2012 No. 671
Electricity
The Feed-in Tariffs (Specified Maximum Capacity and Functions) (Amendment) Order 2012
Made 5th March 2012
Laid before Parliament 8th March 2012
Coming into force 1st April 2012

The Secretary of State, in exercise of the powers conferred by sections 43(3)(a) and 104(2) of the Energy Act 2008, makes the following Order:
2008 c.32.