SCHEDULE 1 Air quality standards

PART 4 Target values and long-term objectives for ozone
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (11.6.2010) by The Air Quality Standards Regulations 2010 (S.I. 2010/1001), regs. 1(1), 33