2014 No. 952
Energy
The Energy Efficiency (Building Renovation and Reporting) Regulations 2014 (revoked)
Regulations revoked (1.1.2024) by Retained EU Law (Revocation and Reform) Act 2023 (c. 28), ss. 1(1), 22(3), Sch. 1 Pt. 1 (with s. 1(3)(4)); S.I. 2023/1363, reg. 2
Made 8th April 2014
Laid before Parliament 9th April 2014
Coming into force in accordance with regulation 1

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1 Citation and commencement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Building renovation strategy
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Annual reports and statistics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 National energy efficiency action plans
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5A Long-term renovation strategy
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5B Financial measure for energy efficiency improvements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5C Information via advisory tools
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Duty to review
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .