SCHEDULE Amendment of the 2016 Regulations

23 Amendment of regulation 25 of the 2016 Regulations (defective equipment)
(1) Regulation 25 of the 2016 Regulations (defective equipment) is amended as follows.
(2) In paragraph (1)—
(a) in sub-paragraph (a), after “from the” insert “ United Kingdom ”; and
(b) in sub-paragraph (b), after “equipment on the” insert “ United Kingdom ”.
(3) In paragraph (4), in the definition of “defective equipment” after “MSN 1874” insert “ Amendment 3 ”.
Sch. para. 23 in force at 31.12.2020 on IP completion day (in accordance with 2020 c. 1, Sch. 5 para. 1(1)), see reg. 1(1)