THE SCHEDULE LENGTH OF THE TRUNK ROAD CEASING TO BE A TRUNK ROAD
The length of the trunk road ceasing to be a trunk road is situated between the junction with Woodthorpe Drive, Sherwood, in the City of Nottingham (marked “A” on the plan) and the junction with the A614 Trunk Road at Leapool, in the District of Gedling, in the County of Nottinghamshire marked “B” on the plan). It is shown by broad black dashes on the plan and is approximately 10km in length.