SCHEDULE 8 Partial adjacency agreement form

[Insert name of bidder] hereby makes the additional required bids referred to in regulation 87 and 88 of the Regulations. These bids are a bid of zero pounds for every possible block (as defined in the Regulations) of numbered 3.6 GHz lots (as defined in the Regulations) in which the number of 3.6 GHz lots contained in the block is equal to the number of that bidder's winning principal stage bids for 3.6 GHz lots (as defined in the Regulations).
Sch. 8 in force at 18.11.2020, see reg. 1(1)