6 1 The Local Authority Remands (Electronic Monitoring of Conditions) (Responsible Officer) Order 2002 is amended as follows.
S.I.2002/845.
2 In article 3, for the words after “Services Limited” to the end there is substituted the words “PO Box 45, Norwich, NR3 1BF”.
3 In article 4 for the words “Securicor Custodial Services Limited” there is substituted the words “Securicor Justice Services Limited”.
4 Article 5 is omitted.
5 In article 6(2) and (3) respectively, for the words “articles 3 to 5” there is substituted the words “articles 3 and 4”.
6 For Schedules 1, 2 and 3 to that Order there are substituted the Schedules set out in Schedules 1 and 2 to this Order.