2020 No. 1148
Infrastructure Planning
The West Burton C (Gas Fired Generating Station) Order 2020
Made 21st October 2020
Coming into force 11th November 2020

An application has been made to the Secretary of State under section 37 of the Planning Act 2008 (“the 2008 Act”) in accordance with the Infrastructure Planning (Applications: Prescribed Forms and Procedure) Regulations 2009 for an Order granting development consent.
2008 c.29. Sections 37, 83, 114 and 120 were amended by Localism Act 2011 (c.20). Section 115 was amended by the Localism Act 2011, the Housing and Planning Act 2016 (c.22) and the Wales Act 2017 (c.4).
S.I. 2009/2264, relevant amendments were made by S.I. 2010/602, S.I. 2012/635, S.I. 2012/2654, S.I. 2012/2732, S.I. 2013/522, S.I. 2013/755, S.I. 2015/377, S.I. 2017/572; S.I. 2017/524 and S.I. 2020/764, and the instrument modified by S.I. 2012/1659.
The application was examined by a single appointed person appointed by the Secretary of State in accordance with Chapter 4 of Part 6 of the 2008 Act and the Infrastructure Planning (Examination Procedure) Rules 2010.
S.I. 2010/103, as amended by S.I. 2012/635.
The single appointed person, having considered the representations made and not withdrawn and the application together with the accompanying documents, in accordance with section 83 of the 2008 Act, has submitted a report and recommendation to the Secretary of State.
The Secretary of State, having considered the representations made and not withdrawn, and the report and recommendation of the single appointed person, has decided to make an Order granting development consent for the development described in the application with modifications which in the opinion of the Secretary of State do not make any substantial change to the proposals comprised in the application.
The Secretary of State, in exercise of the powers conferred by sections 114, 115, 120 and 140 of the 2008 Act, makes the following Order—

PART 1 Preliminary

1 Citation and commencement
1 This Order may be cited as the West Burton C (Gas Fired Generating Station) Order 2020 and comes into force on 11th November 2020.

2 Interpretation
1 In this Order—
“the 1961 Act” means the Land Compensation Act 1961;
“the 1980 Act” means the Highways Act 1980;
“the 1989 Act” means the Electricity Act 1989;
“the 1990 Act” means the Town and Country Planning Act 1990;
“the 1991 Act” means the New Roads and Street Works Act 1991;
“the 2008 Act” means the Planning Act 2008;
“authorised development” means the development and associated development described in Schedule 1 (authorised development) which is development within the meaning of section 32 of the 2008 Act;
“building” includes any structure or erection or any part of a building, structure or erection;
“carriageway” has the same meaning as in the 1980 Act;
“CCGT” means combined cycle gas turbine;
“the combined heat and power assessment” means the document certified as the combined heat and power assessment by the Secretary of State for the purposes of this Order;
“commence”, unless otherwise provided for, means beginning to carry out any material operation (as defined in section 155 of the 2008 Act) forming the relevant part of the authorised development other than operations consisting of preliminary works, site clearance, demolition work, archaeological investigations, environmental surveys, investigations for the purpose of assessing ground conditions, remedial work in respect of any contamination or other adverse ground conditions, diversion and laying of services, erection of any temporary means of enclosure, the temporary display of site notices or advertisements and “commencement” is construed accordingly;
“discharging authority” means the body responsible for giving any agreement or approval required by a requirement;
“electrical cables” means overhead or underground cables including fibre optic cables;
“environmental statement” means the document certified as the environmental statement by the Secretary of State for the purposes of this Order;
“framework construction environmental management plan” means the document certified as the framework construction environmental management plan by the Secretary of State for the purposes of this Order;
“framework construction traffic management plan” means the document certified as the framework construction traffic management plan by the Secretary of State for the purposes of this Order;
“framework construction workers’ travel plan” means the document certified as the framework construction workers’ travel plan by the Secretary of State for the purposes of this Order;
“gross rated electrical output” means the aggregate of gross electrical power as measured at the terminals of each generator in accordance with standards agreed with the regulating authority under the Environmental Permitting (England and Wales) Regulations 2016;
“highway” and “highway authority” have the same meaning as in the 1980 Act;
“Highways England” means Highways England Company Ltd (company registration number 09346363) whose registered office is at Bridge House, 1 Walnut Tree Close, Guildford, Surrey, GU1 4LZ;“Historic England” means the Historic Buildings and Monuments Commission for England;
“indicative layout plans” means the plans certified as the indicative layout plans by the Secretary of State for the purposes of this Order;
“the land plans” means the plans certified as the land plans by the Secretary of State for the purposes of this Order;
“the landscaping and biodiversity management and enhancement plan” means the document certified as the landscaping and biodiversity management and enhancement plan by the Secretary of State for the purposes of this Order;
“Lead Local Flood Authority” means Nottinghamshire County Council or any replacement body;
“lighting strategy” means the document certified as the lighting strategy by the Secretary of State for the purposes of this Order;
“maintain” includes, to the extent assessed in the environmental statement, inspect, repair, adjust, alter, refurbish, remove, reconstruct any part (but not the whole), replacement of any part (but not the whole) and improve, but not so as to vary from the description of the authorised development and “maintenance” is construed accordingly;
“the Order limits” means the limits shown on the works plans as the limits within which the authorised development may be carried out;
“outline drainage strategy” means the document certified as the outline drainage strategy by the Secretary of State for the purposes of this Order;
“OCGT” means open cycle gas turbine;
“outline written scheme of investigation” means the document certified as the outline written scheme of investigation by the Secretary of State for the purposes of this Order;
“owner”, in relation to land, has the same meaning as in section 7 of the Acquisition of Land Act 1981;
“public sewer or drain” means a sewer or drain which belongs to the Environment Agency, an internal drainage board, a local authority or a sewerage undertaker;
“relevant internal drainage board” means Trent Valley Internal Drainage Board or any replacement body;
“relevant planning authority” in relation to any land means the district planning authority for the area in which the land is situated;
“requirements” means those matters set out in Schedule 2 to this Order;
“scheduled works” means the numbered works specified in Schedule 1 to this Order, or any part of them;
“sewerage undertaker” has the same meaning as in Schedule 1 of the Interpretation Act 1978;
“statutory undertaker” means any person falling within section 127(8) of the 2008 Act;
“street” means a street within the meaning of section 48 of the 1991 Act, together with land on the verge of a street or between two carriageways, and includes any footpath and any part of a street;
“street authority”, in relation to a street, has the same meaning as in Part 3 (street works in England and Wales) of the 1991 Act;
“tree preservation order” has the meaning given in section 198 of the 1990 Act.
“undertaker” means EDF Energy (Thermal Generation) Limited (company number 4267569) whose registered office is 90 Whitfield Street, London, England, W1T 4EZ;
“watercourse” includes all rivers, streams, ditches, drains, canals, cuts, culverts, dykes, sluices, sewers and passages through which water flows except a public sewer or drain;
“West Burton A” means West Burton A, a coal fired power station operated by the undertaker, forming part of the West Burton Power Station Site;
“West Burton B” means West Burton B CCGT, a gas fired power station operated by the undertaker, forming part of the West Burton Power Station Site;
“West Burton Power Station Site” means the land near Retford in Nottinghamshire within the ownership of the undertaker comprising West Burton A, West Burton B and other land including the Order limits; and
“the works plans” means the plans certified as the works plans by the Secretary of State for the purposes of this Order.
1961 c.33.
1980 c.66.
1989 c.29.
1990 c.8.
1991 c.22.
S.I. 2016/1154. There are no amendments to this instrument that are relevant here.
1981 c.67. The definition of “owner” was amended by the Planning and Compensation Act 1991 (c.34).
1978 c.30. The definition of “sewerage undertaker” was inserted by section 6 of the Water Industry Act 1991 (c.56) and words within definition inserted by section 2 of the Water Consolidation (Consequential Provisions) Act 1991 (c.60).
Section 198 was amended by section 192, section 238 of and Schedule 13 to the 2008 Act and by section 42 of the Planning and Compulsory Purchase Act 2004(c. 5).
2 References in this Order to rights over land include references to rights to do or to place and maintain, anything in, on or under land or in the air-space above its surface.
3 Save in relation to Tables 1 and 2 of Schedule 2 all distances, directions and lengths referred to in this Order are approximate and distances between points on a scheduled work comprised in the authorised development will be taken to be measured along that scheduled work.

