PART 4 Combined and multiple operating licences – application fees and annual fees

Application fee for combined operating licence
19. Subject to regulations 20, 21 and 25 to 28, the application fee for a combined operating licence is the aggregate of—
(a) the application fee which is the highest of those payable for the different kinds of licence to which the combined licence relates; and
(b) 25 per cent of each other application fee payable for the licences to which the combined licence relates.

Reg. 19 in force at 6.4.2017, see reg. 1(2)