1)	2 1012
Tc-96		4 1011
Tc-96m	(see note 1)	4 1011
Tc-97		unlimited
Tc-97m		1 1012
Tc-98		7 1011
Tc-99		9 1011
Tc-99m		4 1012
Tellurium
Te-121		2 1012
Te-121m		3 1012
Te-123m		1 1012
Te-125m		9 1011
Te-127		7 1011
Te-127m	(see note 1)	5 1011
Te-129		6 1011
Te-129m	(see note 1)	4 1011
Te-131m	(see note 1)	5 1011
Te-132	(see note 1)	4 1011
Terbium
Tb-157		4 1013
Tb-158		1 1012
Tb-160		6 1011
Thallium
Tl-200		9 1011
Tl-201		4 1012
Tl-202		2 1012
Tl-204		7 1011
Thorium
Th-227		5 109
Th-228	(see note 1)	1 109
Th-229		5 108
Th-230		1 109
Th-231		2 1010
Th-232		unlimited
Th-234	(see note 1)	3 1011
Th-natural		unlimited
Thulium
Tm-167		8 1011
Tm-170		6 1011
Tm-171		4 1013
Tin
Sn-113	(see note 1)	2 1012
Sn-117m		4 1011
Sn-119m		3 1013
Sn-121m	(see note 1)	9 1011
Sn-123		6 1011
Sn-125		4 1011
Sn-126	(see note 1)	4 1011
Titanium
Ti-44	(see note 1)	4 1011
Tungsten
W-178	(see note 1)	5 1012
W-181		3 1013
W-185		8 1011
W-187		6 1011
W-188	(see note 1)	3 1011
Uranium
U-230	(fast lung absorption, see notes 1 and 2)	1 1011
U-230	(medium lung absorption see notes 1 and 3)	4 109
U-230	(slow lung absorption, see notes 1 and 4)	3 109
U-232	(fast lung absorption, see note 2)	1 1010
U-232	(medium lung absorption, see note 3)	7 109
U-232	(slow lung absorption, see note 4)	1 109
U-233	(fast lung absorption, see note 2)	9 1010
U-233	(medium lung absorption, see note 3)	2 1010
U-233	(slow lung aborption, see note 4)	6 109
U-234	(fast lung absorption, see note 2)	9 1010
U-234		2 1010
U-234	(medium lung absorption, see note 3)	6 109
U-235	(slow lung absorption, see note 4)	unlimited
U-236	(all lung absorption types, see notes 1, 2, 3 and 4)	unlimited
U-236	(fast lung absorption, see note 2)	2 1010
U-236	(medium lung absorption, see note 3)	6 109
U-238	(slow lung absorption, see note 4)	unlimited
U-natural	(all lung absorption types, see notes 2, 3 and 4)	unlimited
U (enriched to 20% or less)		unlimited
U-depleted	(see note 5)	unlimited
Vanadium
V-48		4 1011
V-49		4 1013
Xenon		
Xe-122	(see note 1)	4 1011
Xe-123		7 1011
Xe-127		2 1012
Xe-131m		4 1013
Xe-133		1 1013
Xe-135		2 1012
Ytterbium
Yb-169		1 1012
Yb-175		9 1011
Yttrium
Y-87	(see note 1)	1 1012
Y-88		4 1011
Y-90		3 1011
Y-91		6 1011
Y-91m		2 1012
Y-92		2 1011
Y-93		3 1011
Zinc
Zn-65		2 1012
Zn-69		6 1011
Zn-69m	(see note 1)	6 1011
Zirconium		
Zr-88		3 1012
Zr-93		unlimited
Zr-95	(see note 1)	8 1011
Zr-97	(see note 1)	4 1011
Other radionuclides not listed above where only beta or gamma emitting nuclides are known to be present	(see note 6)	2 1010
Other radionuclides not listed above where alpha emitting nuclides are known to be present or no relevant data are available	(see note 6)	9 107
Note 1: Values include contributions from daughter nuclides with half-lives less than 10 days.		
Note 2: These values apply only to compounds of uranium that take the chemical form of UF6, UO2F2 and UO2(NO3)2 in both normal and accident conditions of transport.		
Note 3: These values apply only to compounds of uranium that take the chemical form of O3, UF4, UCl4 and hexavalent compounds other than those specified in Note 2 above in both normal and accident conditions of transport.		
Note 4: These values apply to all compounds of uranium other than those specified in Notes 2 and 3 above.		
Note 5: These values apply to unirradiated uranium only.		
Note 6: In the case of radionuclides not specified elsewhere in this Part, the quantity specified in this entry is to be used unless the Executive has approved some other quantity for that radionuclide.		
Sch. 4 Pt. I in force at 20.9.2001, see reg. 1

