2007 No. 292
ENERGY conservation
The Guarantees of Origin of Electricity Produced from High-efficiency Cogeneration Regulations 2007 (revoked)
Regulations revoked (1.1.2024) by Retained EU Law (Revocation and Reform) Act 2023 (c. 28), ss. 1(1), 22(3), Sch. 1 Pt. 1 (with s. 1(3)(4)); S.I. 2023/1363, reg. 2
Made 5th February 2007
Laid before Parliament 7th February 2007
Coming into force 28th February 2007

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1 Citation, commencement and extent
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Issue of CHPGOs ...
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Request to issue CHPGOs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Issue and content of CHPGOs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Replacement CHPGOs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Transfer of CHPGOs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Revocation of CHPGOs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Charging
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Recognition of CHPGOs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 Information to be supplied with a request for a CHPGO
Regulation 4(3)
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 Information to be contained in a CHPGO
Regulations 5(3) and 10(1) and (3)
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 Methodology for determining the efficiency of the cogeneration process
Regulation 2 and paragraphs 5 and 6 of Schedule 2

1 Values to be used
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 High-efficiency cogeneration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Calculation of primary energy savings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Calculations of primary energy savings using alternative calculation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Efficiency reference values for separate production of heat and electricity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 General principles for the calculation of electricity from cogeneration
Regulation 2 and paragraphs 3 and 4 of Schedule 3

General principles
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Cogeneration technologies covered by these Regulations
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .