1 Citation and commencement
1 This Order may be cited as the Offshore Installations (Safety Zones) (No. 2) Order 2019.
2 This Order comes into force on 21st August 2019 except for article 2(2) which comes into force as provided in article 2(3).
Art. 1 in force at 21.8.2019, see art. 1(2)

2 Establishment of safety zones
1 A safety zone is established around each installation specified in column 1 of Part 1 of the Schedule (being an installation stationed in waters to which subsection (7) of section 21 of the Petroleum Act 1987 applies) having a radius of five hundred metres, as respects that installation, from the point which has the co-ordinates of latitude and longitude according to the World Geodetic System 1984 specified in columns 2 and 3 of Part 1 of the Schedule.
The World Geodetic System 1984 (“WGS 84”) defines a reference frame for the earth, for use in geodesy and navigation. It was developed by the United States' National Geospatial-Intelligence Agency and is maintained by it. WGS-84 is defined at paragraph 2.1 of the United States' National Imagery and Mapping Agency Technical Report TR8350.2, third edition, amendment 1 of 3rd January 2000 entitled “Department of Defense World Geodetic System 1984” (http://earth-info.nga.mil/GandG/publications/tr8350.2/wgs84fin.pdf).
2 A safety zone is established around the installation specified in column 1 of Part 2 of the Schedule (being an installation to be stationed in waters to which subsection (7) of section 21 of the Petroleum Act 1987 applies) having a radius of five hundred metres, as respects that installation, from the point which has the co-ordinates of latitude and longitude according to the World Geodetic System 1984 specified in columns 2 and 3 of Part 2 of the Schedule.
3 Paragraph (2) comes into force, as respects each installation—
(a) on 21st August 2019, where the installation arrives at its station before that date; and
(b) when the installation arrives at its station, in any other case.
Art. 2(1)(3) in force at 21.8.2019, see art. 1(2)
Art. 2(2) comes into force in accordance with art. 2(3)

3 Amendment of the Offshore Installations (Safety Zones) Order 2007
In Schedule 1 to the Offshore Installations (Safety Zones) Order 2007 , omit the entry related to Burghley Wellhead 1, Block 16/22, Burghley Field.
Art. 3 in force at 21.8.2019, see art. 1(2)
S.I. 2007/41.

4 Amendment of the Offshore Installations (Safety Zones) Order 2018
In Part 2 of the Schedule to the Offshore Installations (Safety Zones) Order 2018 , omit the entry related to Well (P40) (SM7A), Block 9/18b and 19/19a, South Maclure Field.
Art. 4 in force at 21.8.2019, see art. 1(2)
S.I. 2018/807.
Signed by the authority of the Secretary of State for Work and Pensions
Justin Tomlinson Minister of State Department for Work and Pensions