SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWAGE UNDERTAKERS

Protective works to buildings
5 The undertaker, in the case of the powers conferred by article 18 (protective work to buildings), must exercise those powers so as not to obstruct or render less convenient the access to any apparatus.