Amendment of the Water Industry Act 1991
2. (1) The Water Industry Act 1991 is amended as follows.
Sections 7(5) and 158(9) were amended by regulation 2 of the Water and Sewerage Undertakers (Inset Appointments) Regulations 2000 (S.I. 2000/1842).
(2) In section 7(5)(a)(ii) (continuity of appointments, replacement appointments etc.), “50 megalitres” is substituted for “100 megalitres”.
(3) In section 158(9)(b) (powers to lay pipes in streets), “50 megalitres” is substituted for “100 megalitres”.