SCHEDULE 3 (Annex III to the high-speed Directive)
ESSENTIAL REQUIREMENTS

Requirements specific to each subsystem
2.7.2 Reliability and availability
The operation and maintenance periods, the training and qualifications of the maintenance staff and the quality assurance system set up by the operators concerned in the maintenance centres must be such as to ensure a high level of system reliability and availability.