3 Amendments to the Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019
1 The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 are amended as follows.
S.I. 2019/533, as amended by S.I. 2019/1104.
2 In Schedule 1, in paragraph 4(3)—
(a) in paragraph 1A—
(i) omit subparagraph (d);
(ii) after subparagraph (d) insert—

“(e) the definitions of “ancillary service” and “renewable energy” in Article 2 of Regulation (EU) 2019/943;”

;
(iii) in the full out wording—
(aa) after “points” insert “(160),”;
(bb) after “(166)” insert “(170)”;
(cc) omit “(169)”;
(b) in paragraph 1C—
(i) in subparagraph (a) omit “, 2016/631, 2016/1388 or 2016/1447”;
(ii) omit subparagraph (b).
3 In Schedule 2, in paragraph 4—
(a) omit sub-paragraph (2);
(b) in sub-paragraph (3), for the words before paragraph (a) substitute “In the first paragraph—”;
(c) in sub-paragraph (3), for paragraph (c) substitute—

“(c) omit “Article 2 of Regulation (EU) 2015/1222,”
(d) omit “Article 2 of Regulation (EU) 2016/1719,”.”

;
(d) in sub-paragraph (4)—
(i) for the first line of that sub-paragraph, substitute “In the second paragraph, after point (13), insert—”;
(ii) omit point (14);
(e) omit sub-paragraph (5).