6 Amendment of regulation 8 (interpretation: regulated facility and class of regulated facility)
1 In regulation 8(1), at the end of sub-paragraph (i) add—

“(j) a flood risk activity”

.
Regulation 8(1) was amended by S.I. 2013/390.
2 In regulation 8(2), at the end of sub-paragraph (c) add—

“(d) an excluded flood risk activity”

.
3 In regulation 8(4), at the end of sub-paragraph (f) add—

“(g) a flood risk activity”

.
Regulation 8(4) was amended by S.I. 2013/390.