18 Ongoing obligations: emissions from biomass
After regulation 34 insert—

“34A Ongoing obligations: emissions from biomass
Participants generating heat from solid biomass in an accredited RHI installation in respect of which an RHI emission certificate is required must—
(a) use fuel of a type specified in the RHI emission certificate;
(b) use fuel with a moisture content which is no greater than the maximum moisture content specified in the RHI emission certificate; and
(c) operate the accredited RHI installation in accordance with the manufacturer’s instructions for that plant in relation to the control of emissions of PM and NOx.”

.