2 Interpretation
In these Regulations—
“the Act” means the European Union (Withdrawal) Act 2018;
“the 2002 Regulations” means the Medical Devices Regulations 2002 .
Reg. 2 in force at 31.12.2020 on IP completion day (in accordance with 2020 c. 1, Sch. 5 para. 1(1)), see reg. 1(1)
S.I. 2002/618; these Regulations were made partly under section 2(2) of the European Communities Act 1972 c. 68 and were saved by virtue of s. 2(1) of the Act.