2015 No. 2059
Professional Qualifications
The European Union (Recognition of Professional Qualifications) Regulations 2015 (revoked)
Regulations revoked (1.12.2023) by Professional Qualifications Act 2022 (c. 20), ss. 5(1), 21(4)(a) (with s. 12); S.I. 2023/1081, reg. 3(1) (with Sch.)
Made 17th December 2015
Laid before Parliament 21st December 2015
Coming into force 18th January 2016

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 1 General Provisions

1 Citation and commencement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Competent authorities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Functions of competent authorities in the United Kingdom
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Regulated profession, regulated education and training and applicants
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Professional qualifications and evidence of formal qualifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Partial access
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Procedure applicable to partial access applications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Freedom to Provide Services on a Temporary and Occasional Basis

12 Right to practise in the United Kingdom
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

14 Exemptions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

15 Declaration and documents to be provided on the first provision of service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

16
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

17
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

18 Title under which professional services are provided
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

19 Checks for professions having public health or safety implications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

20
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

21
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

22
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

23
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

24 Non-compliance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

25 Administrative cooperation and service provision
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

26 Information to be given to a recipient of professional services or service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Applications for Authorisation

CHAPTER 1 General System for the Recognition of Training

27 Levels of qualification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

28 Equal treatment of qualifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29 Conditions for recognition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

30 Compensation measures - adaptation periods and aptitude tests
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

31
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

32 Conditions for compensation measures
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

33
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

34
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 2 Recognition of Professional Experience

35 Automatic Recognition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 3 United Kingdom Certificates of Experience

36 Issue and revocation of Certificates of Experience
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

37
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER 4 General Provisions

38 Documentation and formalities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

39
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

40
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

41
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

42 Decisions of competent authorities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

43 Use of professional titles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 4 European Professional Card

44 Functions of designated competent authorities in the United Kingdom in relation to an application for a European Professional Card
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

45 Processing and access to data regarding the European Professional Card
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

46
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

47
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

48
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

49
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

50 Issue of European Professional Card for temporary and occasional provision of service other than those having public health or safety implications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

51 Issue of European Professional Card for temporary and occasional provision of services having public health or safety implications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

52
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

53
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

54
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

55
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

56 Issue of European Professional Card for establishment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

57
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

58
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

59
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

60
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

61
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

62 Decision on issue or revocation of the European Professional Card
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

63
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 5 Automatic recognition on the basis of common training principles

64 Common training framework
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

65 Common training test
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 6 Supplementary

66 Exchange of information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

67 Alert mechanism
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

68 Appeals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

69 Use of academic titles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

70 Assistance centre
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

71 Information from competent authorities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

72 Review
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

73 Consequential amendments
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

74
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

75
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

76
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

77
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

78 Transitional and saving provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

79 Revocation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

80
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 Regulated Professions
Regulations 3 and 8

PART 1 Professions Regulated by Law or Public Authority
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Professions Regulated by Professional Bodies Incorporated by Royal Charter
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Regulated Professions Under Regulation 35
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 4 Sectoral Professions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 Regulated Professions Having Public Health or Safety Implications for the purposes of regulations 19 to 23 and 51 to 55.
Regulation 2(6)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 Professions in Respect of which the Right of the Applicant to Choose Between an Adaptation Period and an Aptitude Test is Displaced
Regulation 34

PART 1 Professions Under Regulation 34(a)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Professions Under Regulation 34(b)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 Activities Referred to in Lists I, II and III of Annex IV of the Directive
Regulation 3
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 5 Appeal Bodies
Regulation 68
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 6 Revocation Schedule
Regulation 80
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .