PART 2

Schedule 3 (The Prescribed Construction and Use Requirements)
8. (1) In Schedule 3, Part II, in paragraph 4—
(a) for “battery”, substitute “battery, including its ventilation and any connected switches or fuses”; and
(b) after “load securing devices” add—

“;
electrical connections between a vehicle and its trailer;
the supplementary restraint system, including safety belt pre-tensioners, safety belt load limiters and air bags;
the electronic stability control”.