1 Citation and commencement
This Order may be cited as the Road Traffic (Permitted Parking Area and Special Parking Area) (County of Warwickshire) (District of Warwick) Order 2007 and shall come into force on 6th August 2007.

2 Interpretation
In this Order—
1 “the 1984 Act” means the Road Traffic Regulation Act 1984;
1984 c.27. Section 32(4)(a) was amended by the Local Government Act 1985 (c.51) section 102 and Schedule 17. Section 45(1) was substituted by the New Roads and Street Works Act 1991 (c.22) Schedule 8, paragraph 44. Sections 46(1A), 63A and 101(4A) and (5A) were inserted by the Road Traffic Act 1991, sections 64(2), 44(1) and 67(4) and (6). Section 102(8) was amended by the Road Traffic Act 1991, section 68(3). Section 121A was inserted by the New Roads and Street Works Act 1991 (c.22), section 168(1) and Schedule 8, paragraph 70.
2 “the 1991 Act” means the Road Traffic Act 1991; and
3 “the parking area” means the area designated as a permitted parking area and as a special parking area by article 4 of this Order.

3 Application
This Order applies to the whole of the district of Warwick except—
(a) the entire length of the M40, within the district, including its on and off slip roads;
(b) the entire length of the A46, within the district, including its on and off slip roads;
(c) the section of the A425 from its junction with Myton Road, to its junction with the A452 at Bishops Tachbrook;
(d) the section of the A429 from Fisher’s Bridge, to the district boundary with Stratford on Avon district;
(e) the section of the A452 from Junction 13 to Junction 14 on the M40 motorway;
(f) the section of the A4177 from its junction with the A4141 at Five Ways roundabout, north-eastwards to the county boundary with Solihull Metropolitan Borough Council; and
(g) the section of Siskin Parkway West, from its junction with Siskin Drive east then south-eastwards for a distance of 838 metres.

4 Designation of permitted parking area and special parking area
The Secretary of State designates the area to which this Order applies as—
(a) a permitted parking area; and
(b) a special parking area.

5 Modification and application of Part II of the 1991 Act
Sections 66, 69 to 74, 78, 79 and 82 of, and Schedule 6 to, the 1991 Act shall apply in relation to the parking area and as so applied shall have effect subject to the modifications specified in Schedule 1 to this Order.

6 Modification of other provisions
The 1984 Act shall be modified in relation to the parking area as specified in Schedule 2 to this Order.
Signed by authority of the Secretary of State
Rosie Winterton Minister of State Department for Transport 5th July 2007