2009 No. 782
Fire Precautions, England
The Fire Precautions (Sub-surface Railway Stations) (England) Regulations 2009
Made 24th March 2009
Laid before Parliament 31st March 2009
Coming into force 1st October 2009

These Regulations are made in exercise of the powers conferred by article 24 of the Regulatory Reform (Fire Safety) Order 2005.
S.I. 2005/1541; amended by S.I. 2006/484.
In accordance with article 24(4) of that Order the Secretary of State has consulted such persons or bodies of persons as appeared to the Secretary of State to be appropriate.
The Secretary of State makes the following Regulations: