EXPLANATORY NOTE
(This note is not part of the Order)
This Order grants an exemption from the requirements of section 4(1)(a) of the Electricity Act 1989 (which prohibits the generation of electricity for supply without a licence) to Gunfleet Sands Limited in respect of a wind farm to be located on Gunfleet Sand, a sand bank some 7 kilometres south east of Clacton-on-Sea, Essex.
A regulatory impact assessment in respect of exemptions from the requirements of section 4(1)(a) of the Electricity Act 1989 was prepared in 2001 and can be obtained from the Energy Markets Unit, Bay 220, Department of Trade and Industry, 1 Victoria Street, London, SW1H 0ET. Copies have been placed in the libraries of both Houses of Parliament.