11 Amendment of Schedule 3
In Schedule 3 (conformity assessment procedures applicable to a listed product) after Part 4 (ballasts for fluorescent lighting), add—

“Part 5

Other Listed Products
1 The conformity assessment procedure or procedures applicable to listed product that is not included in Parts 2, 3 or 4 of this Schedule are set out in the table below.
Table of other listed products and applicable procedures
Type of listed product	Applicable procedures
An external power supply	The procedure specified in Article 4 of the external power supplies Regulation
Electrical and electronic household and office equipment	The procedure specified in Article 4 of the standby Regulation
A simple set-top box	The procedure specified in Article 5 of the SSTB Regulation
A fluorescent lamp without integrated ballast, a high intensity discharge lamp or a ballast or luminaire able to operate such lamps	The procedure specified in Article 4 of the tertiary lighting Regulation
A non-directional household lamp	The procedure specified in Article 4 of the non-directional household lamps Regulation
A television	The procedure specified in Article 4 of the televisions Regulation
A glandless standalone circulator or glandless circulator integrated in a product	The procedure specified in Article 4 of the glandless circulators Regulation
A motor	The procedure specified in Article 4 of the electric motors Regulation
A household refrigerating appliance	The procedure specified in Article 4 of the household refrigerating appliances Regulation”

.