PART II Quantity ratios for more than one radionuclide
1 For the purpose of regulation 3(3), the quantity ratio for more than one radionuclide is the sum of the quotients of the quantity of a radionuclide present Qp divided by the quantity of that radionuclide specified in the appropriate column of Part I of this Schedule Qlim, namely—
∑QpQlim
Sch. 4 Pt. II para. 1 in force at 20.9.2001, see reg. 1
2 In any case where the isotopic composition of a radioactive substance is not known or is only partially known, the quantity ratio for that substance shall be calculated by using the values specified in the appropriate column in Part I for “other radionuclides not listed above” for any radionuclide that has not been identified or where the quantity of a radionuclide is uncertain, unless the employer can show that the use of some other value is appropriate in the circumstances of a particular case, when he may use that value.
Sch. 4 Pt. II para. 2 in force at 20.9.2001, see reg. 1

SCHEDULE 5 PARTICULARS TO BE INCLUDED IN AN ASSESSMENT REPORT
Regulation 6(4)
The following particulars are required to be included in an assessment report under regulation 6(4)—
(a) the name and address of the operator or carrier;
(b) the postal address of the premises where the radioactive substance will be processed, manufactured, used or stored, or where the facilities for processing, manufacture, use or storage exist or, in the case of transport, the postal address of the transport undertaking;
(c) the date on which it is anticipated that the work with ionising radiation will commence or, if it has already commenced, a statement to that effect;
(d) a general description of the premises or place including the geographical location, meteorological, geological, hydrographic conditions and, where material, the history of the premises, except that in the case of transport a general description shall be given of either—
(i) the starting and end points of the journey and transhipment points, or
(ii) the criteria to be used for route selection;
(e) in the case of an assessment by an operator, a description of any radioactive substance on the premises which is likely to exceed any quantity or mass specified in Schedule 2 or Schedule 3, as the case may be, which description shall where practicable include details of the radionuclides present and their likely maximum quantities;
(f) in the case of an assessment by a carrier, a description of any radioactive substance which is likely to exceed any quantity or mass specified in Schedule 4 or Schedule 3, as the case may be, which description shall where practicable include details of the radionuclides present and their likely maximum quantities;
(g) except in the case of an assessment relating to transport, a plan of the premises in question and a map of the environs to a scale large enough to enable the premises and any features which could affect the general risk in an emergency to be identified;
(h) a diagram and description of any single plant or enclosed system containing more than the quantity or mass of any radioactive substance specified in Schedule 2 or Schedule 3, as the case may be, or, in the case of the transport of more than the quantity or mass of any radioactive substance specified in Schedule 4 or Schedule 3, as the case may be, the nature of the containment for the radioactive substance, the type of vehicle and the means of securing the load within or on the vehicle;
(i) those factors which could precipitate a major release of any radioactive substance and the measures to be taken to prevent or control such release and information showing the maximum quantity of radioactive substance which, in the event of a major failure of containment, would be released to the atmosphere including, in respect of premises, the identification of plant and other activities anywhere on the premises which could precipitate such release;
(j) those factors which could precipitate a smaller but continuing release of any radioactive substance and the measures to be taken to prevent or control such releases to atmosphere;
(k) those factors which could give rise to an incident involving the initiation of an unintended self-sustaining nuclear chain reaction or the loss of control of an intended self-sustaining nuclear chain reaction and, in either case, the measures to be taken to prevent or control any such incident;
(l) information concerning the management systems and staffing arrangements by which the radioactive substance is controlled and by which the procedures are controlled;
(m) except in the case of an assessment relating to transport, information about the size and distribution of the population in the vicinity of premises to which the report relates;
(n) an assessment of the area which is likely to be affected by the dispersal of any radioactive substance as a result of any radiation emergency and the period of time over which such dispersal is likely to take place;
(o) an assessment of the likely exposures to ionising radiation of any person or class of persons as a result of any radiation emergency; and
(p) an assessment of the necessity for an emergency plan to be prepared by the operator or carrier.
Sch. 5 in force at 20.9.2001, see reg. 1

