PART 3 WATER SUPPLY LICENSING

7 Amendment to the Food Safety Act 1990
For section 55 of the Food Safety Act 1990 , there is substituted—

“55 Water supply: England and Wales
Nothing in Part 2 of this Act or any regulations or order made under that Part shall apply in relation to the supply of water to any premises, whether—
(a) by a water undertaker;
(b) by a licensed water supplier (within the meaning of the Water Industry Act 1991); or
(c) by means of a private supply (within the meaning of Part 3 of that Act).”

.
1990 c. 16; section 55(2) to (6) of that Act was repealed by section 3 of and Schedule 3 to the Water Consolidation (Consequential Provisions) Act 1991 (c. 60).