6 Revocation of regulation 21A of the Statutory Maternity Pay (General) Regulations
Regulation 21A of the Statutory Maternity Pay (General) Regulations (effect of statutory maternity pay on incapacity benefit) is hereby revoked.
Regulation 21A was inserted by regulation 3 of S.I.1988/532; relevant amending instruments are S.I.1990/622 and 1995/829.