PART 2 Principal Powers

3 Development consent etc. granted by the Order
1 Subject to the provisions of this Order and to the requirements, the undertaker is granted development consent for the authorised development to be carried out within the Order limits.
2 Subject to article 6 (limits of deviation) the development must be constructed and installed in the lines and situations shown on the works plans.

4 Maintenance of authorised development
1 The undertaker may at any time maintain the authorised development, except to the extent that this Order or an agreement made under this Order, provides otherwise.
2 This article only authorises the carrying out of maintenance works within the Order limits.

PART 3 Operations

5 Operation of generating station
1 The undertaker is hereby authorised to use and to operate the generating station comprised in the authorised development.
2 This article does not relieve the undertaker of any requirement to obtain any permit or licence under any other legislation that may be required from time to time to authorise the operation of an electricity generating station.

6 Limits of deviation
In carrying out the authorised development the undertaker may deviate laterally from the lines or situations of the authorised development shown on the works plans within the relevant areas shown on those plans.

7 Benefit of Order
1 — Except as otherwise provided in this Order, the provisions of this Order have effect solely for the benefit of the undertaker.
2 The undertaker may, with the consent of the Secretary of State—
(a) transfer to another person (“the transferee”) any or all of the benefit of the provisions of this Order and such related statutory rights as may be agreed between the undertaker and the transferee; or
(b) grant to another person (“the lessee”) for a period agreed between the undertaker and the lessee any or all of the benefit of the provisions of this Order and such related statutory rights as may be so agreed
except where paragraph (5) applies in which case no such consent is required.
3 Where a transfer or grant has been made in accordance with paragraph (2) references in this Order to the undertaker, except in paragraph (4) include references to the transferee or the lessee.
4 The exercise by a person of any benefits or rights conferred in accordance with any transfer or grant under paragraph (2) is subject to the same restrictions, liabilities and obligations as would apply under this Order if those benefits or rights were exercised by the undertaker.
5 This paragraph applies where the transferee or lessee is a person who holds a licence under section 6 of the 1989 Act or section 7 of the Gas Act 1986.
Section 6 was amended by section 30 of the Utilities Act 2000 (c.27), section 136, 143, 145 and 197 of and schedule 23 to the Energy Act 2004 (c.20), section 79 of and Schedule 8 to the Climate Change Act 2008 (c.27), the Electricity and Gas (Internal Markets) Regulations (S.I. 2011/2704) and the Electricity and Gas (Smart Meters Licensable Activity) Order (S.I. 2012/2400).
1986 c.44, Section 7 was substituted by section 5 of the Gas Act 1995 (c.45) and then amended by section 76(2) of the Utilities Act 2000 (c.27). There are other amendments to the section that are not relevant to this Order.
6 Where the consent of the Secretary of State is not required under paragraph (5) the undertaker must notify the Secretary of State in writing before transferring or granting a benefit referred to in paragraph (2).
7 The notification referred to in paragraph (6) must state -
(a) the name and contact details of the person to whom the benefit of the powers will be transferred or granted;
(b) subject to paragraph (8), the date on which the transfer will take effect;
(c) the powers to be transferred or granted;
(d) pursuant to paragraph (4), the restrictions, liabilities and obligations that will apply to the person exercising the powers transferred or granted; and
(e) where relevant, a plan showing the works or areas to which the transfer or grant relates.
8 The date specified under paragraph (7)(b) must not be earlier than the expiry of five working days from the date of the receipt of the notice
9 The notice given under paragraph (7) must be signed by the undertaker and the person to whom the benefit of the powers will be transferred or granted as specified in that notice.

8 Defence to proceedings in respect of statutory nuisance
1 Where proceedings are brought under section 82(1) of the Environmental Protection Act 1990 (summary proceedings by persons aggrieved by statutory nuisance) in relation to a nuisance falling within paragraph (g) of section 79(1) of that Act (statutory nuisances and inspections therefor no order is to be made, and no fine is to be imposed, under section 82(2) of that Act if—
(a) the defendant shows that the nuisance—
(i) relates to premises used by the undertaker for the purposes of or in connection with the construction or maintenance of the authorised development and that the nuisance is attributable to the carrying out of the authorised development in accordance with a notice served under section 60 (control of noise on construction site), or a consent given under section 61 (prior consent for work on construction site) of the Control of Pollution Act 1974; or
1974 c.40. Section 61 was amended by section 162 of and schedule 24 to the Environmental Protection Act 1990. There are other amendments to this Act which are not relevant to this Order.
(ii) is a consequence of the construction or maintenance of the authorised development and that it cannot reasonably be avoided; or
(b) the defendant shows that the nuisance—
(i) relates to premises used by the undertaker for the purposes of or in connection with the use of the authorised development and that the nuisance is attributable to the use of the authorised development which is being used in accordance with a scheme of monitoring of noise agreed with the relevant planning authority as described in requirement 22 (control of noise - operation); or
(ii) is a consequence of the use of the authorised development and that it cannot reasonably be avoided.
1990 c.43. Section 82(1) was amended by section 107 of and Schedule 17 to he Environment Act 1995 (c.25). There are other amendments to this Act which are not relevant to this Order. Section 79(1) was amended by section 120 of and schedule 22 to the Environment Act 1995. There are other amendments to section 79(1) that are not relevant to this Order. Section 8292) was amended by section 5 of the Noise and Statutory Nuisance Act 1993 (c.40) and section 107 of and schedule 17 to the Environment Act 1995.
2 Section 61(9) (consent for work on construction site to include statement that it does not of itself constitute a defence to proceedings under section 82 of the Environmental Protection Act 1990) of the Control of Pollution Act 1974 does not apply where the consent relates to the use of premises by the undertaker for the purposes of or in connection with the construction or maintenance of the authorised development.

PART 4 Streets

9 Temporary prohibition or restriction of use of streets
1 The undertaker may, during and for the purposes of carrying out the authorised development, temporarily divert or prohibit or restrict the use of any street specified in column 2 of Schedule 4 (streets subject to temporary prohibition or restriction of use) and may for any reasonable time—
(a) divert the traffic or a class of traffic from the street; and
(b) subject to paragraph (2), prevent all persons from passing along the street.
2 The undertaker must provide reasonable access for non-motorised users (including pedestrians) going to or from premises abutting a street affected by the temporary diversion, prohibition or restriction of a street under this article if there would otherwise be no such access.
3 The undertaker must not temporarily divert or prohibit or restrict the use of—
(a) any street referred to in paragraph (1) without first consulting the street authority; or
(b) any other street without the prior written consent of the street authority which may attach reasonable conditions to any consent.
4 If a street authority fails to notify the undertaker of its decision within 4 weeks of receiving an application for consent under paragraph (3)(b) (or such longer period as may be agreed with the undertaker in writing) that street authority is deemed to have granted consent.
5 Any person who suffers loss by the suspension of any private right of way under this article is entitled to compensation to be determined, in case of dispute, under Part 1 (determination of questions of disputed compensation) of the 1961 Act.

10 Agreements with street authorities
1 A street authority and the undertaker may enter into agreements with respect to—
(a) any diversion or prohibition or restriction of use of a street authorised by this Order; or
(b) the temporary removal and reinstatement of street furniture.
2 Such an agreement may, without prejudice to the generality of paragraph (1),—
(a) make provision for the street authority to carry out any function under this Order which relates to the street in question;
(b) include an agreement between the undertaker and street authority specifying a reasonable time for the completion of the works; and
(c) contain such terms as to payment and otherwise as the parties consider appropriate.

