3 Amendments to the Optical Regulations
1 In regulation 1(2) of the Optical Regulations (citation, commencement and interpretation), in the definition of “NHS sight test fee”—
(a) for “£49.19” substitute “£50.77”; and
(b) for “£17.82” substitute “£18.39”.
2 In regulation 8(3)(l)(ii)(eligibility-supply of optical appliances) for “£14,600”, substitute “£15,050”.
3 In regulation 19 (redemption value of voucher for replacement or repair)—
(a) in paragraph (1)(b), for “£46.80” substitute “£48.00”; and
(b) in paragraph (3), for “£12.10” substitute “£12.40”.