PART 2 Amendment of primary legislation

16
1 Section 8G (grounds for certification) is amended as follows.
2 In subsection (1)—
(a) in paragraph (a)—
(i) omit “preliminary”;
(ii) for “an applicant should be certified” substitute “ to certify an applicant ”;
(b) omit paragraph (b).
3 In subsection (2)—
(a) omit “decide that the applicant should be certified, or”;
(b) omit “six”.
4 Omit subsection (6).
5 In subsection (7)(b), for the words from “requirement” to the end substitute—

“requirement—
(i) in accordance with Article 36 of the Gas Directive (new infrastructure) before IP completion day and remains entitled to the benefit of it, or
Words in reg. 16(5) substituted (15.9.2020) by The Electricity and Gas etc. (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1016), regs. 1(2), 3(5)(a)
(ii) on the basis set out in Article 36(1) to (3) and (6) of the Gas Directive and remains entitled to the benefit of it.”

.
6 In subsection (9)—
(a) omit paragraph (a);
(b) in paragraph (b)—
(i) omit “must not decide that the applicant should be certified, and”;
(ii) omit “or any other EEA state”;
(c) omit paragraph (c).
7 After subsection (9) insert—

“(10) For the purposes of subsection (4), Article 9(9) of the Gas Directive is to be treated as if the comparison with the provisions of Chapter 4 of the Gas Directive were a comparison with the provisions of Chapter 4 as they applied in relation to a member State immediately before IP completion day.
Words in reg. 16(7) substituted (15.9.2020) by The Electricity and Gas etc. (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1016), regs. 1(2), 3(5)(b)(i)
(11) The references in subsection (5) to Article 14(1) and (2) of the Gas Directive are to be treated as references to those provisions with the following modifications—
(a) Article 14(1) is to be read as if the second and third sentences were omitted;
Words in reg. 16(7) substituted (15.9.2020) by The Electricity and Gas etc. (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1016), regs. 1(2), 3(5)(b)(ii)
(b) Article 14(2)(b) is to be read as if after “Article 13” there were inserted—

“as implemented in relation to Great Britain immediately before IP completion day, disregarding for this purpose—
(i) paragraph 2,
(ii) paragraph 3 so far as relating to Article 41(6)(c), and
(iii) paragraph 4 except as it relates to such minimum standards, if any, as apply in Great Britain”

;
(c) Article 14(2)(e) is to be read as if—
(i) for “Regulation (EC) No 715/2009” there were substituted “ the Gas Regulation ”, and
(ii) the words from “including” to the end were omitted.”

.
Reg. 16 in force at 31.12.2020 on IP completion day (in accordance with 2020 c. 1, Sch. 5 para. 1(1)), see reg. 1(1)