SCHEDULE

PART 1 MODIFICATIONS OF PUBLIC GENERAL ACTS

The House of Commons Disqualification Act 1975 (c. 24)
1 In Part 2 of Schedule 1 to the House of Commons Disqualification Act 1975 (bodies of which all members are disqualified), insert at the appropriate place–

“The Water Industry Commission for Scotland.”

.
There have been amendments to Schedule 1 which are not relevant to this Order.