SCHEDULE INSTALLATIONS
Article 2

PART 1 Installations stationed at the time the Order is made
Table 1
(1) Name or other designation	(2) Latitude	(3) Longitude
Well (P40) (SM7A), Block 19/19a, Ballindalloch Field	59°20.449'N	01°37.398'E
Vorlich North Wellhead, Block 30/1c, Vorlich Field	56°52.068'N	02°04.335'E
Storr Drill Centre, Block 9/19b, Beryl Field	59°22.731'N	01°40.679'E
Sch. Pt. 1 in force at 21.8.2019, see art. 1(2)

PART 2 Installations not stationed at the time the Order is made
Table 2
(1) Name or other designation	(2) Latitude	(3) Longitude
Arran North Drill Centre, Block 23/16b, Arran Field	57°28.91'N	02°03.00'E
Arran South Drill Centre, Block 23/16b, Arran Field	57°28.23'N	02°06.94'E
Well WPOZ, Block 16/06a, West Brae Field	58°47.85'N	01°08.07'E
Well (P41) (SM7C), Block 19/19a, Ballindalloch Field	59°20.224'N	01°35.639'E
Sch. Pt. 2 in force at 21.8.2019, see art. 1(2)