PART 5 Supplemental powers

11 Discharge of water
1 The undertaker may use any watercourse or any public sewer or drain for the drainage of water in connection with the carrying out or maintenance of the authorised development and for that purpose may lay down, take up and alter pipes and may, on any land within the Order limits, make openings into, and connections with, the watercourse, public sewer or drain subject to the obtaining of consent and approval respectively pursuant to paragraphs (3) and (4) below.
2 Any dispute arising from the making of connections to or the use of a public sewer or drain by the undertaker pursuant to paragraph (1) is to be determined as if it were a dispute under section 106 of the Water Industry Act 1991 (right to communicate with public sewers).
1991 c.56. Section 106 was amended by sections 36 and 99 the Water Act 2003 (c.37), sections 35 and 43 of the Competition and Services (Utilities) Act 1992 (c.43). and section 32 of and schedule 3 to the Flood and Water Management Act 2010 (c.29).
3 The undertaker must not discharge any water into any watercourse, public sewer or drain except with the consent of the person to whom it belongs; and such consent may be given subject to such terms and conditions as that person may reasonably impose, but must not be unreasonably withheld.
4 The undertaker must not make any opening into any public sewer or drain except—
(a) in accordance with plans approved by the person to whom the sewer or drain belongs, but such approval must not be unreasonably withheld; and
(b) where that person has been given the opportunity to supervise the making of the opening.
5 The undertaker must not, in carrying out or maintaining works pursuant to this article, damage or interfere with the bed or banks of any watercourse forming part of a main river other than in accordance with a consent granted by the Environment Agency.
6 The undertaker must take such steps as are reasonably practicable to secure that any water discharged into a watercourse or public sewer or drain pursuant to this article is as free as may be practicable from gravel, soil or other solid substance, oil or matter in suspension.
7 Nothing in this article overrides the requirement for an environmental permit under regulation 12(1) of the Environmental Permitting (England and Wales) Regulations 2016 (requirement for an environmental permit).
8 In this article—
(a) “public sewer or drain” means a sewer or drain which belongs to the Homes and Communities Agency, the Environment Agency, a harbour authority within the meaning of section 57 of the Harbours Act 1964 (interpretation), an internal drainage board, a joint planning board, a local authority, a National Park Authority, a sewerage undertaker or an urban development corporation; and
1964 c.40.
(b) other expressions, excluding watercourse, used both in this article and in the Water Resources Act 1991 have the same meaning as in that Act.
1991 c.57.

PART 6 Miscellaneous and General

12 Application of landlord and tenant law
1 This article applies to—
(a) any agreement for leasing to any person the whole or any part of the authorised development or the right to operate the same; and
(b) any agreement entered into by the undertaker with any person for the construction, maintenance, use or operation of the authorised development, or any part of it,
so far as any such agreement relates to the terms on which any land which is the subject of a lease granted by or under that agreement is to be provided for that person’s use.
2 No enactment or rule of law regulating the rights and obligations of landlords and tenants prejudices the operation of any agreement to which this article applies.
3 Accordingly, no such enactment or rule of law to which paragraph (2) applies in relation to the rights and obligations of the parties to any lease granted by or under any such agreement so as to—
(a) exclude or in any respect modify any of the rights and obligations of those parties under the terms of the lease, whether with respect to the termination of the tenancy or any other matter;
(b) confer or impose on any such party any right or obligation arising out of or connected with anything done or omitted on or in relation to land which is the subject of the lease, in addition to any such right or obligation provided for by the terms of the lease; or
(c) restrict the enforcement (whether by action for damages or otherwise) by any party to the lease of any obligation of any other party under the lease.

13 Operational land for purposes of the 1990 Act
Development consent granted by this Order is to be treated as specific planning permission for the purposes of section 264(3)(a) of the 1990 Act (cases in which land is to be treated as not being operational land).

14 Felling or lopping of trees
1 The undertaker may fell or lop any tree or shrub within or overhanging the Order limits or within the extent of the publicly maintainable highway near any part of the authorised project, or cut back its roots, if it reasonably believes it to be necessary to do so to prevent the tree or shrub from obstructing or interfering with the construction, maintenance or operation of the authorised development.
2 In relation to the felling or lopping of any tree or shrub within the publicly maintainable highway, the power contained in paragraph (1) must only be exercised in connection with the delivery of abnormal indivisible loads to the West Burton Power Station Site.
3 In carrying out any activity authorised by paragraph (1) the undertaker must –
(a) give at least 14 days’ notice to the relevant planning authority of its intention to fell or lop any tree or shrub overhanging the Order limits or within the extent of the publicly maintainable highway;
(b) do no unnecessary damage to any tree or shrub and must pay compensation to any person for any loss or damage arising from such activity; and
(c) the duty contained in section 206(1) of the 1990 Act (replacement of trees) does not apply.
Section 206(1) was amended by section 192 of and schedule 8 to the 2008 Act.
4 The authority given by paragraph (1) constitutes a deemed consent under the relevant tree preservation order.
5 Any dispute as to a person’s entitlement to compensation under paragraph (2), or as to the amount of compensation, must be determined under Part 1 of the 1961 Act (determination of questions of disputed compensation).

15 Protective provisions
Schedule 5 (protective provisions) has effect.

16 Certification of plans etc.
1 The undertaker must, as soon as practicable after the making of this Order, submit to the Secretary of State copies of—
(a) the combined heat and power assessment (Document 7.2 Rev 0);
(b) the environmental statement (Document 5.2 Rev 0);
(i) Chapter 9 (Ecology Chapter) of the environmental statement (Rev 2);
(c) the framework construction environmental management plan (Document 7.3 Rev 2);
(d) the framework construction traffic management plan (Document 7.6 Rev 3);
(e) the framework construction workers’ travel plan (Document 7.7 Rev 0);
(f) the indicative layout plans (Document 3.4 Rev 0);
(g) the land plans (Document 3.3 Rev 0);
(h) the landscaping and biodiversity management and enhancement plan (Document 7.5 Rev 4);
(i) the lighting strategy (Document 7.4 Rev 0);
(j) the outline drainage strategy (Document 7.8 Rev 0);
(k) the outline written scheme of investigation (Document 7.9 Rev 0); and
(l) the works plans (Document 3.2 Rev 0),
for certification that they are true copies of the documents referred to in this Order.
2 A plan or document so certified is admissible in any proceedings as evidence of the contents of the document of which it is a copy.

17 Procedure in relation to certain approvals etc.
1 Where an application is made to or request is made of the relevant planning authority, a highway authority, a street authority or the owner of a watercourse, sewer or drain for any agreement or approval required or contemplated by any of the provisions of this Order, such agreement or approval must, if given, be given in writing and must not be unreasonably withheld or delayed.
2 Schedule 3 (procedure for discharge of requirements) has effect in relation to all agreements or approvals granted, refused or withheld in relation to the requirements.

