PART 3 Amendment of the National Health Service Pension Scheme Regulations 2008

16 Amendment of regulation 2.A.10
1 Regulation 2.A.10 (meaning of “reckonable pay”: general) shall be amended as follows.
2 In paragraph (2), after “2.A.14” insert “, 2.K.7 and 2.K.9 to 2.K.11”.
3 In the definition of “IRP” in paragraph (3), after “paragraph” insert “(4),”.
4 After sub-paragraph (10), insert—

“11 For the purposes of this regulation, pensionable service does not include—
(a) any period of pensionable service that a member is entitled to count under Chapter 2.F unless the transfer value payment in respect of that service is accepted from a corresponding 2008 scheme;
(b) any period of pensionable service that a 2008 Section Optant is entitled to count under—
(i) regulation 2.K.3;
(ii) regulation 2.K.5, or
(iii) regulation 2.K.13.”

.