2 Amendments to the Safety of Sports Grounds (Designation) Order 2015
In Schedule 1 to the Safety of Sports Grounds (Designation) Order 2015 (sports grounds designated under article 2(1)), omit the entries for—
(a) Talbot Athletic Ground, occupied by Aberavon Rugby Football Club;
(b) Crane Park, occupied by Camborne Rugby Football Club; and
(c) The Recreation Ground, occupied by Redruth Rugby Football Club.
S.I. 2015/661; schedule 1 was amended by the Safety of Sports Grounds (Designation) (No. 2) Order 2015 S.I. 2015/1374 and the Safety of Sports Grounds (Designation) (Amendment) Order 2015 S.I. 2015/1556.