18 Arbitration
Any difference under any provision of this Order, unless otherwise provided for, is to be referred to and settled by a single arbitrator to be agreed between the parties or, failing agreement, to be appointed on the application of either party (after giving notice in writing to the other) by the Secretary of State.
Signed by authority of the Secretary of State for Business, Energy and Industrial Strategy
Gareth Leigh Head of Energy Infrastructure Planning Department for Business, Energy and Industrial Strategy 21st October 2020

SCHEDULES

SCHEDULE 1 AUTHORISED DEVELOPMENT
Article 2, 3, 5
In the County of Nottinghamshire and District of Bassetlaw a nationally significant infrastructure project as defined in sections 14 (nationally significant infrastructure projects: general) and 15 (generating stations) of the 2008 Act, comprising—
Work No.1 — a gas fired generating station located on the West Burton Power Station Site with a gross electrical output capacity of up to 299MW comprising—
(a) up to 5 OCGT units and associated generators, potentially housed within buildings with stacks, transformers, air inlet filters and exhaust gas diffusers;
(b) associated switchgear and ancillary equipment; and
(c) auxiliary closed loop cooling equipment/system.
Work No.1 may also include a banking compound comprising up to 6 transformers, overhead busbars, cable sealing ends and associated switchgear and ancillary equipment.
Work No.2 – a gas receiving area, gas treatment and control facilities, a compression station, generator and other auxiliary control cabinets and equipment.
Work No.3 – electrical connection works comprising—
Work No. 3A – up to 400 kV electrical cables and control systems cables to and from the existing West Burton B switchyard; and
Work No. 3B – works within or adjacent to the existing West Burton B switchyard, including electrical cables, connections to busbars and upgraded or replacement equipment.
Work No.4 – auxiliary buildings, structures and equipment, comprising—
(a) emergency diesel generator and associated diesel fuel tank;
(b) contained road tanker diesel unloading area;
(c) workshop, store, control, administration and welfare building;
(d) above ground raw water and fire water storage tanks and associated infrastructure;
(e) area of hardstanding for maintenance laydown and erection of temporary buildings associated with the commissioning, operation and maintenance of the OCGT units;
(f) pipework, pipe runs and pipe racks;
(g) fire-fighting equipment, buildings and distribution pipework; and
(h) chemical storage facilities, other minor infrastructure and auxiliaries/services.
Work No. 5 – a new surface water drainage system comprising pond or a tank or similar including connection to an existing surface water drainage system on the West Burton Power Station Site.
Work No. 6 – gas supply pipeline connection works for the transport of natural gas to Work No. 1 from an existing gas receiving facility within West Burton B comprising -
Work No. 6A - on or below ground high pressure steel pipeline of up to 500 millimetres (nominal bore) in diameter and up to 150 metres in length including controls and instrumentation; and
Work No. 6B - an extension to the existing West Burton B gas receiving facility comprising –
(i) an offtake connection;
(ii) gas compressor (if required);
(iii) above and below ground valves, flanges and pipework;
(iv) an above or below ground remotely operated valve;
(v) an above or below ground remotely operated valve bypass;
(vi) an above or below ground pressurisation bridle;
(vii) instrumentation and electrical kiosks; and
(viii) telemetry equipment kiosks and communications equipment.
Work No. 7 – water supply and pipeline from Work No. 1 to an existing water supply within West Burton B.
Work No. 8 – low voltage electrical, control, metering and other cables and associated switchgear and ancillary equipment and cabinets required to connect Work Nos 1- 6 with West Burton B.
Associated development within the meaning of section 115(2) of the 2008 Act in connection with Work Nos. 1 - 8 comprising—
Work No. 9 – a rail offloading area from the existing rail loop ‘merry-go-round’ on the West Burton Power Station site.
Work No. 10 – a Landscaping and Biodiversity Management and Enhancement Area.
And to the extent that it does not otherwise form part of any such works, further associated development within the meaning of section 115(2) of the 2008 Act comprising such other works or operations as may be necessary or expedient for the purpose of or in connection with the construction, operation and maintenance of the works in this Schedule whether or not shown on the land plans, Order limit plans and works plans and falling within the scope of the works assessed in the environmental statement comprising—
(a) vehicle parking and cycle storage facilities;
(b) construction laydown areas and contractor facilities including materials and plant storage and laydown areas; generators; concrete batching facilities; vehicle and cycle parking facilities; pedestrian and cycle routes and facilities; offices and staff welfare facilities; security fencing and gates; external lighting; roadways and haul routes; wheel wash facilities; and signage;
(c) internal access roads, roadways and footpaths;
(d) noise attenuation features;
(e) landscaping, fencing and security provisions; and
(f) lighting columns and lighting.
The are no relevant amendments to section 14 or section 15.
There are no relevant amendments to section 115(2).

SCHEDULE 2 REQUIREMENTS
Article 2, 3

1 Interpretation
(1) In this Schedule—
“commercial use” means that the commissioning of the authorised development has been completed and it is generating electricity on a commercial basis;
“commissioning” means the process of assuring that all systems and components of the authorised development (which are installed or where installation is near to completion) are tested to verify that they function and are operable in accordance with the design objectives, specifications and operational requirements of the undertaker;
“local residents” means the residents living within the administrative areas of Nottinghamshire and Lincolnshire;
“local organisations” means organisations based or with their main activities within the administrative areas of Nottinghamshire and Lincolnshire;
“m” means metres;
“mAGL” means metres above ground level;
“mAOD” means metres above ordnance datum; and
“stage” of the authorised development means any part or parts of Works Nos. 1 to 10.
(2) Where any requirement requires the authorised development to be carried out in accordance with matters including a plan, document, or details approved by the relevant planning authority, those matters are to be taken to include any amendments that may subsequently be approved in writing by the relevant planning authority.
(3) Where an approval or agreement is required under the terms of a requirement or a document referred to in a requirement, or any requirement specifies “unless otherwise approved” or “unless otherwise agreed” by the relevant planning authority, such approval or agreement may only be given in relation to non-material changes where it has been demonstrated to the satisfaction of the relevant planning authority that the subject matter of the approval or agreement sought is unlikely to give rise to any greater environmental effects from those assessed in the environmental statement.

2 Commencement of the authorised development
(1) The authorised development must not be commenced after the expiration of 7 years from the date this Order comes into force.
(2) The authorised development must not commence unless the undertaker has given the relevant planning authority 14 days’ notice of its intention to commence the authorised development.

3 Notice of commencement and completion of commissioning
(1) Notice of the intended commissioning of the authorised development must be given to the relevant planning authority, Nottinghamshire County Council, Lincolnshire County Council and West Lindsey District Council prior to such commencement and in any event not less than 7 days before the date that commissioning is commenced.
(2) Notice of the intended completion of commissioning of the authorised development must be given to the relevant planning authority where practicable prior to such completion and in any event within 7 days from the date that commissioning is completed.

4 Notice of commencement of commercial use
Notice of the intended commencement of commercial use of the authorised development must be given to the relevant planning authority prior to such commencement and in any event not less than 7 days before the date that commercial use is commenced.

5 Detailed design
(1) In relation to Work No. 1, Work No. 2, Work No. 4 and Work No. 5, no development must commence until details of the following, where relevant for that Work have, after consultation with West Lindsey District Council and the Lead Local Flood Authority, been submitted to and approved by the relevant planning authority—
(a) the siting, layout, scale and external appearance, including the colour, materials and surface finishes of all new permanent buildings and structures;
(b) finished floor levels;
(c) hard standings;
(d) the internal vehicular access and circulation roads, loading and unloading, vehicle parking and turning facilities, cycle parking and routes and pedestrian facilities and routes; and
(e) surface water management.
(2) Work No. 1, Work No. 2, Work No. 4 and Work No. 5 unless otherwise agreed with the relevant planning authority must be carried out in accordance with the approved details.
(3) Unless otherwise agreed with the relevant planning authority if a single OCGT is installed the details approved by the relevant planning authority under paragraph (1) must be in accordance with table 1.

Table 1 Main Dimensions for Single OCGT
Component	Maximum length (m)	Maximum width (m)	Maximum height (mAGL/ mAOD)	Minimum height (mAGL)
Minimum final ground height (mAOD)	+7.1m			
Maximum final ground height (mAOD)	+14m			
Single Gas Turbine, Exhaust gas diffuser, Generator and Air inlet filter (Work No. 1(a))	50	20	27/41	-
Gas Turbine building (if required) (Work No. 1(a))	36	12	19/33	-
Stack(s) (Work No. 1(a))	10m diameter		45/59	40
Auxiliary closed loop cooling equipment (Work No. 1(c))	30	15	12/26	-
Workshop, Stores, Control, Administration and Welfare Buildings (Work No. 4(c))	40	30	10/24	-
Raw Water / Fire Water Storage tank (Work No. 4(d))	15m diameter		7/21	-
Gas receiving areas, gas treatment facilities, compression station and other auxiliary control cabinets and equipment (Work No. 2)	60	45	7/21	-
(4) Unless otherwise agreed with the relevant planning authority if up to 5 OCGT units are installed the details approved by the relevant planning authority under paragraph (1) must be in accordance with table 2.

