SCHEDULE Amendments relating to the London Fire Commissioner

14 Modification and amendment of the Local Government Pension Scheme Regulations 2013
(1) The Local Government Pension Scheme Regulations 2013 are modified in accordance with sub-paragraph (2) and amended in accordance with sub-paragraph (3).
S.I. 2013/2356.
(2) Regulation 64 (special circumstances where revised actuarial valuations and certificates must be obtained) is to be read as if after paragraph (8) there were inserted—

“8A Paragraph (8B) applies where the exiting employer is the London Fire and Emergency Planning Authority and the liabilities of the fund in respect of benefits due to the London Fire and Emergency Planning Authority’s current and former employees (or those of any predecessor authority) have been or are to be transferred to the London Fire Commissioner under a transfer scheme made under section 10 of the Policing and Crime Act 2017.
8B Where this paragraph applies, no exit payment is due under paragraph (1) and paragraph (2) does not apply.”

.
Sub-paragraph (1) was substituted by regulations 2 and 22(a) of S.I. 2015/755, and sub-paragraphs (2A), (2B) and (2C) were inserted by regulations 2 and 22(b) of S.I. 2015/755. There are other amendments which are not relevant to these Regulations.
(3) In the table in paragraph 4 of Part 2 of the Schedule 3 (pension funds) after “An employee of the Greater London Authority” insert “An employee of the London Fire Commissioner”.
There have been amendments to the table which are not relevant to these Regulations.