21 Offshore Combustion Installations (Pollution Prevention and Control) Regulations 2013
In regulation 2(1) of the Offshore Combustion Installations (Pollution Prevention and Control) Regulations 2013 (interpretation), in paragraph (b) of the definition of “carbon dioxide storage or unloading platform”, for “Secretary of State” substitute “Oil and Gas Authority”.
S.I. 2013/971.