2 Exemptions
1 Subject to paragraph 2, exemption is granted from subsection (1) of section 16A of the 1993 Act to every operator of a network, station or light maintenance depot in respect of any railway facility.
2 The exemption in paragraph 1 does not apply to any person specified in Schedule 1.