Table 2 Main Dimensions for Up to 5 Gas Turbines
Component	Maximum length (m)	Maximum width (m)	Maximum height (mAGL/ mAOD)	Minimum height (mAGL)
Minimum final ground height (mAOD)	+7.1m			
Maximum final ground height (mAOD)	+14m			
Each Single Gas Turbine and Generator (Work No. 1(a))	35	12	15/29	-
Each Stack (Work No. 1(a))	5m diameter		45/59	35
Banking Compound Area (Work No. 1)	52	48	8/22	-
Workshop, Stores, Control, Administration and Welfare Buildings (Work No. 4(c))	40	30	10/24	-
Raw Water / Fire Water Storage Tank (Work No. 4(d))	15m diameter		7/21	-
Gas receiving areas, gas treatment facilities, compression station and other auxiliary control cabinets and equipment (Work No. 2)	60	45	7/21	-

6 Landscaping and biodiversity management and enhancement
(1) In relation to Work No. 1, Work No. 2 and Work No. 4, no development must be commenced until a landscaping and biodiversity management and enhancement plan, where relevant for that Work has, after consultation with the Environment Agency, Natural England, Lincolnshire County Council, Nottinghamshire County Council and West Lindsey District Council, been submitted to and approved by the relevant planning authority.
(2) The plan submitted and approved must include details of—
(a) measures to protect, manage and enhance existing shrub and tree planting that is to be retained;
(b) biodiversity and habitat mitigation and impact avoidance;
(c) an implementation timetable; and
(d) maintenance and management, including a landscaping maintenance plan incorporating measures to protect, manage and enhance all shrub and tree planting.
(3) The plan submitted and approved must be in accordance with the certified landscaping and biodiversity management and enhancement plan unless otherwise agreed with the relevant planning authority.
(4) The plan must be implemented prior to commissioning and maintained as approved unless otherwise agreed with the relevant planning authority.
(5) Any shrub or tree planted as part of the approved plan that, within a period of 5 years after planting, is removed, dies or becomes, in the opinion of the relevant planning authority, seriously damaged or diseased, must be replaced in the first available planting season with a specimen of the same species and size as that originally planted unless otherwise agreed with the relevant planning authority.

7 External lighting
(1) In relation to Work No. 1, no development must commence until a scheme for all external lighting to be installed during construction, where relevant to that Work, has been submitted to and approved by the relevant planning authority.
(2) No part of Work No. 1 must be commissioned until a scheme for all permanent external lighting to be installed has been submitted to and approved by the relevant planning authority.
(3) The schemes submitted and approved pursuant to paragraphs (1) and (2) of this requirement must accord with the principles of the lighting strategy and include measures to minimise and otherwise mitigate any artificial light emissions during the construction and operation of the authorised development.
(4) The schemes must be implemented as approved unless otherwise agreed with the relevant planning authority.

8 Means of enclosure
(1) No stage of the authorised development must commence until details of any proposed temporary means of enclosure (including a programme for the removal of all temporary means of enclosure) where relevant to that stage have been submitted to and approved by the relevant planning authority.
(2) Any construction areas or sites associated with the authorised development must remain securely fenced at all times during construction of the authorised development.
(3) Pre-commencement activities which involve temporary means of enclosure may take place only in accordance with a specific written scheme of investigation which has been submitted to and approved by the relevant planning authority.
(4) No stage of the authorised development must be brought into commercial use until details of any proposed permanent means of enclosure, have, for that stage, been submitted to and approved by the relevant planning authority.
(5) No stage of the authorised development may be brought into commercial use until any approved permanent means of enclosure has been completed.
(6) The authorised development must be carried out in accordance with the approved details unless otherwise agreed with the relevant planning authority.
(7) In this requirement, “means of enclosure” means fencing, walls or other means of boundary treatment and enclosure.

9 Surface water drainage
(1) In relation to Work No. 1, Work No. 2, Work No. 4 and Work No.5, no development must commence until, where relevant for that Work details of temporary surface water drainage system, including means of pollution control have, after consultation with the Environment Agency, Lead Local Flood Authority and relevant internal drainage board and Canal & River Trust in relation to Work No. 5 only, been submitted to and approved in writing by the relevant planning authority.
(2) Details of the permanent surface water drainage system, including a programme for its implementation and maintenance must, after consultation with the Lead Local Flood Authority, Environment Agency and relevant internal drainage board and Canal & River Trust in relation to Work No. 5 only, be submitted to and approved by the relevant planning authority prior to the start of construction of any part of that system.
(3) The details submitted and approved pursuant to paragraphs (1) and (2) of this requirement in relation to Work No. 5 must include a detailed construction method statement for the proposed works, including temporary access arrangements and construction vehicle routes to facilitate the drainage connection.
(4) The details submitted and approved pursuant to paragraphs (1) and (2) of this requirement must be in accordance with the outline drainage strategy.
(5) The schemes must be implemented as approved and maintained throughout the construction and operation of the authorised development unless otherwise agreed with the relevant planning authority.

10 Foul water drainage
(1) In relation to Work No. 4, no development must commence until, details for that work, details of a written scheme for the connection, conveyance, treatment and disposal of foul water drainage on and off the West Burton Power Station Site has, after consultation with the Environment Agency and Severn Trent Water, been submitted to and approved by the relevant planning authority.
(2) If the written scheme submitted and approved pursuant to paragraph (1) of this requirement identifies that it is not practicable or reasonable to connect to a mains foul water system, an alternative strategy for the provision and implementation of wastewater treatment must, after consultation with the Environment Agency and Severn Trent Water, be submitted to and approved by the relevant planning authority.
(3) Any alternative strategy submitted and approved pursuant to paragraph (2) of this requirement must include a management and maintenance plan to ensure that it will not cause pollution to the water environment.
(4) The schemes approved pursuant to paragraph (1) and, where relevant, paragraph (2) of this requirement must be implemented and maintained throughout the operation of the authorised development unless otherwise agreed with the relevant planning authority.

11 Flood risk mitigation
(1) No stage of the authorised development must commence until for that stage a scheme for mitigation of flood risk during construction has, after consultation with the Environment Agency and relevant internal drainage board, been submitted to and approved in writing by the relevant planning authority.
(2) Details of the permanent flood risk mitigation works, including a programme for their implementation must, after consultation with the Environment Agency and relevant internal drainage board, be submitted to and approved in writing by the relevant planning authority prior to the start of construction of any part of those works.
(3) The details submitted and approved pursuant to paragraphs (1) and (2) of this requirement must be in accordance with the principles set out in the flood risk assessment that forms part of the environmental statement.
(4) The schemes must be implemented as approved and maintained throughout the construction and operation of the authorised development unless otherwise agreed with the relevant local planning authority.

12 Contaminated land and groundwater
(1) No stage of the authorised development must commence until a scheme to deal with the contamination of land including groundwater which is likely to cause significant effects to persons or pollution of controlled waters or the environment has, for that stage and after consultation with the Environment Agency, been submitted to and approved by the relevant planning authority.
(2) The scheme submitted and approved must be in accordance with the principles set out in Chapter 11 of the environmental statement and must be included in the construction environmental management plan submitted pursuant to requirement 16.
(3) The scheme must include a risk assessment and if necessary a site investigation to identify the extent of any contamination and the remedial measures to be taken to render the land fit for its intended purpose, together with a materials management plan which sets out long-term measures with respect to any contaminants remaining on the site.
(4) Pre-construction remedial work and pre-commencement activities which involve remedial works in respect of any contamination or adverse ground conditions may take place only in accordance with a specific written scheme which has been submitted to and approved by the relevant planning authority.
(5) The authorised development, including any remediation, must be carried out in accordance with the approved scheme unless otherwise agreed with the relevant planning authority.

