SCHEDULE 5 AMENDMENTS TO COMMISSION DELEGATED REGULATIONS RELATED TO ENERGY LABELLING

10 Commission Delegated Regulation (EU) No 812/2013
(1) Commission Delegated Regulation (EU) No 812/2013 of 18 February 2013 supplementing Directive 2010/30/EU of the European Parliament and of the Council with regard to the energy labelling of water heaters, hot water storage tanks and packages of water heater and solar device is amended as follows.
(2) In Article 1 (subject matter and scope), in paragraph 2(c)—
(a) after “heaters” insert “ that immediately before IP completion day would have been ”;
Words in Regulations substituted (31.12.2020 immediately before IP completion day) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(2), 4
(b) after “Council”, insert “ , as that Directive had effect immediately before IP completion day ”.
(3) In Article 3 (responsibilities of suppliers and timetable), in paragraphs 1(c), 2(c), 3(b) and 4(c), in each instance, for “Member States and to the Commission”, substitute “ Great Britain ”.
Words in Sch. 5 para. 10(3) substituted (31.12.2020 immediately before IP completion day) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(2), 6(1)(2)(c)(ix)
(4) In Article 6 (verification procedure for market surveillance purposes), for “Member States”, substitute “ The authorities of Great Britain ”.
Words in Sch. 5 para. 10(4) substituted (31.12.2020 immediately before IP completion day) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(2), 6(3)(4)(e)(ix)
(5) Omit Article 7 (review).
(6) At the end of Article 8 (entry into force and application), omit “This Regulation shall be binding in its entirety and directly applicable in all Member States.”.
(7) In Annex 1 (definitions applicable for Annexes 2 to 9), for subparagraph (13), substitute—

“13 ‘conversion coefficient’ (CC) means a coefficient the value of which is CC = 2.5.”

.
(8) In Annex 3 (the labels), in subparagraph (b) of subsection 1.1.3, after “ ‘EU Ecolabel’” insert “ before IP completion day ”.
(9) In Annex 5 (technical documentation), in subparagraph (c) in sections 1 to 4, in each instance, for “harmonised” substitute “ designated ”.
(10) In Annex 7 (measurements), in paragraph 1, for the words from “harmonised” to “Union”, substitute “ designated standards ”.
(11) In Annex 8 (method for calculating the water heating energy efficiency of water heaters), in paragraph 1, for the words from “harmonised” to “Union”, substitute “ designated standards ”.
(12) In Annex 9 (product compliance verification by market surveillance authorities)—
(a) for each instance of “Member State” or “Member States”, substitute “ Great Britain ”;
Words in Sch. 5 para. 10(12)(a) substituted (31.12.2020 immediately before IP completion day) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1528), regs. 1(2), 6(1)(2)(c)(ix)
(b) omit subparagraph (7);
(c) in the fourth paragraph—
(i) for “7” substitute “ 6 ”; and
(ii) for “harmonised” substitute “ designated ”.
Sch. 5 para. 10 in force at 31.12.2020 on IP completion day (in accordance with 2020 c. 1, Sch. 5 para. 1(1)), see reg. 1(3)