2006 No. 2647
WEIGHTS AND MEASURES
The Measuring Instruments (Gas Meters) Regulations 2006
Made 1st October 2006
Laid before Parliament 5th October 2006
Coming into force 30th October 2006
The Secretary of State, who is a Minister designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to, and for purposes ancillary to, the regulation of specifications, construction, placing on the market and use of articles, instruments, containers or other equipment intended for weighing, measuring or testing, makes the following Regulations in exercise of the powers conferred by section 2(2)—
1972 c.68.
S.I. 1975/427.