SCHEDULE 6 FURTHER PARTICULARS THAT THE EXECUTIVE MAY REQUIRE
Regulation 6(5)
A further assessment and report may be required under regulation 6(5) in respect of the following matters—
(a) the analysis carried out to establish the likely consequences of any hazard, including the likely doses of ionising radiation to which members of the public might be exposed, and the probability of the occurrence of such hazard;
(b) the number of persons whose health or safety might be affected by the hazard;
(c) the management systems and staffing arrangements by which any hazard is to be or is controlled;
(d) the safety systems, procedures and monitoring systems by which any hazard is to be or is controlled;
(e) the qualifications, experience and training of staff concerned;
(f) the design, construction, operation or maintenance of any equipment (including the incorporation of adequate safety or reliability features of such equipment) which is used for the purposes of intervention or which is used to control any hazard;
(g) the design and operating documentation;
(h) the design and operation of containment and pressure systems;
(i) the protection of persons from the effects of loss of containment; and
(j) the procedures for the reporting of and learning from radiation emergencies.
Sch. 6 in force at 20.9.2001, see reg. 1

SCHEDULE 7 INFORMATION TO BE INCLUDED IN EMERGENCY PLANS
Regulations 7(2), 8(2) and 9(2)

PART I Information to be included in an operator’s emergency plan
The information referred to in regulation 7(2) is as follows—
(a) the names or positions of persons authorised to set emergency procedures in motion and the person in charge of and co-ordinating the on-site mitigatory action;
(b) the name or position of the person with responsibility for liaison with the local authority responsible for preparing the off-site emergency plan;
(c) for reasonably foreseeable conditions or events which could be significant in bringing about a radiation emergency, a description of the action which should be taken to control the conditions or events and to limit their consequences, including a description of the safety equipment and the resources available;
(d) the arrangements for limiting the risks to persons on the premises including how warnings are to be given and the actions persons are expected to take on receipt of a warning;
(e) the arrangements for providing early warning of the incident to the local authority responsible for setting the off-site emergency plan in motion, the type of information which should be contained in an initial warning and the arrangements for the provision of more detailed information as it becomes available;
(f) the arrangements for providing assistance with off-site mitigatory action; and
(g) the arrangements for emergency exposures including the dose levels which have been determined as appropriate for the purposes of putting into effect the emergency plan.
Sch. 7 Pt. I in force at 20.9.2001, see reg. 1

PART II Information to be included in a carrier’s emergency plan
The information referred to in regulation 8(2) is as follows—
(a) the names or positions of persons authorised to set emergency procedures in motion and the person in charge of and co-ordinating the mitigatory action;
(b) for reasonably foreseeable conditions or events which could be significant in bringing about a radiation emergency, a description of the action which should be taken to control the conditions or events and to limit their consequences, including a description of the safety equipment and the resources available;
(c) the arrangements for providing early warning of the incident, the type of information which should be contained in an initial warning and the arrangements for the provision of more detailed information as it becomes available; and
(d) the arrangements for emergency exposures including the dose levels which have been determined as appropriate for the purposes of putting into effect the emergency plan.
Sch. 7 Pt. II in force at 20.9.2001, see reg. 1

