PART 3 Amendment of the PDS Regulations

24 Amendment of Schedule 2A to the PDS Regulations
In Schedule 2A to the PDS Regulations (provision of services where a contractor has elected to enter into a prototype agreement), after paragraph (6), insert—

“7 This Schedule does not apply where the contractor is a CDS prototype contractor.”

.
Schedule 2A was inserted by S.I. 2015/1728.