PART 1 The Building Regulations 2010

27 Schedule 1 to the 2010 Regulations - Requirements
In Schedule 1 to the 2010 Regulations—
(a) for Part K (protection from falling, collision and impact), substitute Part K set out in Schedule 2 to these Regulations; and
(b) omit Part N (Glazing-safety in relation to impact, opening and cleaning).