SCHEDULE The General Optical Council (Fitness to Practise) Rules 2013

PART 7 PROCEDURE AND ORDER OF PROCEEDINGS

50 Written decision
The Fitness to Practise Committee must give the parties a written record of its decisions under these Rules, together with any reasons which have been given for any decision made.