2 Dissolution of NHS trust
1 The West Middlesex University Hospital National Health Service Trust is dissolved.
2 The West Middlesex University Hospital National Health Service Trust (Establishment) Order 1992 is revoked.
See S.I. 1992/2585, amended by S.I. 1996/985.