3 In column 2 of the Schedule, opposite the entry in column 1 for Victoria and Albert Museum omit—
(a) “Theatre Museum: National Museum of Performing Arts Russell Street Covent Garden London WC2 7PR”; and
(b) “Wellington Museum Apsley House 149 Piccadilly Hyde Park Corner London W1J 7NT”.