13 Unexpected contamination
(1) If, during any stage of the authorised development, contamination not identified or addressed within the scheme approved under requirement 12 is found to be present within the Order limits, no further development in the vicinity of the contamination may be carried out until a written scheme to deal with the associated risks has, after consultation with the Environment Agency, been submitted to and approved by the relevant planning authority.
(2) The scheme must include an investigation and assessment report prepared by a specialist consultant notified in advance to the relevant planning authority, the purpose of which is to identify the extent of any contamination and the remedial measures to be taken to render the land fit for its intended purpose, together with a management plan which sets out long-term measures with respect to any contaminants remaining on site.
(3) No remedial work identified in accordance with paragraph (2) may be carried out until the scheme has been approved.
(4) The scheme and management plan must be implemented as approved unless otherwise agreed with the relevant planning authority.

14 Archaeology
(1) No stage of the authorised development must commence until a written scheme of investigation for that stage has, after consultation with Historic England and Nottinghamshire County Council in its capacity as the relevant archaeological body, been submitted to and approved by the relevant planning authority.
(2) The scheme submitted and approved must be in accordance with the outline written scheme of investigation.
(3) The scheme must identify any areas where further archaeological investigations are required and the nature and extent of the investigation required in order to preserve by knowledge or in-situ any archaeological features that are identified.
(4) Pre-construction archaeological investigations and pre-commencement activities which include intensive ground works may take place only in accordance with a specific written scheme of investigations which has been submitted to and approved by the relevant planning authority.
(5) Any archaeological investigations implemented must be carried out—
(a) in accordance with the approved scheme; and
(b) by a suitably qualified person or organisation approved by the relevant planning authority unless otherwise agreed with the relevant planning authority.

15 Protected species
(1) No stage of the authorised development must commence until further survey work for that stage has been carried out to establish whether any protected species is present on any of the land affected, or likely to be affected, by that part of the authorised development.
(2) Where a protected species is shown to be present, no authorised development of that part must commence until, after consultation with Natural England and the Environment Agency, a scheme of protection and mitigation measures has been submitted to and approved in writing by the relevant planning authority.
(3) The authorised development must be implemented in accordance with the approved scheme unless otherwise agreed with the relevant planning authority.

16 Construction environmental management plan
(1) No stage of the authorised development must commence until a construction environmental management plan has been submitted to and approved by the relevant planning authority.
(2) The plan submitted and approved must be in accordance with the framework construction environmental management plan and incorporate—
(a) a code of construction practice, specifying measures designed to minimise the impacts of construction works;
(b) a scheme for the control of any emissions to air;
(c) a soil and waste management plan;
(d) a sediment control plan;
(e) a scheme for environmental monitoring and reporting during the construction of the authorised development, including measures for undertaking any corrective actions; and
(f) a scheme for the notification of any significant construction impacts on local residents and for handling any complaints received from local residents relating to such impacts during the construction of the authorised development.
(3) All construction works associated with the authorised development must be carried out in accordance with the approved construction environmental management plan unless otherwise agreed with the relevant planning authority.

17 Protection of highway surfaces
(1) No stage of the authorised development must commence until details for undertaking condition surveys of the relevant highways which are maintainable at the public expense and which are to be used during construction of the authorised development have been submitted to and, after consultation with the highway authority, approved by the relevant planning authority.
(2) The condition surveys must be undertaken in accordance with the approved details and a schedule of repairs, including a programme for undertaking any such repairs and their inspection, must, following the completion of the post-construction condition surveys, be submitted to and, after consultation with the highway authority, approved by the relevant planning authority.
(3) The schedule of repairs must be carried out as approved unless otherwise agreed with the relevant planning authority.

18 Construction traffic management plan
(1) No stage of the authorised development must commence until a construction traffic management plan has, after consultation with Highways England, the highway authority, Lincolnshire County Council and West Lindsey District Council been submitted to and approved by the relevant planning authority.
(2) The plan submitted and approved must be in accordance with the principles set out in the framework construction traffic management plan.
(3) The plan submitted and approved must include—
(a) details of the routes to be used for the delivery of construction materials and any temporary signage to identify routes and promote their safe use, including details of the access points to the construction site to be used by light goods vehicles and heavy goods vehicles;
(b) details of the routing strategy and procedures for the notification and conveyance of abnormal indivisible loads, including agreed routes, the numbers of abnormal loads to be delivered by road and measures to mitigate traffic impact;
(c) the construction programme; and
(d) any necessary measures for the temporary protection of carriageway surfaces, the protection of statutory undertakers’ plant and equipment and any temporary removal of street furniture.
(4) Notices must be erected and maintained throughout the period of construction at every entrance to and exit from the construction site, indicating to drivers the approved routes for traffic entering and leaving the construction site.
(5) The plan must be implemented as approved unless otherwise agreed with the relevant planning authority in consultation with Highways England and the highway authority.

19 Travel plan - construction staff
(1) No stage of the authorised development must commence until a construction workers’ travel plan has, after consultation with the highway authority, been submitted to and approved by the relevant planning authority.
(2) The plan submitted and approved must be in accordance with the framework construction workers’ travel plan.
(3) The plan submitted and approved must include—
(a) measures to promote the use of sustainable transport modes to and from the authorised development by construction staff;
(b) provision as to the responsibility for, and timescales of, the implementation of those measures;
(c) details of parking for construction personnel within the construction sites; and
(d) a monitoring and review regime.
(4) The approved plan must be implemented within 3 months of commencement of the authorised development and must be maintained throughout the construction of the authorised development unless otherwise agreed with the relevant planning authority.

20 Construction hours
(1) Subject to sub-paragraph (2), construction work relating to the authorised development, including the delivery or removal of materials, plant and machinery, must not take place on Bank Holidays or Sundays and otherwise outside the hours of—
(a) 0700 and 1900 hours on Monday to Friday; and
(b) 0800 and 1800 hours on a Saturday.
(2) The restrictions in sub-paragraph (1) do not apply to construction work or the delivery or removal of materials, plant and machinery, where these—
(a) do not exceed a noise limit to be agreed with the relevant planning authority at the Order limits;
(b) relate to continuous construction activities where prior notification has been given to the relevant planning authority;
(c) are carried out with the prior approval of the relevant planning authority; or
(d) are associated with an emergency.
(3) The restrictions in sub-paragraph (1) do not apply to the delivery of abnormal indivisible loads, where this is—
(a) associated with an emergency; or
(b) carried out with the prior approval of the relevant planning authority.
(4) Sub-paragraph (1) does not preclude:
(a) a start-up period from 0630 to 0700 and a shut-down period from 1900 to 1930 Monday to Friday and a start-up period from 0730 to 0800 and a shut-down period from 1800 to 1830 on a Saturday; or
(b) maintenance at any time of plant and machinery engaged in the construction of the authorised development.
(5) Any request for the prior approval of the relevant planning authority under sub-paragraphs (2)(b) or (3)(b) must be made at least 48 hours in advance of start of the proposed activity.
(6) In this requirement “emergency” means a situation where, if the relevant action is not taken, there will be adverse health, safety, security or environmental consequences that in the reasonable opinion of the undertaker would outweigh the adverse effects to the public (whether individuals, classes or generally as the case may be) of taking that action.

