4 Amendment of the Notification of Installations Handling Hazardous Substances Regulations 1982
Regulation 7 of the principal Regulations shall be amended by inserting after paragraph (1) the following paragraph—

“1A Paragraph (1) shall not apply where ammonium nitrate or a mixture containing ammonium nitrate is the hazardous substance by reason of which the activity is notifiable”

.