SCHEDULE 2 Remissions

3 Remission
(1) An applicant must apply to the Lord Chancellor for a fee remission at the time when the fee would otherwise be payable.
(2) Where the Lord Chancellor refuses a fee remission, the fee must be paid within such period as may be notified in writing by the Lord Chancellor to the applicant or applicants as the case may be.