2 Interpretation
1 In these Regulations—
“the 1974 Act” means the Health and Safety at Work etc. Act 1974;
“the 1978 Order” means the Health and Safety at Work (Northern Ireland) Order 1978; and
“the principal Regulations” means the Nuclear Industries Security Regulations 2003.
1974 c. 37. Most of the provisions of the 1974 Act applied to the principal Regulations (by regulation 23(1) of the principal Regulations) have been modified by S.I.1992/3073, regulation 28 and Schedule 6, paragraph 1.
S.I.1978/1039 (N.I.9). Most of the provisions of the 1978 Order applied to the principal Regulations (by regulation 24(1) of the principal Regulations) have been modified by S.I.1992/3073, regulation 28 and Schedule 6, paragraph 2.
S.I.2003/403.
2 The following expressions have the same meaning as in the principal Regulations—
“approved carrier”;
“approved security plan”;
“approved transport security statement”;
“carrier”;
“relevant personnel”;
“responsible person”;
“security plan”;
“transport”;
“transport plan”; and
“transport security statement”.