6 Social Fund Cold Weather Payments (General) Regulations 1988
In regulation 1A of the Social Fund Cold Weather (General) Regulations 1988 (prescribed description of persons), for the definition of “independent hospital” in paragraph (3)(b) substitute—

““independent hospital”—
(i) in England, means a hospital as defined by section 275 of the National Health Service Act 2006 that is not a health service hospital as defined by that section;
(ii) in Wales, has the meaning assigned to it by section 2 of the Care Standards Act 2000; and
(iii) in Scotland, means an independent healthcare service as defined in section 2(5)(a) and (b) of the Regulation of Care (Scotland) Act 2001;”

.
S.I.1988/1724. The definition of “independent hospital” was inserted by S.I. 2005/2687, regulation 9(1) and (2)(b).