21 Control of noise - construction
(1) No stage of the authorised development must commence until a scheme for the monitoring and control of noise during the construction of the authorised development has been submitted to and approved by the relevant planning authority.
(2) The scheme submitted and approved must specify—
(a) each location from which noise is to be monitored;
(b) the method and frequency of noise measurement;
(c) the maximum permitted levels of noise at each monitoring location during the daytime;
(d) provision as to the circumstances in which construction activities must cease as a result of a failure to comply with a maximum permitted level of noise; and
(e) the noise control measures to be employed.
(3) The scheme must be implemented as approved unless otherwise agreed with the relevant planning authority.

22 Control of noise - operation
(1) No stage of the authorised development must be brought into commercial use until a scheme for noise management including monitoring during operation of the authorised development has been submitted to and approved by the relevant planning authority.
(2) Noise from the operation of the authorised development must be no greater than 5dB above background levels measured following commissioning of the authorised development at any residential property in existence at the date of this Order.
(3) The scheme must be implemented as approved unless otherwise agreed with the relevant planning authority.

23 Piling and penetrative foundation design
(1) No piling works for the construction of the authorised development must commence until for that stage a written piling and penetrative foundation design method statement, informed by a risk assessment has, after consultation with the Environment Agency, been submitted to and approved by the relevant planning authority.
(2) All piling and penetrative foundation works must be carried out in accordance with the approved method statement unless otherwise agreed with the relevant planning authority.

24 Restoration of land used temporarily for construction
(1) The authorised development must not be brought into commercial use until a scheme for the restoration of any land within the Order limits which has been used temporarily for construction has been submitted to and approved by the relevant planning authority.
(2) The land must be restored within 3 years of the authorised development being brought into commercial use (or such other period as the relevant planning authority may approve), in accordance with—
(a) the restoration scheme approved in accordance with sub- paragraph (1); and
(b) the landscaping and biodiversity management and enhancement plan approved in accordance with requirement 6.

25 Local liaison committee
(1) The authorised development must not commence until the undertaker has established a committee to liaise with local residents and local organisations about matters relating to the authorised development (a ‘local liaison committee’).
(2) The local liaison committee must include representatives of the undertaker.
(3) The undertaker must invite the relevant planning authority, Lincolnshire County Council, Nottinghamshire County Council, West Lindsey District Council, and other relevant interest groups as agreed with the relevant planning authority, to nominate representatives to join the local liaison committee.
(4) The undertaker must provide a full secretariat service and supply an appropriate venue.
(5) The local liaison committee must, unless otherwise agreed in writing by the majority of the members of the local liaison committee –
(a) meet every quarter, starting in the month prior to commencement of the authorised development, until the completion of construction, testing and commissioning works; and
(b) meet once a year during the operation of the authorised development.
(6) If the majority of members agree in writing that a meeting is not required in accordance with sub-paragraph (5), any individual committee member can require the meeting to go ahead by making a written request within 20 working days of the scheduled meeting.

26 Employment, skills and training plan
(1) No part of the authorised development must commence until a plan detailing arrangements to promote employment, skills and training development opportunities for local residents during construction of the authorised development has, after consultation with Lincolnshire County Council and Nottinghamshire County Council, been submitted to and approved by the relevant planning authority.
(2) The approved plan must be implemented and maintained during the construction of the authorised development unless otherwise agreed by the relevant planning authority.

27 Decommissioning
(1) The undertaker must submit to the relevant planning authority for its approval a decommissioning environmental management plan within 12 months of the date that the authorised development is to be decommissioned.
(2) No decommissioning works must be carried out until the relevant planning authority has approved the plan.
(3) The plan submitted and approved must include details of—
(a) the buildings to be demolished;
(b) the means of removal of the materials resulting from the decommissioning works;
(c) the phasing of the demolition and removal works;
(d) any restoration works to restore land shown within the Order limits to a condition agreed with the relevant planning authority;
(e) the phasing of any restoration works;
(f) a timetable for the implementation of the scheme; and
(g) a decommissioning traffic management plan.
(4) The plan must be implemented as approved unless otherwise agreed with the relevant planning authority.

28 Consultation on requirements
(1) Where any requirement specifies that consultation must be undertaken with a named consultee in relation to a plan, document or details being submitted to the relevant planning authority for approval—
(a) such consultation must be carried out in advance of the plan, document or details being provided to the relevant planning authority for approval; and
(b) unless otherwise agreed in advance with the undertaker, if a named consultee has not provided its comments in relation to the plan, document or details within 24 days of receipt of a request to do so, the consultee is deemed to have no comments in relation to the plan, document or details.

SCHEDULE 3 PROCEDURE FOR DISCHARGE OF REQUIREMENTS
Article 17

1 Applications made under Requirements
(1) Where an application has been made to the discharging authority for any consent, agreement or approval required under a requirement the discharging authority must give notice to the undertaker of its decision on the application including the reasons before the end of the decision period.
(2) For the purposes of paragraph (1), the decision period is—
(a) where no further information is requested under paragraph (2), 8 weeks from the first business day immediately following that on which the application is received by the discharging authority or the day on which the fee under paragraph 3(1) is received, whichever is the later;
(b) where further information is requested under paragraph (2), 8 weeks from the first business day immediately following that on which further information has been supplied by the undertaker under paragraph (2);
(c) such longer period as may be agreed by the undertaker and the discharging authority in writing before the end of the period in sub-paragraph (a) or (b).

2 Further information
(1) In relation to any application to which this Schedule applies, the discharging authority may request further information from the undertaker where it is necessary to enable it to consider the application.
(2) If the discharging authority considers such further information necessary, it must, within 7 business days of receipt of the application, notify the undertaker in writing specifying the further information required.

3 Fees
(1) Where an application is made to the discharging authority for agreement or approval in respect of a requirement the fee contained in regulation 16(1)(b) of the Town and Country Planning (Fees for Applications, Deemed Applications, Requests and Site Visits) (England) Regulations 2012(as may be amended from time to time) is to apply and must be paid to the discharging authority for each application.
S.I. 2012/2920. Regulation 16 was amended by S.I. 2017/1314.
(2) Any fee paid under this Schedule must be refunded to the undertaker within 8 weeks of the discharging authority either rejecting the application as invalidly made or failing to determine the application within the decision period as determined under paragraph (1), unless within that period the undertaker agrees, in writing, that the fee may be retained by the discharging authority and credited in respect of a future application.

4 Appeals
(1) The undertaker may appeal in the event that—
(a) the discharging authority refuses an application for any agreement or approval required by a requirement or grants it subject to conditions;
(b) the discharging authority does not give notice of its decision to the undertaker within the decision period as determined in paragraph 1(2);
(c) on receipt of a request for further information pursuant to paragraph (2) the undertaker considers that either the whole or part of the specified information requested by the discharging authority is not necessary for consideration of the application; or
(d) on receipt of any further information requested, the discharging authority notifies the undertaker that the information provided is inadequate and requests additional information, which the undertaker considers, is not necessary for consideration of the application.
(2) The appeal process is as follows—
(a) the undertaker must submit to the Secretary of State a copy of the application submitted to the discharging authority and any supporting documentation which the undertaker may wish to provide (“the appeal documentation”);
(b) the undertaker must on the same day provide copies of the appeal documentation to the discharging authority;
(c) as soon as is practicable after receiving the appeal documentation, the Secretary of State must appoint a person (“the appointed person”) and forthwith notify the appeal parties of the identity of the appointed person and the address to which all correspondence for that person’s attention should be sent;
(d) the discharging authority must submit written representations to the appointed person in respect of the appeal within 20 business days of the date on which the appeal parties are notified of the appointment of a person under paragraph (c) and must ensure that copies of its written representations are sent to the undertaker on the day on which they are submitted to the appointed person;
(e) the appeal parties must make any counter-submissions to the appointed person within 10 business days of receipt of written representations pursuant to paragraph (d) above.
(3) The appointed person must make his decision and notify it to the appeal parties, with reasons, as soon as reasonably practicable and in any event within 30 business days of the deadline for the receipt of counter-submissions pursuant to sub-paragraph (e).
(4) If the appointed person considers that further information is necessary to enable him to consider the appeal he must, as soon as practicable, notify the appeal parties in writing specifying the further information required, the appeal party from whom the information is sought, and the date by which the information is to be submitted.
(5) Any further information required pursuant to sub-paragraph 4 must be provided by the party from whom the information is sought to the appointed person and to other appeal parties by the date specified by the appointed person. Any written representations concerning matters contained in the further information must be submitted to the appointed person and made available to all appeal parties within 10 business days of that date.
(6) On an appeal under this paragraph, the appointed person may—
(a) allow or dismiss the appeal; or
(b) reverse or vary any part of the decision of the discharging authority (whether the appeal relates to that part of it or not),
and may deal with the application as if it had been made to the appointed person in the first instance.
(7) The appointed person may proceed to a decision on an appeal taking into account only such written representations as have been sent within the time limits prescribed, or set by the appointed person, under this paragraph.
(8) The appointed person may proceed to a decision even though no written representations have been made within those time limits, if it appears to the appointed person that there is sufficient material to enable a decision to be made on the merits of the case.
(9) The decision of the appointed person on an appeal is final and binding on the parties and a court may entertain proceedings for questioning the decision only if the proceedings are brought by a claim for judicial review.
(10) If an approval is given by the appointed person pursuant to this Schedule, it is deemed to be an approval for the purpose of the relevant requirement in Schedule 2 (requirements) as if it had been given by the discharging authority. The discharging authority may confirm any determination given by the appointed person in identical form in writing but a failure to give such confirmation (or a failure to give it in identical form) may not be taken to affect or invalidate the effect of the appointed person’s determination.
(11) Save where a direction is given pursuant to paragraph (12) requiring the costs of the appointed person to be paid by the discharging authority, the reasonable costs of the appointed person must be met by the undertaker.
(12) On application by the discharging authority or the undertaker, the appointed person may give directions as to the costs of the appeal parties and as to the parties by whom the costs of the appeal are to be paid. In considering whether to make any such direction and the terms on which it is to be made, the appointed person must have regard to the Planning Practice Guidance or any circular or guidance which may from time to time replace it.
(13) In this Schedule:
(a) “business day” means a normal working day, excluding weekends and Bank Holidays; and
(b) “Planning Practice Guidance” means the Planning Practice Guidance as published online by the Ministry of Housing, Communities and Local Government.

SCHEDULE 4 STREETS SUBJECT TO TEMPORARY PROHIBITION OR RESTRICTION OF USE
Article 9
		(3) Extent of Prohibition					
			Grid reference			Grid reference	
(1) Area	(2) Streets	Streets from	X	Y	Streets to	X	Y
In the District of Bassetlaw	Cottam Road	Power Station Site Entrance	480996	379757	Rampton Road	479207	379583
In the District of Bassetlaw	Green Lane	Rampton Road	479207	379583	Cottam Lane	478974	379507
In the District of Bassetlaw	Cottam Lane	Cottam Lane	478974	379507	Townside Lane	478640	379293
In the District of Bassetlaw	Town Street	Townside Lane	478640	379293	Leverton Road	478288	379214
In the District of Bassetlaw	Leverton Road	Leverton Road	478288	379214	Beckingham Lane	478125	379698
In the District of Bassetlaw	Treswell Road	Beckingham Lane	478125	379698	High Street	478339	380793
In the District of Bassetlaw	Church Street	High Street	478339	380793	Station Road	478342	381231
In the District of Bassetlaw	Station Road	Station Road	478342	381231	Pippistrelle Close	478565	381835
In the District of Bassetlaw	Southgore Lane	Pippistrelle Close	478565	381835	Main Street	478539	382149
In the District of Bassetlaw	Sturton Road	Main Street	478539	382149	Ketlock Hill Lane	478564	382452
In the District of Bassetlaw	Leverton Road	Ketlock Hill Lane	478564	382452	Church Street	478706	383903
In the District of Bassetlaw	Cross Street	Church Street	478706	383903	North Street	478601	384506
In the District of Bassetlaw	Station Road	North Street	478601	384506	Gainsborough Road	478439	384527
In the District of Bassetlaw	Gainsborough Road	Station Road	478439	384527	Power Station Site Entrance	478554	385136

SCHEDULE 5 PROTECTIVE PROVISIONS
Article 15

PART 1 Protection for operators of electronic communications code networks
1 The provisions of this Part have effect for the protection of any operator unless otherwise agreed in writing between the undertaker and the operator.
2 In this Part—
“the 2003 Act” means the Communications Act 2003;
“conduit system” has the same meaning as in the electronic communications code and references to providing a conduit system must be construed in accordance with paragraph 1(3A) of the code;
“electronic communications apparatus” has the same meaning as in the electronic communications code;
“electronic communications code” has the same meaning as in Chapter 1 of Part 2 (networks, services and the radio spectrum) of the 2003 Act;
“electronic communications code network” means—
(a) so much of an electronic communications network or infrastructure system provided by an electronic communications code operator as is not excluded from the application of the electronic communications code by a direction under section 106 (application of the electronic communications code) of the 2003 Act; and
Section 106 was amended by section 4 of the Digital Economy Act 2017 (c.30).
(b) an electronic communications network which the Secretary of State is providing or proposing to provide;
“electronic communications code operator” means a person in whose case the electronic communications code is applied by a direction under section 106 of the 2003 Act;
“operator” means the operator of an electronic communications code network.
2003 c.21.
3 (1) Subject to sub-paragraphs (2) to (4), if as the result of the authorised development its construction, or any subsidence resulting from any of those works—
(a) any damage is caused to any electronic communications apparatus belonging to an operator (other than apparatus the repair of which is not reasonably necessary in view of its intended removal for the purposes of those works) or other property of an operator; or
(b) there is any interruption in the supply of the service provided by an operator,
the undertaker must bear the undertaker must bear and pay the cost reasonably incurred by the operator in making good such damage or restoring the supply, make reasonable compensation to an operator for loss sustained by it and indemnify an operator against claims, demands, proceedings, costs, damages and expenses which may be made or taken against, or recovered from, or incurred by, an operator by reason, or in consequence of, any such damage or interruption.
(2) Nothing in sub-paragraph (1) imposes any liability on the undertaker with respect to any damage or interruption to the extent that it is attributable to the act, neglect or default of an operator, its officers, servants, contractors or agents.
(3) The operator must give the undertaker reasonable notice of any claim or demand, and no settlement or compromise of the claim or demand may be made without the consent of the undertaker which, if it withholds consent, has the sole conduct of any settlement or compromise or of any proceedings necessary to resist the claim or demand.
(4) Any difference arising between the undertaker and the operator under this paragraph must be referred to and settled by arbitration under article 18 (arbitration).
4 This Part does not apply to—
(a) any apparatus in respect of which the relations between the undertaker and an operator are regulated by Part 3 of the 1991 Act (street works in England and Wales); or
(b) any damage, or any interruption, caused by electro-magnetic interference arising from the construction or use of the authorised development.
5 Nothing in this Part effects the provisions of any enactment or agreement regulating the relations between the undertaker and an operator in respect of any apparatus laid or erected in land belonging to the undertaker on the date on which this Order is made.

EXPLANATORY NOTE
(This note is not part of the Order)
This Order authorises EDF Energy (Thermal Generation) Limited (referred to in this Order as the undertaker) to construct, operate, use and maintain a gas fired electricity generating station.
A copy of the Order plans and documents mentioned in this Order and certified in accordance with article 16 of this Order (certification of plans etc.) may be inspected free of charge during working hours at Bassetlaw District Council, 17B The Square, Retford, Notts, DN22 6DB or (during periods in which official restrictions on movement are in place under the Health Protection (Coronavirus, Restrictions) (England) Regulations 2020 (S.I. 2020/350) or other Government legislation)) on the website of the Planning Inspectorate.