PART 2 Amendments to the Renewable Heat Incentive Scheme Regulations 2011

4 Amendment to regulation 13 (certification for installation of Microgeneration heating equipment)
For regulation 13(1)(b) substitute—

“(b) a scheme where—
(i) installers are certified to that scheme’s standards by a certification body or organisation accredited to EN 45011 or EN ISO/IEC 17065:2012;
The ISBN for the English language version of this standard is ISBN 0580294153. This standard is published by the British Standards Institution and copies can be obtained at www.bsigroup.com.
The ISBN for the English language version of this standard is ISBN 9780580784729. This standard is published by the British Standards Institution and copies can be obtained at www.bsigroup.com.
(ii) the plant is installed in accordance with the installation requirements applicable to the plant under that scheme on the plant’s first commissioning date and which are equivalent to a relevant installation standard; and
(iii) that scheme is equivalent to the Microgeneration Certification Scheme.”

.