PART 3 Amendments to the Electricity and Gas (Market Integrity and Transparency) (Enforcement etc.) Regulations 2013

13 Power of Authority to impose penalty
1 In regulation 26(1)—
(a) at the end of sub-paragraph (a) omit “or”;
(b) at the end of sub-paragraph (b), for “,” substitute “; or”;
(c) after sub-paragraph (b) insert the following sub-paragraph—

“(c) has failed to comply with a regulation 39 requirement,”

.
2 In regulation 26(2), for “or a requirement imposed by or under regulation 8” substitute “, a requirement imposed by or under regulation 8 or a regulation 39 requirement”.