PART III Information to be included in an off-site emergency plan
The information referred to in regulation 9(2) is as follows—
(a) the names or positions of persons authorised to set emergency procedures in motion and of persons authorised to take charge of and co-ordinate the off-site mitigatory action;
(b) the arrangements for receiving early warning of incidents, and alert and call-out procedures;
(c) the arrangements for co-ordinating resources necessary to implement the off-site emergency plan;
(d) the arrangements for providing assistance with on-site mitigatory action;
(e) the arrangements for off-site mitigatory action;
(f) the arrangements for providing the public with specific information relating to the emergency and the behaviour which it should adopt; and
(g) the arrangements for emergency exposures including the dose levels which have been determined as appropriate for the purposes of putting into effect the emergency plan.
Sch. 7 Pt. III in force at 20.9.2001, see reg. 1

SCHEDULE 8 PRINCIPLES AND PURPOSES OF INTERVENTION
Regulations 7(4) and (5), 8(5) and (6) and 9(10) and (11)

PART I Principles to which emergency plans shall have regard
An emergency plan drawn up pursuant to regulation 7, 8 or 9 respectively shall, in so far as it applies to any radiation emergency, be drawn up having regard to the following principles—
(a) the intervention shall be undertaken only if the reduction in the detriment due to the radiation resulting from the radiation emergency is sufficient to justify the harm and costs, including the social costs, of the intervention; and
(b) the form, scale and duration of the intervention shall be carried out in such a way as to ensure that exposures to radiation are kept as low as is reasonably practicable so that the benefit of the reduction in health detriment less the detriment associated with the intervention will be maximised.
Sch. 8 Pt. I in force at 20.9.2001, see reg. 1

PART II Purposes of intervention
The purposes of intervention referred to in regulations 7(5), 8(6) and regulation 9(11) are—
(a) reducing or stopping at source direct radiation and the emission of radionuclides;
(b) reducing the transfer of radioactive substances to individuals from the environment; and
(c) reducing the exposure and organising the treatment of persons who have been subject to exposure to radiation.
Sch. 8 Pt. II in force at 20.9.2001, see reg. 1

SCHEDULE 9 PRIOR INFORMATION TO BE SUPPLIED AND MADE PUBLICLY AVAILABLE
Regulation 16(1)
1 Basic facts about radioactivity and its effects on persons and on the environment.
Sch. 9 para. 1 in force at 20.9.2001, see reg. 1
2 The various types of radiation emergency covered and their consequences for the general public and the environment.
Sch. 9 para. 2 in force at 20.9.2001, see reg. 1
3 Emergency measures envisaged to alert, protect and assist the general public in the event of a radiation emergency.
Sch. 9 para. 3 in force at 20.9.2001, see reg. 1
4 Appropriate information on action to be taken by the general public in the event of a radiation emergency.
Sch. 9 para. 4 in force at 20.9.2001, see reg. 1
5 The authority or authorities responsible for implementing the emergency measures and action referred to in paragraphs 3 and 4 above.
Sch. 9 para. 5 in force at 20.9.2001, see reg. 1

SCHEDULE 10 INFORMATION TO BE SUPPLIED IN THE EVENT OF A RADIATION EMERGENCY
Regulation 17(4)
1 Information on the type of emergency which has occurred, and, where possible, its characteristics, for example, its origin, extent and probable development.
Sch. 10 para. 1 in force at 20.9.2001, see reg. 1
2 Advice on health protection measures, which, depending on the type of emergency, might include—
(a) any restrictions on the consumption of certain foodstuffs and water supply likely to be contaminated;
(b) any basic rules on hygiene and decontamination;
(c) any recommendation to stay indoors;
(d) the distribution and use of protective substances;
(e) any evacuation arrangements;
(f) special warnings for certain population groups.
Sch. 10 para. 2 in force at 20.9.2001, see reg. 1
3 Any announcements recommending co-operation with instructions or requests by the competent authorities.
Sch. 10 para. 3 in force at 20.9.2001, see reg. 1
4 Where an occurrence which is likely to give rise to a release of radioactivity or ionising radiation has happened but no release has yet taken place, the information and advice should include the following—
(a) an invitation to tune in to radio or television;
(b) preparatory advice to establishments with particular collective responsibilities; and
(c) recommendations to occupational groups particularly affected.
Sch. 10 para. 4 in force at 20.9.2001, see reg. 1
5 If time permits, information setting out the basic facts about radioactivity and its effects on persons and on the environment.
Sch. 10 para. 5 in force at 20.9.2001, see reg. 1

SCHEDULE 11 AMENDMENT OF REGULATIONS
Regulation 21

The Fire Certificates (Special Premises) Regulations 1976
1 Paragraph 14 of Schedule 1 to the Fire Certificates (Special Premises) Regulations 1976 shall be deleted and the following substituted—

“14 Premises to which the Radiation (Emergency Preparedness and Public Information) Regulations 2001 apply by virtue of regulation 3 of those Regulations.”

.
Sch. 11 para. 1 in force at 20.9.2001, see reg. 1
S.I.1995/3163.

The Ionising Radiations Regulations 1999
2 The 1999 Regulations shall be amended in accordance with paragraphs 3 to 9.
Sch. 11 para. 2 in force at 20.9.2001, see reg. 1
3 In regulation 21(3)(i), the word “to” shall be inserted before “maintain”.
Sch. 11 para. 3 in force at 20.9.2001, see reg. 1
4 In regulation 35(1), after the words “these Regulations” there shall be inserted the words “or of the Radiation (Emergency Preparedness and Public Information) Regulations 2001.”.
Sch. 11 para. 4 in force at 20.9.2001, see reg. 1
5 After regulation 35, there shall be inserted the following regulation—

“35A Enforcement
Insofar as any provision of regulation 21 is made under section 2(2) of the European Communities Act 1972, sections—
(a) 16 to 21 (approval of codes of practice and enforcement);
(b) 23 (provisions supplementary to sections 21 and 22) and 24 (appeal against improvement or prohibition notice), so far as they relate to an improvement notice;
(c) 26 (power to indemnify inspectors); and
(d) 33 to 42 (provisions as to offences),
of the Health and Safety at Work etc. Act 1974 shall apply to that provision as if that provision had been made under section 15 of that Act.”

Sch. 11 para. 5 in force at 20.9.2001, see reg. 1
6 Paragraph (7) of regulation 36 shall be deleted and the following substituted—

“7 Where a contravention of these Regulations by any person is due to the act or default of some other person, that other person shall be guilty of the offence which would, but for any defence under this regulation available to the first-mentioned person, be constituted by the act or default.”

.
Sch. 11 para. 6 in force at 20.9.2001, see reg. 1
7 In paragraph 6 of Schedule 4, after “trainee” there shall be inserted the words “referred to in paragraphs 1 or 3”.
Sch. 11 para. 7 in force at 20.9.2001, see reg. 1
8 In paragraph 19 of Schedule 4, in place of “pursuant to regulation 11(2)” there shall be substituted “in accordance with regulation 11(1)”.
Sch. 11 para. 8 in force at 20.9.2001, see reg. 1
9 In column 1 of Schedule 8, under the entry for Ruthenium, in place of “Ru-160+”, there shall be substituted “Ru-106+”.
Sch. 11 para. 9 in force at 20.9.2001, see reg. 1

The Reporting of Injuries, Diseases and Dangerous Occurrences Regulations 1995
10 In Schedule 7 of the Reporting of Injuries, Diseases and Dangerous Occurrences Regulations 1995—
(a) “The Ionising Radiations Regulations 1985” shall be deleted and “The Ionising Radiations Regulations 1999” substituted; and
(b) after the final entry there shall be added: “The Radiation (Emergency Preparedness and Public Information) Regulations 2001.”.
Sch. 11 para. 10 in force at 20.9.2001, see reg. 1
S.I.1985/1333, revoked (subject to a saving) by regulation 41 of the Ionising Radiations Regulations 1999.

