3 Amendment to article 4 (application of this Chapter)
1 Article 4 is amended as follows.
2 In paragraph (2)(b)—
(a) at the end of paragraph (ii), omit “or”;
(b) at the end of paragraph (iii), insert “; or”;
(c) after paragraph (iii), insert—

“(iv) article 7B applies to the installation.”

.