(This note is not part of the Regulations)
The Regulations implement as respects Great Britain Title IX, Section 1 (Intervention in cases of radiological emergency) of Council Directive 96/29/Euratom (OJNo. L159, 29.6.96, p.1) laying down basic safety standards for the protection of the health of workers and the general public against the dangers arising from ionising radiation and impose requirements for that purpose on operators of premises where radioactive substances are present (in quantities exceeding specified thresholds). They also impose requirements on carriers transporting radioactive substances (in quantities exceeding specified thresholds) by rail or conveying them through public places, with the exception of carriers conveying radioactive substances by rail, road, inland waterway, sea or air or by means of a pipeline or similar means.
The competent authority for the purposes of the Regulations is the Health and Safety Executive (“the Executive”).
The Regulations—
(a) impose a duty on the operator and carrier to make an assessment as to hazard identification and risk evaluation and, where the assessment reveals a radiation risk, to take all reasonably practicable steps to prevent a radiation accident or limit the consequences should such an accident occur (regulation 4);
(b) impose a duty on the operator and carrier to send the Executive a report of an assessment containing specified matters at specified times and empower the Executive to require a detailed assessment of such further particulars as it may reasonably require (regulation 6 and Schedules 5 and 6);
(c) impose a duty on the operator and carrier to make a further assessment following a major change to the work with ionising radiation or within 3 years of the date of the last assessment, unless there has been no change of circumstances which would affect the last report of the assessment, and send the Executive a report of that further assessment (regulations 5 and 6);
(d) where an assessment reveals a reasonably foreseeable radiation emergency arising, impose a duty on the operator or carrier (as the case may be) and, in the case of an operator, the local authority in whose area the premises in question are situated, to prepare emergency plans (regulations 7, 8 and 9 and Schedules 7 and 8);
(e) require operators, carriers and local authorities to review, revise and test emergency plans at suitable intervals not exceeding 3 years (regulation 10);
(f) make provision as to consultation and co-operation by operators, carriers, employers and local authorities (regulation 11);
(g) make provision as to charging by local authorities for performing their functions under the Regulations in relation to emergency plans (regulation 12);
(h) in the event of the occurrence of a radiation emergency or of an event which could reasonably be expected to lead to such an emergency, make provision as to the implementation of emergency plans, and, in the event of the occurrence of a radiation emergency, the making of both provisional and final assessments as to the circumstances and consequences of the emergency (regulation 13);
(i) where an emergency plan provides for the possibility of an employee receiving an emergency exposure, impose a duty on the employer to undertake specified arrangements for employees who may be subject to exposures, such as dose assessments, medical surveillance and the determination of appropriate dose levels, and impose further duties on employers in the event that an emergency plan is implemented (regulation 14);
(j) impose requirements on operators and carriers, where an operator or carrier carries out work with ionising radiation which could give rise to a reasonably foreseeable radiation emergency, and on local authorities, where there has been a radiation emergency in their area, to supply specified information to the public (regulations 16 and 17 and Schedules 9 and 10);
(k) empower the Secretary of State for Defence to issue certificates of exemption to persons from specified classes in the interests of national security (regulation 18);
(l) make certain amendments to the Fire Certificates (Special Premises) Regulations 1976, the Ionising Radiations Regulations 1985, the Reporting of Injuries, Diseases and Dangerous Occurrences Regulations 1995 and the Ionising Radiations Regulations 1999 and, subject to savings, revoke the Public Information for Radiation Emergencies Regulations 1992 (regulations 21 and 22); and
(m) contain transitional provisions (regulation 20).
A copy of the regulatory impact assessment prepared in respect of these Regulations can be obtained from the Health and Safety Executive, Economic Adviser’s Unit, Rose Court, 2 Southwark Bridge, London SE1 9HS. A copy has been placed in the library of each House of Parliament.